\begin{table}%t1
%\centering
\par
\caption{\label{flux}Measured flux at 870~$\mu$m.}
\par
\begin{tabular}{llllrrrrr}
\hline\hline \noalign{\smallskip}
IRAS name & Alternative ID & Spectra type & Variability & Flux at 870~$\mu$m & Error\tablefootmark{a} & rms & Ideal aperture\tablefootmark{b} \\ 
& & & & [mJy] & [mJy] & [mJy/pixel] & [\arcsec]  \\
\hline
01037$+$1219 & WX~Psc & M9 & LPV & 145 & 3 & 0.38 & 42 \\
02168$-$0312 & $o$~Cet & M7 & Mira & 339 & 3 & 0.51 & 40  \\
07209$-$2540 & VY~CMa & M3/M4II &   & 1304 & 15 & 2.98 & 35  \\
09452$+$1330 & CW~Leo & C & & 7243 & 9 & 1.98 & 48 \\
16342$-$3814 &  & PAGB & & 602 & 3 & 0.56 & 37 \\
17411$-$3154 & AFGL~5379 & OH/IR & & 304 & 4 & 0.64 & 39  \\ 
19244$+$1115 & IRC~$+$10420 & F8Ia & & 243 & 3 & 0.46 & 38  \\
22196$-$4612 & $\pi$~Gru & S & SRb & 143 & 3 & 0.38 & 42  \\
23166$+$1655 & AFGL~3068 & C & Mira & 299 & 5 & 0.85 & 38 \\ 
\hline
\end{tabular}
\tablefoot{\tablefoottext{a}{Internal error. The absolute calibration error is about 15\% of the total flux.} \tablefoottext{b}{Corresponds to 3$\sigma$ of the 2D~Gaussian fit to the data (see Sect.~\ref{totalF}).}}
\vspace*{8mm}
\end{table}