\begin{table}%T7
\caption{\label{tbl:freqs}Pulsation properties for the four new pulsators.}
\small%\centering
\par
\begin{tabular}{lcccr} \hline\hline\noalign{\smallskip}
Name & Id & Frequency & Amplitude & $S/N$\\
 & & [$\mu$Hz] & [mma] & \\\hline 
HE~2151--1001
 & $f_1$ & 7931~$\pm$~63 & 3.04~$\pm$~1.81  & 6.5\\
 & $f_2$ & 7791~$\pm$~64 & 3.00~$\pm$~1.80  & 6.5\\ 
HS~2125+1105
 & $f_1$ & 6835.66~$\pm$~0.07 & 4.05~$\pm$~0.19 & 19.6\\
 & $f_2$ & 7342.35~$\pm$~0.35 & 0.85~$\pm$~0.19 &  4.1\\ 
PG~1033+201
 & $f_1$ & 5850~$\pm$~27 & 4.9~$\pm$~0.6 &  8.1\\
 & $f_2$ & 6837~$\pm$~53 & 2.5~$\pm$~0.6 &  4.5\\ 
HE~1450--0957
 & $f_1$ & 7202~$\pm$~8  & 6.9~$\pm$~0.4 & 13.7\\
 & $f_2$ & 8475~$\pm$~21 & 2.5~$\pm$~0.4 & 5.2\\\hline  
\end{tabular}\tablefoot{Pulsation frequencies and amplitudes are given
as derived by non-linear least-square fitting to the light-curves.
The $S/N$ is computed after prewhitening the detected frequencies from the
signal.}
\end{table}