\begin{table}
  %\centering
\par
  \caption{\label{tab:ophd}As Table~\ref{tab:l183} but for lines observed towards Oph~D.}
  \begin{tabular}{l r r r r r c c r}
  \hline\hline
    Line & $\delta x$ & $\delta y$ & $T_{\rm mb}$ & $W$ & \dveq & $N_{\rm tot}$ & $N(\hh)$ & $N_{\rm tot}/2N(\hh)$ \\
    & \arcsec & \arcsec & mK & m\kkms & \kms & \dix{12}~\cc & \dix{22}~\cc \smallskip\\\hline
    %
    % OphD
    CN%-ophd.tdv % ophd-cn_final.cdens
    & 0 & 0 & 480 $\pm$ 65& 121$\pm$ 11& 0.25 & 36 & 6.8 & 2.7$(-$10) \\
    & --40 & 0 & $<$320& $<$90& & $<$26 & 3.0 & $<$4.3$(-$10) \\
    & --20 & 0 & $<$320& $<$140& & $<$41 & 4.5 & $<$4.5$(-$10) \\
    & 20 & 0 & 750 $\pm$ 105& 157 $\pm$ 15& 0.21 & 46 & 6.5 & 3.6$(-$10) \\
    & 40 & 0 & 745 $\pm$ 105& 176 $\pm$ 15& 0.24 & 52 & 5.2 & 5.0$(-$10) \\
    & 60 & 0 & 435 $\pm$ 110& $<$70& & $<$20.50 & 3.3 & $<$3.1$(-$10) \\
    & 80 & 0 & $<$340& $<$65& & $<$19.10 & 3.0 & $<$3.2$(-$10) \\
    & 0 & --40 & 670 $\pm$ 110& 180 $\pm$ 15& 0.27 & 53 & 5.3 & 5.0$(-$10) \\
    & 0 & --20 & 990 $\pm$ 110& 287 $\pm$ 13& 0.29 & 84 & 6.6 & 6.4$(-$10) \\
    & 0 & 20 & 500 $\pm$ 105& 174 $\pm$ 26& 0.35 & 51 $\pm$ 7.6 & 6.0 & 4.2$(-$10) \\
    & 0 & 40 & $<$310& $<$110& & $<$32 & 4.5 & $<$3.6$(-$10) \\
   %
    \thcn$^a$
    & 0 & 0 & 80 $\pm$ 20& 25 $\pm$ 7& 0.32 & 0.74 $\pm$ 0.21 & 6.8 & 5.4$(-12)$\\
    & --20 & 0 & 110 $\pm$ 35& 40 $\pm$ 9& 0.36 & 1.2 $\pm$ 0.3 & 4.5 & 1.3$(-11)$\\
    & 20 & 0 & 125 $\pm$ 35& 57 $\pm$ 10& 0.46 & 1.7 $\pm$ 0.3 & 6.5 & 1.3$(-11)$\\
    & 0 & --20 & 150 $\pm$ 35& 36 $\pm$ 8& 0.24 & 1.1 $\pm$ 0.2 & 6.6 & 8.3$(-12)$\\
    & 0 & 20 & $< $100& $< $25& & $<$0.75 & 6.0 & $<$$6.3(-12)$\\
    %
    HCN$^b$%-ophd.tdv % ophd-hcn_final.cdens
    & 0 & 0 & 2140 $\pm$ 35& 964 $\pm$ 6& 0.45 & 16 & 6.8 & 1.2$(-$10) \\
    & --40 & 0 & 760 $\pm$ 60& 435 $\pm$ 20& 0.57 & 7.1 & 3.0 & 1.2$(-$10) \\
    & --20 & 0 & 1470 $\pm$ 65& 629 $\pm$ 11& 0.43 & 10 & 4.5 & 1.1$(-$10) \\
    & 20 & 0 & 2470 $\pm$ 50& 1115 $\pm$ 9& 0.45 & 18 & 6.5 & 1.4$(-$10) \\
    & 40 & 0 & 2490 $\pm$ 65& 1131 $\pm$ 11& 0.45 & 19 & 5.2 & 1.8$(-$10) \\
    & 60 & 0 & 1805 $\pm$ 55& 781 $\pm$ 10& 0.43 & 13 & 3.3 & 1.9$(-$10) \\
    & 80 & 0 & 1120 $\pm$ 60& 504 $\pm$ 10& 0.45 & 8.3 & 3.0 & 1.4$(-$10) \\
    & 0 & --40 & 2605 $\pm$ 60& 1159 $\pm$ 10& 0.44 & 19 & 5.3 & 1.8$(-$10) \\
    & 0 & --20 & 2720 $\pm$ 60& 1408 $\pm$ 10& 0.52 & 23 & 6.6 & 1.7$(-$10) \\
    & 0 & 20 & 2080 $\pm$ 60& 842 $\pm$ 10& 0.40 & 14 & 6.0 & 1.2$(-$10) \\
    & 0 & 40 & 1850 $\pm$ 55& 906 $\pm$ 10& 0.49 & 15 & 4.5 & 1.7$(-$10) \\
    H\thcn%-ophd.tdv % ophd-h13cn_final.cdens
    & 0 & 0 & 439$\pm$ 35& 134 $\pm$ 10& 0.31 & 0.46 & 6.8 & 3.4$(-$12) \\
    & --40 & 0 & $<$160& $<$45& & $<$0.15 & 3.0 & $<$2.5$(-$12) \\
    & --20 & 0 & 313 $\pm$ 50& 94 $\pm$ 10& 0.30 & 0.32 $\pm$ 0.03 & 4.5 & 3.5$(-$12) \\
    & 20 & 0 & 551 $\pm$ 50& 186 $\pm$ 12& 0.34 & 0.64 & 6.5 & 4.9$(-$12) \\
    & 40 & 0 & 433 $\pm$ 50& 120 $\pm$ 10& 0.28 & 0.41 & 5.2 & 3.9$(-$12) \\
    & 60 & 0 & 283 $\pm$ 55& 109 $\pm$ 15& 0.39 & 0.37 $\pm$ 0.05 & 3.3 & 5.5$(-$12) \\
    & 80 & 0 & $<$145& $<$35& & $<$0.12 & 3.0 & $<$2.0$(-$12) \\
    & 0 & --40 & 413 $\pm$ 45& 148 $\pm$ 12& 0.36 & 0.51 & 5.3 & 4.8$(-$12) \\
    & 0 & --20 & 649 $\pm$ 50& 178 $\pm$ 12& 0.27 & 0.61 & 6.6 & 4.6$(-$12) \\
    & 0 & 20 & 311 $\pm$ 50& 93 $\pm$ 10& 0.30 & 0.32 $\pm$ 0.03 & 6.0 & 2.7$(-$12) \\
    & 0 & 40 & 220 $\pm$ 50& 40 $\pm$ 10& & 0.14\x & 4.5 & 1.6$(-$12) \\
    % & 20 & -20 & 498$\pm$ 50& 135$\pm$ 10& 0.27 & 0.46 & & \\
    % & 20 & 20 & 527$\pm$ 50& 118$\pm$ 10& 0.22 & 0.40 & & \\
    HN\thc%-ophd.tdv % ophd-hn13c_final.cdens
    & 0 & 0 & 880 $\pm$ 45& 435 $\pm$ 10& 0.49 & 0.75 & 6.8 & 5.5$(-$12) \\
    & --40 & 0 & $<$170& 46 $\pm$ 11& & 0.08 & 3.0 & 1.3$(-$12) \\
    & --20 & 0 & 440 $\pm$ 65& 225 $\pm$ 17& 0.51 & 0.39 & 4.5 & 4.3$(-$12) \\
    & 20 & 0 & 1170 $\pm$ 60& 690 $\pm$ 15& 0.59 & 1.2 & 6.5 & 9.3$(-$12) \\
    & 40 & 0 & 1045 $\pm$ 60& 570 $\pm$ 15& 0.55 & 0.99 & 5.2 & 9.5$(-$12) \\
    & 60 & 0 & 535 $\pm$ 60& 260 $\pm$ 20& 0.49 & 0.45 & 3.3 & 6.7$(-$12) \\
    & 80 & 0 & 255 $\pm$ 60& 140 $\pm$ 25& 0.99 & 0.24\x & 3.0 & 4.0$(-$12) \\
    & 0 & --40 & 920 $\pm$ 60& 525 $\pm$ 20& 0.57 & 0.90\x & 5.3 & 8.5$(-$12) \\
    & 0 & --20 & 1150 $\pm$ 60& 720 $\pm$ 20& 0.63 & 1.2 & 6.6 & 9.1$(-$12) \\
    & 0 & 20 & 660 $\pm$ 65& 260 $\pm$ 20& 0.39 & 0.45 & 6.0 & 3.7$(-$12) \\
    & 0 & 40 & 620 $\pm$ 60& 255 $\pm$ 15& 0.41 & 0.44 & 4.5 & 4.9$(-$12) \\
        \hline
  \end{tabular}
\par
\tablefoot {\tablefoottext{a}{Detections are at the 4$\sigma$ level on $W$.}
  \tablefoottext{b}{Weakest HFS component at 88633.9360~MHz with R.I. =
    0.111.}}
\end{table}