\begin{table}%t3
%\par
%\footnotesize
\caption {\label{tab:gmodel}Parameters of the 2D Gaussian sources model \gmod.}
%\centerline
 {\begin{tabular}{lrccrrr}
\hline
\hline
\noalign{\smallskip}
Src. & \multicolumn{1}{c}{$\Delta$TS} & \ra\ & \dec\ & \multicolumn{1}{c}{$r95$} & \multicolumn{1}{c}{$\sigma$} & \multicolumn{1}{c}{Flux} \\
\hline
G1 & 1000.9 & $05^{\rm h}26.0^{\rm m}$ & $-68\deg16\arcmin$ & $20\arcmin$ & $73\arcmin \pm 5\arcmin$ & 
$19.6\pm2.2$ \\
G2 & 121.7 & $05^{\rm h}38.8^{\rm m}$ & $-69\deg18\arcmin$ & $7\arcmin$ & $12\arcmin \pm 4\arcmin$ & 
$8.5\pm2.2$ \\
\hline
\end{tabular}}
\tablefoot {Columns are identical to those in Table~\ref{tab:psmodel}, except for 
Col.~6 which gives the width $\sigma$ for each 2D~Gaussian source.}
\end{table}