\begin{table}%t2
\par
      \caption{\label{tab:tableflux}Integrated flux densities.}
         \small%\centering
\par
         \begin{tabular}{lrrrr}
           \hline\hline
           \noalign{\smallskip}
           Galaxy name  & $S_{\rm TP20~cm}$ &  $S_{\rm PI20~cm}$ & $S_{\rm TP6~cm}$ & $S_{\rm PI6~cm}$ \\
	    &   mJy  &   mJy  &  mJy  &   mJy  \\
         \hline
          NGC~4321  & $256 \pm 2$ & $17.2 \pm 0.5$ & $99.1 \pm 0.2$ & $14.1 \pm 0.2$ \\
       NGC~4388  & $178 \pm 2$ & $-$ & $81.6 \pm 0.5$ & $2.3 \pm 0.1$ \\ 
         NGC~4396  & $15.8 \pm 0.5$ & $1.5 \pm 0.2$ & $8.3 \pm 0.1$ & $1.0 \pm 0.1$ \\
       NGC~4402  & $68 \pm 2$ & $-$ &  $26.3 \pm 0.2$ & $2.5 \pm 0.1$ \\ 
       NGC~4438  & $102 \pm 3$ & $-$ & $73.9 \pm 0.3$ & $6.3 \pm 0.1$ \\ 
      NGC~4501 & $331 \pm 2 $& $10.4 \pm 0.4$ & $96.2 \pm 0.2$ & $11.2 \pm 0.1$ \\ 
  NGC~4535  & $66 \pm  1$ & $13.9 \pm 0.4$ & $28.7 \pm 0.2$ & $4.2 \pm 0.1$  \\ 
        NGC~4654  & $134.6 \pm 0.5$ & $6.0 \pm 0.3$ & $49.9 \pm 0.1$ & $3.1 \pm 0.1$ \\ 
       \hline 
       \end{tabular}
       \vspace*{4mm}
\end{table}