\begin{table}%t2
\caption{\label{tbl-2}Optical and X-ray properties of the total sample.}
\par
%\centering
\par
\begin{tabular}{rcccccccrr}
\hline\hline\noalign{\smallskip}
 XID & Spectroscopic & Photometric   & $\Log \lo$ &  $\Log \lx$ & $\alphaox$  & $\Log \Lhard$ & $\Lbolmu$ & $k_{\rm bol}$ & Class\tablefootmark{a}   \\
     & redshift  &  redshift  & $\rm{[erg~s^{-1}~Hz^{-1}]}$ & $\rm{[erg~s^{-1}~Hz^{-1}]}$  & &$\rm{[erg~s^{-1}]}$   & $[L_{\odot}]$ &  \\
\hline\noalign{\smallskip}
   1    &  0.373  & $\rm 0.37^{+0.03}_{-0.01}$  & 29.49   &   26.04  &  1.32    &  44.00  &  11.53  &  12.94  &    28 \\
   2    &  1.024  & $\rm 1.05^{+0.03}_{-0.03}$  & 29.86   &   26.95  &  1.11    &  44.97  &  12.30  &   8.09  &    30 \\
   3    &  0.345  & $\rm 0.36^{+0.02}_{-0.02}$  & 29.22   &   26.00  &  1.24    &  43.98  &  11.44  &  11.15  &    29 \\
   6    &  0.360  & $\rm 0.32^{+0.02}_{-0.02}$  & 29.22   &   25.43  &  1.45    &  43.39  &  11.32  &  32.60  &    20 \\
   8    &  0.699  & $\rm 0.71^{+0.01}_{-0.03}$  & 30.00   &   26.27  &  1.43    &  44.09  &  11.98  &  29.60  &    26 \\
  10    &  0.689  & $\rm 0.68^{+0.02}_{-0.02}$  & 29.24   &   25.92  &  1.28    &  43.71  &  11.30  &  14.93  &    22 \\
  13    &  0.850  & $\rm 0.84^{+0.02}_{-0.02}$  & 29.54   &   26.06  &  1.34    &  43.98  &  11.70  &  20.06  &    24 \\
  15    &  2.033  & $\rm 2.01^{+0.03}_{-0.03}$  & 30.83   &   27.11  &  1.43    &  45.11  &  12.95  &  26.33  &    30 \\
  16    &  0.667  & $\rm 0.61^{+0.03}_{-0.01}$  & 29.32   &   25.82  &  1.34    &  43.78  &  11.38  &  15.14  &    19 \\
  17    &  1.236  & $\rm 1.28^{+0.02}_{-0.02}$  & 30.77   &   26.77  &  1.53    &  44.70  &  12.75  &  43.09  &    29 \\[2pt]
\hline                      
\end{tabular}                                   
\tablefoot {This table is presented entirely at the CDS; a portion is shown here for guidance. \\
\tablefoottext{a}{The SED model of the best-fit template is coded from~1 to~30, as~detailed in S09.}}
\end{table}