\begin{table}%t1
\caption{\label{tab1}Polarimetric observations of stars in NGC 5617.}
%\centering
\par
\begin{tabular}{lccccc}
\hline \hline
\noalign{\smallskip}
 & $U$ &   $B$ & $V$ &   $R$ &  $I$ \\
Star Id. & $P_{U} (\%) \pm \epsilon_{P_U} $  &  $P_{B} (\%)\pm \epsilon_{P_B}$  &    $P_{V}(\%)\pm  \epsilon_{P_V}$  &  $P_{R}(\%) \pm  \epsilon_{P_R}$  &   $P_{I}(\%  \pm \epsilon_{P_I}$   \\
        & $\theta_{U} (^\circ)\pm  \epsilon_{\theta_U} $ &$\theta_{B} (^\circ)\pm  \epsilon_{\theta_B}$ &$\theta_{V} (^\circ) \pm \epsilon_{\theta_V}$ &$\theta_{R}(^\circ) \pm  \epsilon_{\theta_R}$ &$\theta_{I} (^\circ)\pm  \epsilon_{\theta_I}$ \\[2pt]
\hline
36& 
  --          --  &
3.15 $\pm$ 0.39 &  
3.00 $\pm$ 0.32 &  
3.33 $\pm$ 0.22 & 
3.11 $\pm$ 0.41 \\
  &  
  --          --   &
70.2 $\pm$  3.5  &   
69.5 $\pm$  3.0  &   
63.1 $\pm$  1.9  &   
61.5 $\pm$  3.7  \\
55&
  --          --  &
2.76 $\pm$ 0.39 &  
2.09 $\pm$ 0.27 &  
2.14 $\pm$ 0.28 &  
1.90 $\pm$ 0.25\\
  &
  --          -- &
64.3 $\pm$  4.0&  
60.5 $\pm$  3.7&   
63.3 $\pm$  3.7&   
60.7 $\pm$  3.7 \\ 
58& 
3.40 $\pm$ 0.47 &  
3.51 $\pm$ 0.46 &  
2.11 $\pm$ 0.33 & 
2.54 $\pm$ 0.36 &  
1.67 $\pm$ 0.45 \\
  & 
76.3 $\pm$  3.9  & 
82.2 $\pm$  3.7  &   
94.3 $\pm$  4.4  &  
92.0 $\pm$  4.0  &   
93.5 $\pm$  7.5  \\  
65& 
  --          --   &
  --          --   &
1.79 $\pm$ 0.20  &  
1.69 $\pm$ 0.20  &  
2.08 $\pm$ 0.30 \\  
  & 
  --          --   &
  --          --   &
70.5 $\pm$  3.2  & 
76.9 $\pm$  3.4  &   
72.6 $\pm$  4.1  \\
68\tablefootmark{*}& 
3.01 $\pm$ 0.42 & 
4.27 $\pm$ 0.35 &  
4.21 $\pm$ 0.21 &  
4.19 $\pm$ 0.11 &  
3.87 $\pm$ 0.25 \\
   & 
72.2 $\pm$  4.0  &
73.4 $\pm$  2.3  &   
69.8 $\pm$  1.4  &  
72.3 $\pm$  0.8  &  
71.6 $\pm$  1.8  \\
69& 
 --          --   &
 --          --   &
3.19 $\pm$ 0.43 &  
4.01 $\pm$ 0.36 &  
2.51 $\pm$ 0.32 \\
  & 
  --          --   &
  --          --   &
66.8 $\pm$  3.8  & 
70.3 $\pm$  2.6  &  
68.3 $\pm$  3.6  \\
79& 
 --          --   &
3.41 $\pm$ 0.39 &  
4.81 $\pm$ 0.17 &  
4.95 $\pm$ 0.24 &  
4.24 $\pm$ 0.49 \\
  &
 --           --  &
73.5 $\pm$  3.3 & 
72.8 $\pm$  1.0 &   
71.2 $\pm$  1.4 & 
71.5 $\pm$  3.3 \\
80& 
 --          --   & 
 --          --   &  
4.63 $\pm$ 0.36 &  
4.42 $\pm$ 0.22 &  
4.13 $\pm$ 0.38 \\
  &
  --          --   &
  --          --   &
74.0 $\pm$  2.2  & 
73.8 $\pm$  1.4  &   
66.8 $\pm$  2.6   \\  
93& 
3.95 $\pm$ 0.55 &  
4.86 $\pm$ 0.65 &  
4.55 $\pm$ 0.37 &  
4.10 $\pm$ 0.31 &  
4.79 $\pm$ 0.64 \\
  & 
77.7 $\pm$  4.0  &
78.9 $\pm$  3.8  &  
73.4 $\pm$  2.3  &   
72.5 $\pm$  2.2  &  
77.0 $\pm$  3.8  \\
94& 
3.89 $\pm$ 0.44 &  
4.66 $\pm$ 0.45 &   
4.22 $\pm$ 0.26 &    
4.02 $\pm$ 0.18 &  
3.35 $\pm$ 0.43 \\ 
  &
57.1 $\pm$  3.2 & 
72.8 $\pm$  2.8 &  
74.3 $\pm$  1.8 &  
74.2 $\pm$  1.3 &  
70.4 $\pm$  3.7 \\
100&
5.47 $\pm$ 0.47 &  
5.02 $\pm$ 0.37 &  
4.31 $\pm$ 0.29 &  
4.01 $\pm$ 0.29 & 
3.13 $\pm$ 0.46 \\
   & 
64.4 $\pm$  2.5 &
70.7 $\pm$  2.1 &   
73.0 $\pm$  1.9 &   
70.5 $\pm$  2.1 &   
73.1 $\pm$  4.2 \\
106&
  --          --  & 
5.01 $\pm$ 0.67 &  
4.51 $\pm$ 0.20 &     
4.03 $\pm$ 0.21 &     
3.81 $\pm$ 0.45 \\
   &
  --          --   &
81.1 $\pm$  3.8  &  
74.5 $\pm$  1.3  &   
80.1 $\pm$  1.5  &   
78.8 $\pm$  3.4  \\   
107&
  --          --  &  
4.35 $\pm$ 0.25 &
4.18 $\pm$ 0.19 & 
4.44 $\pm$ 0.09 &  
3.60 $\pm$ 0.17 \\
   & 
  --          --  &
76.3 $\pm$  1.6 & 
75.9 $\pm$  1.3 &  
76.5 $\pm$  0.6 &  
76.0 $\pm$  1.3 \\
116\tablefootmark{*}& 
3.72 $\pm$ 0.45 &  
3.71 $\pm$ 0.11 &  
4.15 $\pm$ 0.03 & 
3.94 $\pm$ 0.03 &  
3.55 $\pm$ 0.02 \\
  & 
74.2 $\pm$  3.4 & 
72.5 $\pm$  0.8 &   
71.4 $\pm$  0.2 &   
71.4 $\pm$  0.2 &   
70.7 $\pm$  0.2 \\
136& 
  --           -- & 
4.38 $\pm$ 0.48 &  
3.59 $\pm$ 0.19 &  
4.11 $\pm$ 0.22 & 
3.44 $\pm$ 0.34 \\
    &
  --          --   &
72.4 $\pm$  3.1  &  
79.2 $\pm$  1.5  &   
76.4 $\pm$  1.5  &   
80.3 $\pm$  2.8  \\
137&
1.75 $\pm$ 0.28 & 
0.65 $\pm$ 0.25 &  
3.00 $\pm$ 0.21 & 
2.88 $\pm$ 0.24 &  
2.15 $\pm$ 0.30 \\
   &
70.1 $\pm$  4.5  & 
76.2 $\pm$ 10.5  &   
70.7 $\pm$  2.0  &  
72.7 $\pm$  2.4  &   
75.8 $\pm$  4.0  \\
139& 
4.46 $\pm$ 0.46 & 
4.17 $\pm$ 0.37 & 
4.06 $\pm$ 0.24 & 
4.18 $\pm$ 0.27 &  
3.74 $\pm$ 0.46 \\
   & 
76.8 $\pm$  2.9 &
76.3 $\pm$  2.5 &  
74.9 $\pm$  1.7 &   
76.9 $\pm$  1.8 &  
69.8 $\pm$  3.5 \\
143& 
  --          --  &
3.89 $\pm$ 0.39 &
2.84 $\pm$ 0.30 &  
3.24 $\pm$ 0.31 & 
3.13 $\pm$ 0.42 \\
   & 
  --          --  &
71.9 $\pm$  2.9 &  
72.3 $\pm$  3.0 &  
72.5 $\pm$  2.7 &  
66.7 $\pm$  3.8 \\
146& 
3.90 $\pm$ 0.36 &  
4.33 $\pm$ 0.38 &    
3.88 $\pm$ 0.24 &     
3.90 $\pm$ 0.33 &  
4.71 $\pm$ 0.40 \\
   & 
74.6 $\pm$  2.6 & 
68.5 $\pm$  2.5 &  
69.2 $\pm$  1.8 &  
67.9 $\pm$  2.4 & 
70.3 $\pm$  2.4 \\
149& 
3.32 $\pm$ 0.40 & 
1.19 $\pm$ 0.25 &  
1.49 $\pm$ 0.19 & 
1.45 $\pm$ 0.19 &  
1.40 $\pm$ 0.21 \\  
   & 
89.8 $\pm$  3.4  & 
91.8 $\pm$  5.9  &  
74.2 $\pm$  3.6  &   
75.6 $\pm$  3.7  &   
66.6 $\pm$  4.3  \\
154& 
3.46 $\pm$ 0.41 & 
1.93 $\pm$ 0.14 &  
3.14 $\pm$ 0.18 &  
2.61 $\pm$ 0.18 &  
2.03 $\pm$ 0.16 \\
  & 
68.8 $\pm$  3.4  & 
69.1 $\pm$  2.1  &   
66.5 $\pm$  1.6  &   
64.4 $\pm$  2.0  &  
69.5 $\pm$  2.2 \\
169& 
4.60 $\pm$ 0.51 & 
4.64 $\pm$ 0.36 &  
4.40 $\pm$ 0.19 & 
4.37 $\pm$ 0.22 &  
3.50 $\pm$ 0.42 \\
   & 
70.9 $\pm$  3.2  &
65.8 $\pm$  2.2  &   
73.7 $\pm$  1.2  &   
72.5 $\pm$  1.4  &   
74.9 $\pm$  3.4  \\
175&
3.66 $\pm$ 0.43 & 
4.24 $\pm$ 0.35 &  
4.14 $\pm$ 0.24 & 
4.22 $\pm$ 0.17 &  
3.85 $\pm$ 0.41 \\
   &
73.0 $\pm$  3.3 & 
81.1 $\pm$  2.4 &  
80.1 $\pm$  1.7 &  
80.1 $\pm$  1.2 &   
80.0 $\pm$  3.0 \\
176& 
  --          --  &  
2.71 $\pm$ 0.32 &  
2.50 $\pm$ 0.21 &  
2.33 $\pm$ 0.13 &    
2.13 $\pm$ 0.19 \\
   & 
  --          --   &  
65.5 $\pm$  3.4  &  
65.1 $\pm$  2.4  &   
65.1 $\pm$  1.6  &   
68.2 $\pm$  2.5  \\
180& 
4.25 $\pm$ 0.17 &  
4.48 $\pm$ 0.24 &  
4.66 $\pm$ 0.35 &  
4.49 $\pm$ 0.17 &  
3.97 $\pm$ 0.25 \\
   & 
70.7 $\pm$  1.1  &
74.4 $\pm$  1.5  &  
73.5 $\pm$  2.1  &  
73.1 $\pm$  1.1  &  
73.5 $\pm$  1.8 \\
182&
4.48 $\pm$ 0.55 & 
3.98 $\pm$ 0.39 &  
3.91 $\pm$ 0.26 & 
3.73 $\pm$ 0.18 &  
2.94 $\pm$ 0.37 \\
 &
74.1 $\pm$  3.5  & 
75.6 $\pm$  2.8  &   
74.7 $\pm$  1.9  &   
74.9 $\pm$  1.4  &  
73.8 $\pm$  3.6  \\
184&
4.89 $\pm$ 0.62 & 
4.66 $\pm$ 0.37 & 
4.56 $\pm$ 0.21 & 
4.52 $\pm$ 0.25 & 
4.20 $\pm$ 0.37 \\
   &  
75.4 $\pm$  3.6  & 
76.1 $\pm$  2.3  &   
75.4 $\pm$  1.3  &   
76.2 $\pm$  1.6  &   
69.6 $\pm$  2.5  \\
185\tablefootmark{*}& 
3.95 $\pm$ 0.13 &  
4.21 $\pm$ 0.23 &  
4.44 $\pm$ 0.13 & 
4.16 $\pm$ 0.21 &  
3.63 $\pm$ 0.20 \\
& 
72.2 $\pm$  0.9 &
74.8 $\pm$  1.6 &   
74.8 $\pm$  0.8 &   
74.3 $\pm$  1.4 &   
72.8 $\pm$  1.6 \\
186& 
4.30 $\pm$ 0.55 &  
4.38 $\pm$ 0.42 &  
4.67 $\pm$ 0.22 & 
4.59 $\pm$ 0.24 &  
4.22 $\pm$ 0.52 \\
   & 
72.7 $\pm$  3.6  &
76.6 $\pm$  2.7  &   
72.3 $\pm$  1.3  &  
74.5 $\pm$  1.5  &   
72.9 $\pm$  3.5  \\
187\tablefootmark{*} & 
1.64 $\pm$ 0.54 & 
2.18 $\pm$ 0.38 & 
1.37 $\pm$ 0.23 &  
2.11 $\pm$ 0.25 &  
1.71 $\pm$ 0.52 \\
     &
76.3 $\pm$  9.1&
68.5 $\pm$  4.9&  
70.4 $\pm$  4.8&  
55.2 $\pm$  3.4&   
76.2 $\pm$  8.4  \\
188&
  --          --  & 
3.58 $\pm$ 0.53 & 
4.95 $\pm$ 0.45 &  
4.46 $\pm$ 0.49 & 
4.18 $\pm$ 0.60 \\
   &
  --          --   &
71.2 $\pm$  4.2  & 
74.4 $\pm$  2.6  &   
76.1 $\pm$  3.1  &   
72.2 $\pm$  4.1  \\
190& 
3.16 $\pm$ 0.47 &  
4.20 $\pm$ 0.33 &    
3.98 $\pm$ 0.18 &    
3.93 $\pm$ 0.10 &    
3.20 $\pm$ 0.46 \\
   &
75.4 $\pm$  4.2 & 
73.6 $\pm$  2.2 &  
73.4 $\pm$  1.3 &   
74.1 $\pm$  0.7 &  
72.0 $\pm$  4.1 \\
195\tablefootmark{*} &  
5.28 $\pm$ 0.47 & 
4.13 $\pm$ 0.43 &  
3.06 $\pm$ 0.46 & 
4.42 $\pm$ 0.48 &  
3.18 $\pm$ 0.44 \\
&
79.9 $\pm$  2.5& 
71.1 $\pm$  3.0& 
65.1 $\pm$  4.3&  
66.8 $\pm$  3.1&
60.2 $\pm$  3.9   \\
196& 
3.90 $\pm$ 0.78 & 
2.80 $\pm$ 0.24 & 
2.01 $\pm$ 0.51 & 
2.35 $\pm$ 0.42 &  
2.69 $\pm$ 0.61 \\
   & 
54.4 $\pm$  5.6  &
73.9 $\pm$  2.4  &   
78.9 $\pm$  7.1  &   
70.7 $\pm$  5.1  &  
68.0 $\pm$  6.4 \\
202\tablefootmark{*}&
4.72 $\pm$ 0.31 &
4.84 $\pm$ 0.15 & 
4.63 $\pm$ 0.11 & 
4.50 $\pm$ 0.10 &  
3.89 $\pm$ 0.23 \\
 & 
71.3 $\pm$  1.9 &  
75.4 $\pm$  0.9 &  
76.0 $\pm$  0.7 &   
76.1 $\pm$  0.6 &   
73.9 $\pm$  1.7 \\
203&
4.20 $\pm$ 0.35 & 
4.33 $\pm$ 0.23 &  
4.03 $\pm$ 0.58 &  
4.33 $\pm$ 0.47 & 
3.81 $\pm$ 0.36 \\
   & 
70.0 $\pm$  2.4 &
69.3 $\pm$  1.5 &
74.1 $\pm$  4.1 &
73.7 $\pm$  3.1 &
70.8 $\pm$  2.7 \\
205\tablefootmark{*} & 
5.41 $\pm$ 1.24 &  
4.71 $\pm$ 0.43 & 
4.00 $\pm$ 0.34 &  
4.00 $\pm$ 0.36 &
3.14 $\pm$ 0.50  \\
     & 
68.0 $\pm$  6.4&
71.5 $\pm$  2.6&  
75.8 $\pm$  2.4& 
75.6 $\pm$  2.6& 
84.4 $\pm$  4.5 \\
207\tablefootmark{*} & 
3.41 $\pm$ 0.52 &  
4.06 $\pm$ 0.38 &  
3.48 $\pm$ 0.21 &  
3.35 $\pm$ 0.39 &  
3.35 $\pm$ 0.44 \\
     & 
64.3 $\pm$   4.3& 
66.7 $\pm$   2.7&  
78.9 $\pm$   1.7&  
74.9 $\pm$   3.3& 
72.9 $\pm$   3.7   \\
214&
3.16 $\pm$ 0.38 &
4.16 $\pm$ 0.32 &
4.15 $\pm$ 0.16 &
4.17 $\pm$ 0.18 &
3.82 $\pm$ 0.26 \\
   & 
72.7 $\pm$  3.4  & 
73.5 $\pm$  2.2  &   
71.0 $\pm$  1.1  &   
73.2 $\pm$  1.2  &  
69.7 $\pm$  1.9  \\
215&
  --          --  & 
3.83 $\pm$ 0.52 &  
3.35 $\pm$ 0.15 &  
3.40 $\pm$ 0.13 &  
2.97 $\pm$ 0.17 \\
   &
  --          --   &
74.4 $\pm$  3.9  &
69.2 $\pm$  1.3  &   
72.2 $\pm$  1.1  &   
70.7 $\pm$  1.6  \\
216\tablefootmark{*} &
4.38 $\pm$ 0.41 &  
4.80 $\pm$ 0.39 &  
4.22 $\pm$ 0.24 & 
4.05 $\pm$ 0.12 &  
3.48 $\pm$ 0.29 \\
     &
71.0 $\pm$  2.7 &
71.1 $\pm$  2.3 & 
74.5 $\pm$  1.6 & 
73.9 $\pm$  0.8 & 
70.6 $\pm$  2.4 \\
221& 
3.60 $\pm$ 0.36 &  
3.84 $\pm$ 0.20 &  
3.49 $\pm$ 0.16 &  
3.34 $\pm$ 0.19 & 
3.02 $\pm$ 0.27 \\
& 
74.9 $\pm$  2.9  &
76.1 $\pm$  1.5  &   
76.5 $\pm$  1.3  &   
74.2 $\pm$  1.6  &   
73.2 $\pm$  2.6  \\
225\tablefootmark{*}& 
4.83 $\pm$ 0.56 &
4.60 $\pm$ 0.37 & 
4.47 $\pm$ 0.32 &  
4.56 $\pm$ 0.19 &  
3.72 $\pm$ 0.44 \\
    & 
72.3 $\pm$  3.3 & 
71.9 $\pm$  2.3 &   
73.6 $\pm$  2.0 &  
76.2 $\pm$  1.2 &  
75.1 $\pm$  3.4 \\
226\tablefootmark{*}& 
  --          --  &
  --          --  &
4.00 $\pm$ 0.29 &  
3.72 $\pm$ 0.34 & 
4.78 $\pm$ 0.54 \\
    &
  --          --  &
  --          --  & 
76.9 $\pm$  2.1 & 
77.0 $\pm$  2.6 &  
70.9 $\pm$  3.2 \\
227\tablefootmark{*}& 
7.90 $\pm$ 1.00 & 
4.36 $\pm$ 0.15 &    
4.24 $\pm$ 0.14 &   
3.87 $\pm$ 0.16 &   
3.43 $\pm$ 0.14 \\
  & 
73.4 $\pm$  3.6 &
78.7 $\pm$  1.0 &  
73.2 $\pm$  0.9 & 
74.3 $\pm$  1.2 &  
71.7 $\pm$  1.2 \\
238& 
2.75 $\pm$ 0.56 &  
4.03 $\pm$ 0.42 &  
4.13 $\pm$ 0.44 &  
4.57 $\pm$ 0.42 &  
2.16 $\pm$ 0.65 \\
&
65.1 $\pm$  5.7  &
78.6 $\pm$  3.0  &   
78.3 $\pm$  3.0  &   
69.7 $\pm$  2.6  &   
74.7 $\pm$  8.4  \\
244& 
3.52 $\pm$ 0.43 &
3.53 $\pm$ 0.45 &  
3.78 $\pm$ 0.25 &  
3.48 $\pm$ 0.40 &  
3.61 $\pm$ 0.41 \\
   & 
85.4 $\pm$  3.5 & 
79.1 $\pm$  3.6 &  
74.8 $\pm$  1.9 &  
81.8 $\pm$  3.3 &  
74.1 $\pm$  3.2 \\
255& 
  --          --  &
3.52 $\pm$ 0.37 & 
3.33 $\pm$ 0.41 &  
2.45 $\pm$ 0.19 &  
3.66 $\pm$ 0.40 \\
   &
  --          --  & 
69.8 $\pm$  3.0 &
78.6 $\pm$  3.5 &   
73.5 $\pm$  2.2 &
72.4 $\pm$  3.1 \\
258\tablefootmark{*}&
3.78 $\pm$ 0.38 &  
4.19 $\pm$ 0.30 &  
3.62 $\pm$ 0.17 &  
3.91 $\pm$ 0.10 &  
3.18 $\pm$ 0.35 \\
    &
77.6 $\pm$  2.9  & 
76.3 $\pm$  2.0  &   
76.8 $\pm$  1.3  &   
77.2 $\pm$  0.7  &   
78.2 $\pm$  3.1  \\
259& 
  --          --  & 
4.71 $\pm$ 0.59 & 
3.62 $\pm$ 0.39 &  
3.28 $\pm$ 0.32 &  
3.00 $\pm$ 0.37  \\
   & 
  --          --   &  
71.8 $\pm$  3.6  & 
68.4 $\pm$  3.1  &   
69.0 $\pm$  2.8  &   
55.5 $\pm$  3.5  \\
260& 
  --          --  &
4.27 $\pm$ 0.45 &  
2.91 $\pm$ 0.19 &  
3.15 $\pm$ 0.27 &  
2.98 $\pm$ 0.33  \\
   & 
  --          --   &
60.7 $\pm$  3.0  & 
67.0 $\pm$  1.9  &   
68.4 $\pm$  2.4  &   
71.9 $\pm$  3.2  \\
261&
3.97 $\pm$ 0.24 & 
3.86 $\pm$ 0.11 &  
3.70 $\pm$ 0.11 &  
3.69 $\pm$ 0.12 & 
3.62 $\pm$ 0.12 \\
  & 
70.2 $\pm$  1.7 & 
76.5 $\pm$  0.8 &  
74.1 $\pm$  0.9 &  
72.6 $\pm$  0.9 &  
66.9 $\pm$  0.9 \\
269& 
  --         --   &
  --         --   &
3.36 $\pm$ 0.26 &  
3.43 $\pm$ 0.16 &  
2.99 $\pm$ 0.27  \\
   & 
  --          --   & 
  --          --   &
68.8 $\pm$  2.2  & 
68.7 $\pm$  1.3  &   
69.8 $\pm$  2.6  \\
270& 
5.06 $\pm$ 0.34 &  
4.24 $\pm$ 0.24 &  
3.94 $\pm$ 0.14 &  
3.97 $\pm$ 0.16 & 
3.39 $\pm$ 0.14 \\
   & 
73.2 $\pm$  1.9  & 
74.8 $\pm$  1.6  &   
73.4 $\pm$  1.0  &  
73.3 $\pm$  1.2  &  
70.6 $\pm$  1.2  \\
274& 
5.27 $\pm$ 0.62 &  
3.21 $\pm$ 0.43 &  
3.76 $\pm$ 0.27 &  
4.57 $\pm$ 0.27 &  
3.55 $\pm$ 0.49 \\
   & 
69.3 $\pm$  3.3  &
72.6 $\pm$  3.8  &   
75.7 $\pm$  2.1  &   
73.6 $\pm$  1.7  &  
66.3 $\pm$  3.9 \\
275& 
  --          --  & 
4.31 $\pm$ 0.51 & 
3.51 $\pm$ 0.45 &  
4.35 $\pm$ 0.46 &  
2.67 $\pm$ 0.52 \\
   &
  --          --   &
65.4 $\pm$  3.4  &  
73.3 $\pm$  3.6  & 
63.9 $\pm$  3.0  &  
66.6 $\pm$  5.5  \\
276& 
3.81 $\pm$ 0.46 & 
4.29 $\pm$ 0.33 & 
4.52 $\pm$ 0.36 &  
4.66 $\pm$ 0.31 & 
4.33 $\pm$ 0.49 \\
   & 
68.5 $\pm$  3.4  & 
74.8 $\pm$  2.2  &   
72.7 $\pm$  2.3  &  
73.4 $\pm$  1.9  &   
76.9 $\pm$  3.2  \\
292& 
4.76 $\pm$ 0.39 & 
4.22 $\pm$ 0.39 &  
3.75 $\pm$ 0.19 & 
3.67 $\pm$ 0.13 & 
2.61 $\pm$ 0.31 \\
   & 
71.1 $\pm$  2.3  & 
72.9 $\pm$  2.6  &   
78.6 $\pm$  1.4  &   
74.5 $\pm$  1.0  &   
75.2 $\pm$  3.4  \\
294&
3.63 $\pm$ 0.52 &  
3.58 $\pm$ 0.37 &  
4.14 $\pm$ 0.36 &
3.56 $\pm$ 0.19 &  
2.68 $\pm$ 0.42 \\
   & 
58.6 $\pm$  4.1  & 
65.2 $\pm$  2.9  &   
72.0 $\pm$  2.5  &   
72.4 $\pm$  1.5  &   
76.1 $\pm$  4.4  \\
295&
  --          --  & 
  --          --  & 
3.79 $\pm$ 0.24 & 
3.61 $\pm$ 0.22 &  
3.53 $\pm$ 0.40  \\
   &
  --          --   &
  --          --   & 
74.8 $\pm$  1.8  &  
75.7 $\pm$  1.7  &   
75.1 $\pm$  3.2  \\
302& 
3.03 $\pm$ 0.47 & 
3.96 $\pm$ 0.49 & 
4.15 $\pm$ 0.25 & 
4.48 $\pm$ 0.19 &  
3.76 $\pm$ 0.38  \\
   &
72.9 $\pm$  4.4  & 
69.9 $\pm$  3.5  &   
70.8 $\pm$  1.7  &   
73.1 $\pm$  1.2  &   
74.7 $\pm$  2.9  \\ 
321& 
  --          --  &
  --          --  &  
2.21 $\pm$ 0.15 &  
1.78 $\pm$ 0.19 &  
1.92 $\pm$ 0.68  \\
   & 
  --          --   & 
  --          --   &
65.6 $\pm$  1.9  &  
69.9 $\pm$  3.0  &   
69.7 $\pm$  9.7  \\  
327& 
  --          --  &  
4.06 $\pm$ 0.58 & 
2.88 $\pm$ 0.21 &  
2.89 $\pm$ 0.17 &  
2.71 $\pm$ 0.18  \\
   &
  --          --   &
69.1 $\pm$  4.1  &  
69.7 $\pm$  2.1  &  
68.6 $\pm$  1.7  &   
71.2 $\pm$  1.9  \\
330& 
3.93 $\pm$ 0.30 &  
4.48 $\pm$ 0.23 & 
4.04 $\pm$ 0.10 &  
4.22 $\pm$ 0.09 &  
3.81 $\pm$ 0.15  \\
   &
71.5 $\pm$  2.2  & 
70.3 $\pm$  1.5  &   
73.8 $\pm$  0.7  &   
72.6 $\pm$  0.6  &   
73.4 $\pm$  1.1  \\
 331& 
   --          --  &
 2.28 $\pm$ 0.47 &  
 3.46 $\pm$ 0.23 &  
 3.21 $\pm$ 0.18 &  
 3.16 $\pm$ 0.27 \\
    &
   --          --   &
 75.6 $\pm$  5.8  &  
 66.1 $\pm$  1.9  &   
 71.1 $\pm$  1.6  &  
 67.9 $\pm$  2.4  \\ 
333& 
  --          --  &  
3.91 $\pm$ 0.61 &  
5.79 $\pm$ 0.32 &  
4.84 $\pm$ 0.35 &  
5.13 $\pm$ 0.48 \\
   & 
  --          --   &  
59.4 $\pm$  4.4  &  
71.1 $\pm$  1.6  &   
69.3 $\pm$  2.1  &   
67.2 $\pm$  2.7  \\   
334& 
4.35 $\pm$ 0.45 &
4.89 $\pm$ 0.32 &  
4.45 $\pm$ 0.18 &  
4.47 $\pm$ 0.18 &  
4.14 $\pm$ 0.38  \\
   &
73.4 $\pm$  2.9  & 
74.9 $\pm$  1.9  &   
77.4 $\pm$  1.2  &   
73.3 $\pm$  1.2  &   
71.5 $\pm$  2.6  \\   
336&
  --          --  &
3.44 $\pm$ 0.48 &  
3.35 $\pm$ 0.27 &  
3.10 $\pm$ 0.43 &  
4.72 $\pm$ 0.56  \\
   & 
  --          --   &
78.0 $\pm$  4.0  &   
60.1 $\pm$  2.3  &   
66.8 $\pm$  3.9  &   
64.0 $\pm$  3.4  \\
339\tablefootmark{*}& 
3.66 $\pm$ 0.46 &  
3.83 $\pm$ 0.41 & 
3.33 $\pm$ 0.38 &    
3.75 $\pm$ 0.27 &  
3.69 $\pm$ 0.42  \\
&
65.6 $\pm$  3.6  & 
70.4 $\pm$  3.1  &   
70.9 $\pm$  3.2  &  
71.8 $\pm$  2.1  &   
66.7 $\pm$  3.2  \\  
342& 
  --          --  &  
3.07 $\pm$ 0.36 &  
2.89 $\pm$ 0.17 &  
3.06 $\pm$ 0.13 & 
2.90 $\pm$ 0.11  \\
   &
  --          --   &
67.7 $\pm$  3.3  &  
65.7 $\pm$  1.7  &  
68.6 $\pm$  1.2  &  
66.7 $\pm$  1.1   \\   
347&  
  --          --  &
2.17 $\pm$ 0.24 &  
1.89 $\pm$ 0.14 &  
2.25 $\pm$ 0.12 &  
1.85 $\pm$ 0.13 \\
 & 
   --          --   &
 66.0 $\pm$  3.2  & 
 67.1 $\pm$  2.1  &   
 67.3 $\pm$  1.5  &   
 69.1 $\pm$  2.0  \\  
379& 
  --          --  & 
3.44 $\pm$ 0.36 &  
2.97 $\pm$ 0.24 & 
3.18 $\pm$ 0.15 & 
2.96 $\pm$ 0.38 \\
   &
  --          --   &
74.6 $\pm$  3.0  &
74.3 $\pm$  2.3  &   
73.9 $\pm$  1.3  &   
78.8 $\pm$  3.7  \\
\hline
\end{tabular}
\tablefoot {
\tablefoottext{a}{Identifications from Haug (\cite{H78});}
\tablefoottext{*}{membership according to the literature.}}
\end{table}