\begin{table}%T6
\caption{\label{tbl:newsdBVs}Details from the discovery runs for the four new sdBVs.}
\small%\centering
\par
 \begin{tabular}{lcrccc} \hline\hline\noalign{\smallskip}
Target        &Run &$N_p$& $\Delta t$ & $\sigma$ & $A_{\rm max}$\\
              &ID  &    & s  & mma  & mma \\
               \hline 
HE~2151--1001& S2 &120 & 30 & 0.58 & 2.20 \\ 
              & S3 & 73 & 30 & 1.05 & 2.35 \\
HS~2125+1105 & S2 & 67 & 35 & 1.75 & 6.45 \\
              & ST & 95 & 30 & 0.95 & 3.56 \\
              & S3 &116 & 42 & 0.72 & 3.42 \\
              & S3 &433 & 30 & 0.40 & 4.35 \\
              & S3 &541 & 30 & 0.33 & 3.84 \\
              & S4 & 89 & 28 & 1.17 & 4.76 \\
PG~1033+201  & T7 &118 & 20 & 1.01 & 4.95 \\
HE~1450--0957& S6 &125 & 30 & 0.90 & 6.81 \\
\hline 
\end{tabular}\tablefoot{``Run ID'' refers to the identifiers listed in Table~\ref{tbl:obstime},
$N_{\rm p}$ is the number of points for the specific sequence, $\Delta t$ is the
sampling time interval, $\sigma$ is the mean noise level in the FT,
and $A_{\rm max}$ is the amplitude of the highest peak.}
\end{table}