\begin{table}%t2
\caption{\label{tab:psmodel}Parameters of the point source model \psmod.}
%\centerline
 {\begin{tabular}{lrccrr}
\hline\hline
\noalign{\smallskip}
Name & \multicolumn{1}{c}{$\Delta$TS} & \ra\ & \dec\ & \multicolumn{1}{c}{$r95$} & \multicolumn{1}{c}{Flux} \\
\hline
S1 & 798.1 & $05^{\rm h}38.9^{\rm m}$ & $-69\deg17'$ & $4'$ & $11.8 \pm 1.8$ \\
S2 & 163.8 & $05^{\rm h}30.2^{\rm m}$ & $-67\deg16'$ & $12'$ & $7.6 \pm 2.1$ \\
S3 & 66.5 & $05^{\rm h}27.7^{\rm m}$ & $-68\deg58'$ & $10'$ & $4.0 \pm 1.7$ \\
S4 & 33.1 & $05^{\rm h}11.2^{\rm m}$ & $-67\deg15'$ & $25'$ & $3.9 \pm 2.3$ \\
S5 & 27.8 & $04^{\rm h}55.8^{\rm m}$ & $-69\deg21'$ & $11'$ & $2.6 \pm 1.4$ \\
\hline
\end{tabular}}
\par
\tablefoot {Columns are
(1) source name,
(2) TS increase after including the respective point source in the model,
(3) Right Ascension of source,
(4) Declination of source,
(5) $95\%$ containment radius, and
(6) integrated $>$100~MeV photon flux in units of $10^{-8}$~\funit\ assuming
a power law spectral slope with free index for each source.
Quoted uncertainties are statistical only.}
\end{table}