\begin{table}%T3
\par
\caption{\label{tab:photometry}Comparison of colours and effective temperatures as determined
from spectroscopy and microlensing techniques\tablefootmark{\dag}. }
\small%\centering
\par
\begin{tabular}{rccccc}
\hline\hline
\noalign{\smallskip}
  \multicolumn{1}{c}{Object}                 &
  \multicolumn{1}{c}{$M_{I}$}                &  
  \multicolumn{1}{c}{$(V-I)_{0}$}                &  
  \multicolumn{1}{c}{$\teff^{\rm phot}$}             &
  \multicolumn{1}{c}{$\teff$}                &
  \multicolumn{1}{c}{$(V-I)_{0}^{\rm spec}$}      \\\noalign{\smallskip}
\hline
 OGLE-2009-BLG-076S   &  4.19 & 0.67 & 5775  & 5877 & 0.65 \\  
  MOA-2009-BLG-493S   &  3.34 & 0.79 & 5325  & 5457 & 0.75 \\ 
  MOA-2009-BLG-133S   &  4.19 & 0.68 & 5730  & 5597 & 0.71 \\ 
  MOA-2009-BLG-475S   &  4.25 & 0.59 & 6150  & 5843 & 0.65 \\ 
MACHO-1999-BLG-022S   &   --  &  --  & --    & 5650 & 0.71 \\ 
 OGLE-2008-BLG-209S   &  2.52 & 0.71 & 5670  & 5243 & 0.82 \\ 
  MOA-2009-BLG-489S   &  3.39 & 0.85 & 5200  & 5634 & 0.71 \\ 
  MOA-2009-BLG-456S   &  2.76 & 0.66 & 5870  & 5700 & 0.71 \\ 
 OGLE-2007-BLG-514S   &  4.68 & 0.70 & 5760  & 5644 & 0.73 \\ 
  MOA-2009-BLG-259S   &  2.91 & 0.79 & 5450  & 5000 & 0.97 \\ 
  MOA-2008-BLG-311S   &  3.85 & 0.66 & 5880  & 5944 & 0.65 \\ 
  MOA-2008-BLG-310S   &  3.46 & 0.69 & 5780  & 5704 & 0.72 \\ 
 OGLE-2007-BLG-349S   &  4.54 & 0.78 & 5490  & 5229 & 0.87 \\ 
  MOA-2006-BLG-099S   &  3.81 & 0.74 & 5620  & 5741 & 0.70 \\ 
 OGLE-2006-BLG-265S   &  3.59 & 0.68 & 5840  & 5486 & 0.78 \\  
\hline
\end{tabular}
\tablefoot{\tablefoottext{\dagger}{Columns~2 and~3 give the absolute dereddened magnitudes and colours
based on microlensing techniques; based on the colours in 
Col.~3; Col.~4 gives the inferred effective
temperatures using the  colour--[Fe/H]--$\teff$ calibrations
by \cite{ramirez2005}; Col.~5 gives our spectroscopic
temperatures (same as in Col.~2 in Table~2); and Col.~6
gives the colours, based on the  colour--[Fe/H]--$\teff$ calibrations
by \cite{ramirez2005}, that the spectroscopic temperatures 
in Col.~5 gives.}}
\end{table}