\begin{table}%t2
\caption{\label{tab_flux}Observed and de-reddened fluxes (full table available at the~CDS).}
\par
%\centering
\par
\begin{tabular}{lllllll}
\hline\hline\noalign{\smallskip}
ID & $c$({H$\beta$}) & Ion & $\lambda$ (\AA) & $F_{\lambda}$ & $\Delta$($F_{\lambda}$) & $I_{\lambda}$ \\
 (1)&(2)				&(3)	&(4)						&(5)				&(6)									&(7)\\
\hline
BCLMP275A &0.493 $\pm$ 0.009     &[OII] &     3727  & 186.4   &    2.2   &       256.7\\    
&&[NeIII]/HI &3968&  3.2  &     0.7  &    	4.1\\      
&&HI        & 4100 &  13.0 &      1.1 &       16.2     \\   
&&HI        & 4340 &  34.4 &      1.1 &       39.8     \\   
&&[OIII]     &4363 &  1.1  &       0.8&      	1.2      \\     
&&HI         &4861 &  100.0&       1.6    &     100.1    \\ 
&&[OIII]     &4959 &  57.3 &      1.2     & 	55.8     \\ 
&&[OIII]     &5007 &  169.9   &    2.0    &  	163.3     \\ 
&&HeI        &5876 &  13.5    &   0.9     & 	10.7     \\ 
&&[SIII]     &6312 &  1.7     &  0.8      &	1.3     \\ 
&&[NII]      &6548 &  9.1     &  1.0      &	6.5     \\ 
&&HI         &6563 &  409.6   &   2.3     &   290.2  \\ 
&&[NII]      &6584 &  28.9    &   1.1     & 	20.4  \\    
&&HeI        &6678 &  3.9     &  0.8      &	2.7     \\ 
&&[SII]      &6717 &  32.7    &   1.1     & 	22.6      \\
&&[SII]     & 6731 &  23.1    &   1.2     & 	15.9      \\
&&HeI       & 7065 &  2.6     &  0.8      &	1.7      \\
&&[ArIII]    &7135 &  9.8     &  0.8      &	6.4      \\
&&[SIII]     &9069 &  21.4    &   1.0     & 	10.2 \\
     \hline
GDK99 3 &0.448 $\pm$ 0.007 & [OII]     & 3727  & 83.3 &      1.0   &       111.4 \\
&&HI         &3835 &  6.8     &     0.6    &        8.8     \\  
&&[NeIII]    &3869 &  25.9    &   0.6      &	33.4      \\
&&HeI        &3889 &  9.8     &  0.6      &	12.6      \\
&&[NeIII]/HI &3968 &  18.0    &   0.7     & 	22.7      \\
&&HI         &4100 &  17.5    &  0.7      &  21.2   \\
&&HI         &4340 &  40.0    &  0.9      &  45.8   \\
&&[OIII]     &4363 &  3.3     &  0.5      &	3.8  \\    
&&HeI        &4471 &  3.5     &  0.5      &	3.8    \\  
&&HeII       &4686 &  0.5     &  0.5      &	0.6      \\
&&HI         &4861 &  100.0   &    1.3    &     100.1    \\
&&[OIII]     &4959 &  196.2   &    1.5    &  	191.5     \\ 
&&[OIII]     &5007 &  585.9   &    2.8    &  	565.0      \\
&&HeI        &5876 &  14.0    &   0.7     & 	11.3      \\
&&[NII]      &6548 &  6.1     &  0.4      &	4.5      \\
&&HI         &6563 &  396.4   &   1.9     &   289.9   \\
&&[NII]      &6584 &  19.2    &   0.6     & 	14.0   \\   
&&HeI        &6678 &  4.3     &  0.4      &	3.1      \\
&&[SII]      &6717 &  31.0    &   0.7     & 	22.2      \\
&&[SII]     & 6731 &  21.6    &   0.7     & 	15.4      \\
&&HeI       & 7065 &  3.4     &  0.5      &	2.3      \\
&&[ArIII]    &7135 &  14.8    &   0.5     & 	9.9      \\
\hline
\end{tabular}
\end{table}