\begin{table}%T3
\caption{\label{FITS_IOC} Spectral fits of the  May 2007 EPIC spectra of \object{PG~2112+059}: Continuum properties. }
\small%\centering
\par
\begin{tabular}{llccccccrr}
\hline  \hline \noalign{\smallskip}
Fit & Model\tablefootmark{a}     
    & \multicolumn{3}{c}{Absorber}      
    & \multicolumn{2}{c}{Continuum} 
    & \multicolumn{1}{c}{Distant}  
    & \multicolumn{2}{c}{Statistic}  \\ 
    &                
    & \multicolumn{3}{c}{neutral}       
    & \multicolumn{2}{c}{power-law}
    & \multicolumn{1}{c}{Reflection} 
    & \multicolumn{2}{c}{ }  \\ 
    &                   
    & \multicolumn{1}{c}{$N_{\rm H}$\tablefootmark{b}}    & \multicolumn{1}{c}{cf\tablefootmark{c}}  & \multicolumn{1}{l}{$\xi$\tablefootmark{d}}  
    & \multicolumn{1}{c}{$\Gamma$\tablefootmark{e}} & \multicolumn{1}{c}{Norm\tablefootmark{g}} 
    & \multicolumn{1}{c}{Norm\tablefootmark{g}} 
    & \multicolumn{1}{c}{$\chi^2$}     & \multicolumn{1}{c}{$d$\tablefootmark{h}}   \\ 
    &                   
    & \multicolumn{1}{l}{{\small [$\rm 10^{22}~cm^{-2}$]}}    & \multicolumn{1}{l}{{\small }}  & \multicolumn{1}{l}{{\small [$ \log$]} }  
    &  & \multicolumn{1}{r}{\small{$[\rm  keV^{-1}~cm^{-2}~s^{-1}]$}}
    & \multicolumn{1}{l}{\small{$[\rm  keV^{-1}~cm^{-2}~s^{-1}]$}} 
    & \multicolumn{1}{c}{} & \multicolumn{1}{c}{}   \\  
\hline  \noalign{\smallskip}
1   &  $i * (p + d) $             
    &  $\rm 18.3_{-1.9}^{+2.7}$   & $\rm 0.94_{-0.02}^{+0.01}$           & $\rm 1.10_{-0.52}^{+0.45}$  
    &  $\rm 2.08_{-0.13}^{+0.16}$ & $\rm 8.74_{-2.51}^{+2.29}\; 10^{-5}$
    & $\rm 9.24_{-5.14}^{+8.03}\; 10^{-5}$
    &  93.2         & 99            \\  
2   &  $i * (p + k(r) + d) $             
    &  $\rm 0.12_{-0.02}^{+0.39}$ & $\rm 1.00_{-0.14}^{+0.00}$           & $\rm -1.36_{-0.31}^{+3.04}$  
    &  $\rm 1.53_{-0.10}^{+0.16}$ & $\rm 3.58_{-0.89}^{+0.74}\; 10^{-6}$
    & $\rm 1.45_{-0.95}^{+1.17}\; 10^{-5}$
    &  96.7         & 93            \\  
\noalign{\smallskip}
\hline  
\end{tabular}
  \tablefoot{Explanation of labels: 
 \tablefoottext{a}{the spectral models described in Table~\ref{Mod};}
 \tablefoottext{b}{equivalent column density;}
 \tablefoottext{c}{covering fraction;}
 \tablefoottext{d}{ionisation level of absorbing material $\xi=L/nr^{2}$,  as defined in {\em XSPEC};}
 \tablefoottext{e}{photon index of power-law continuum;} 
 \tablefoottext{g}{normalisation of photon flux at 1 keV;}
 \tablefoottext{h}{degrees of freedom.
The best\--fit parameters for the ionised reflector, the disk, and the black hole 
 are provided in Table~\ref{FITS_IOL}. }
All errors are provided at the 90\% confidence level.}
\end{table}