\begin{table}%t1
\caption{\label{stellar}Stellar parameters from the fit of HD~62623 SED.}
%\centering
\par
 \begin{tabular}{cc}
\hline \hline
\noalign{\smallskip}
Parameter & Value\\
\hline
$T_{\rm eff}$ & 8250 $\pm$ 250 K\\
log~$g$ & 2.0 $\pm$ 0.5\\
$R_\star$ & 65 $\pm$ 5 $R_\odot$\\
\textit{d}& 650 $\pm$ 100 pc\\
$E(B-V)$ & 0.17 $\pm$ 0.03$^1$\\
\hline
\end{tabular}
\end{table}