\begin{table}%t2
%\centering
\par
\caption{\label{2Dfit}Results of the 2D elliptic Gaussian fit.}
\par
\begin{tabular}{llccrcccc}
\hline \hline \noalign{\smallskip}
IRAS name & Alternative ID & $FWHM_x$ & $FWHM_y$ & $PA$ & $a$ & $b$ & $s_x$ & $s_y$\\ 
& & [\arcsec]  & [\arcsec] & [$^\circ$] & [\arcsec]  & [\arcsec] & & \\
\hline
01037$+$1219 & WX~Psc & 23.6 $\pm$ 0.4 & 21.7 $\pm$ 0.4 & 84 & 23.6 & 21.7 & 4.2 & 2.5 \\
02168$-$0312 & $o$~Cet & 22.7 $\pm$ 0.2 & 21.4 $\pm$ 0.2 & 79 & 22.8 & 21.4 & 3.6 & 2.4 \\
07209$-$2540 & VY~CMa & 19.2 $\pm$ 0.2 & 20.0 $\pm$ 0.3 & & & & 1.4 & 0.2  \\
09452$+$1330 & CW~Leo & 25.0 $\pm$ 0.1 & 25.2 $\pm$ 0.1 & & & & 6.8 & 10.0 \\
16342$-$3814 &  & 20.7 $\pm$ 0.1 & 20.4 $\pm$ 0.1 & & & & 0.7 & 0.6 \\
17411$-$3154 & AFGL~5379 & 20.9 $\pm$ 0.3 & 21.2 $\pm$ 0.3 & & & & 0.8 & 1.9 \\ 
19244$+$1115 & IRC~$+$10420 & 22.0 $\pm$ 0.2 & 20.9 $\pm$ 0.2 & & 22.0 & 20.9 & 2.5 & 1.5 \\
22196$-$4612 & $\pi$~Gru & 23.1 $\pm$ 0.4 & 22.2 $\pm$ 0.4 & --68 & 23.3 & 22.0 & 3.6 & 3.3 \\
23166$+$1655 & AFGL~3068 & 21.2 $\pm$ 0.4 & 20.7 $\pm$ 0.3 & & & & 1.2 & 1.0 \\ 
\hline
Uranus & & 20.4 $\pm$ 0.7 & 20.3 $\pm$ 0.5 & & & & & \\
PSF & & 20.2 $\pm$ 0.7 & 20.1 $\pm$ 0.5 & & & & & \\
\hline 
\end{tabular}
\tablefoot{PA is the position angle of the major axis of the ellipse, $a$ and $b$ the major and minor axis, $s_x$ and $s_y$ represent the relative size of the source to the beam following $x$ and $y$ (see Sect.~\ref{extended}).}
\vspace*{8mm}
\end{table}