\begin{table}%t1
\caption{\label{tab1}Summary of the physical quantities derived from the spectral features
and morphological analysis.} 
\par
%\centering
\par
\begin{tabular}{l l} 
\hline\hline \noalign{\smallskip}
Obs. Spect. properties &\\ 
\hline 
$z$ (\lya\ 1215.7)     & 5.563 \\ 
{\it FWHM} (\lya\ 1215.7) & 600 $\pm$ 100 $\rm km~s^{-1}$ \\
$EW_{0}$(\lya)   & $\rm 59^{+195}_{-29}$~\AA~(89~\AA~from phot.\tablefootmark{\star})\\
$L$(\lya)         & $\rm 3.8^{+0.3}_{-0.3}$ $\times$ 10$^{43}$ $\rm erg~s^{-1}$\\
$SFR_{0}$(\lya)  & 31 $M_{\odot}/{\rm yr}$\\
\hline\noalign{\smallskip}
$z$ (N~{\sc iv}] 1486)      & 5.553 (1486.5 \AA)\\
{\it FWHM} (N~{\sc iv}] 1486) & 400 $\pm$ 100 $\rm km~s^{-1}$ \\
$EW_{0}$(N~{\sc iv}] 1486)& $\rm 22^{+64}_{-10}$~\AA~(33~\AA~from phot.\tablefootmark{\star})\\
$L$(N~{\sc iv}] 1486) & $\rm 1.3^{+0.3}_{-0.4}$ $\times$ 10$^{43}$ $\rm erg~s^{-1}$)\\[2pt]
\hline\noalign{\smallskip}
$L$(N~{\sc v} 1240--1243)   & $<$1.06 $\pm$ 0.57 $\times$ 10$^{42}$ $\rm erg~s^{-1}$ \\
\hline\noalign{\smallskip}
$L$(Si~{\sc iv} 1393.8--1402.8) & $<$1.13 $\pm$ 0.73 $\times$ 10$^{42}$ $\rm erg~s^{-1}$ \\ 
\hline\noalign{\smallskip}
$L$(C~{\sc iv}] 1548.2--1550.8) & $<$6 $\times$ 10$^{42}$ $\rm erg~s^{-1}$ (2$\sigma$ limit)\tablefootmark{\dag}\\
\hline\noalign{\smallskip}
$V$(\lya\ - N~{\sc iv}] 1486) & +457 $\pm$ 50 $\rm km~s^{-1}$ \\ 
\hline
Morph. (rest-frame)  & (kpc physical)\\    
\hline
$r_{\rm e}~(\lya)$ (GALFIT) & 0.08 $\pm$ 0.01 kpc (ACS \wi\ band) \\
$r_{\rm e}~(1400~\AA)$ (GALFIT) & 0.11 $\pm$ 0.01 kpc (ACS \wz\ band) \\
$r_{\rm e}~(3300~\AA)$ & $<$0.9 kpc (0.6$''$ seeing, ISAAC $K$s band)\\ 
$\rm S/G~(1400~\AA)$ (SExtr.)& 0.83 (S/G, ACS \wz\ band)\\
$\rm area~(1400~\AA)$ (SExtr.)& 8.8 kpc$^{2}$ (AREAF 303 pix., \wz\ band)\\
\hline 
\end{tabular}
\tablefoot {
\tablefoottext{\dag}{Continuum not detected, 2$\sigma$ of the noise fluctuations is adopted;}
\tablefoottext{\star}{adopting the continuum derived from the ACS \wz\ band.}}
\end{table}