\begin{table}%T2
\caption{\label{tab:ALMA}Frequency range, angular resolution $\theta_{{\rm res}}$ at the largest baseline, line sensitivity $S_{\rm l}$ {for a linewidth of $300$~km~s$^{-1}$} and continuum sensitivity $S_{\rm c}$  {for $3\sigma$ detection in one hour} of integration time  and primary beam size $\theta_{{\rm beam}}$.}
\small%\centering
\par
\begin{tabular}{cccccc}
\hline\hline\noalign{\smallskip}
Band & Freq. [GHz]  & $\theta_{{\rm res}}$~[$''$] & $S_{\rm c}$~[mJy] & $S_{\rm l}$~[mJy] & $\theta_{{\rm beam}}$~[$''$] \\
\hline
3& $84{-}116$  & $0.034$ & $0.019$ & $0.163$ & $56$ \\
 4&$125{-}169$ & $0.023$ & $0.023$ & $0.174$& $48$ \\
 5&$163{-}211$ & $0.018$ & $0.298$ & $2.63$& $35$ \\
 6&$211{-}275$ & $0.014$ & $0.039$ & $0.225$& $27$ \\
 7&$275{-}373$ & $0.011$ & $0.077$ & $0.372$& $18$ \\
 8&$385{-}500$ & $0.008$ & $0.143$ & $0.620$& $12$ \\
 9&$602{-}720$ & $0.005$ & $0.232$ & $0.813$& $9$ \\
\hline
\end{tabular}
\tablefoot{3 more bands might be added in the future, band $1$ around $40$~GHz, band $2$ around $80$~GHz and band $10$ around $920$~GHz, which will have similar properties as the neighbouring bands.}
\end{table}