\begin{table}%t1
\caption{\label{1803_table}Circular Gaussian model-fit results for S5~1803+784.  The columns list the epoch of observation, the jet-component identification, the flux density, the radial distance of the component center from the core, the position angle of the center of the component, the FWHM major axis, and the chi-square of the~fit.}
%\centering
\par
\begin{tabular}{ccrrrrc}
\hline\hline\noalign{\smallskip}
 (1)   &(2)&  (3) &(4) & (5) &(6)&(7)\\
Epoch & Id. &  S [Jy]&  r [mas] &  $\theta$ [deg] & M.A. [mas] & $\chi^{2}$\\
\hline
       &      &          &   {1.6 GHz}   &        &      &\\
1998.92&{r} &  0.946 $\pm$ 0.142 & 0.00 &   0.0  & 0.26 $\pm$ 0.02 &38.232803\\
1998.92&{Ca}&  0.558 $\pm$ 0.084 & 1.41 $\pm$ 0.05 & 262.7 $\pm$ 0.8 & 0.69 $\pm$ 0.03  &\\
1998.92&{C4}&  0.091 $\pm$ 0.014 & 4.35 $\pm$ 0.44 & 267.8 $\pm$ 1.0 & 2.82 $\pm$ 0.30  & \\
1998.92&{C8}&  0.059 $\pm$ 0.009 & 7.99 $\pm$ 0.80 & 265.4 $\pm$ 2.0 & 1.30 $\pm$ 0.35  &\\
1998.92&{C30}&  0.259 $\pm$ 0.052& 29.67 $\pm$ 3.00&  256.7 $\pm$ 4.0& 15.72 $\pm$ 4.00& \\
\hline
2001.87&{r}   & 1.233 $\pm$ 0.169&  0.00 $\pm$ 0.01 &  0.0 $\pm$ 0.5& 0.60 $\pm$ 0.08&0.0923\\
2001.87&{Ca}  & 0.266 $\pm$ 0.047&  2.33 $\pm$ 0.71 &  --94.8 $\pm$ 1.5& 1.12 $\pm$ 0.29& \\
2001.87&{C8}  & 0.134 $\pm$ 0.019&  6.15 $\pm$ 0.98 &  --96.7 $\pm$ 1.2  & 3.17 $\pm$ 0.57& \\
2001.87&{C12}  & 0.058 $\pm$ 0.010& 9.45 $\pm$ 0.42&   --97.0 $\pm$ 0.9    & 3.70 $\pm$ 0.11&\\
2001.87&     & 0.010 $\pm$ 0.001&16.85 $\pm$ 1.10&   --91.4 $\pm$ 0.9      & 5.10 $\pm$ 1.60&\\
2001.87&{C30} & 0.241 $\pm$ 0.034&  28.94 $\pm$ 0.49&   --104.7 $\pm$ 1.0  & 14.18 $\pm$ 0.79&\\
2001.87&     & 0.045 $\pm$ 0.007&43.07 $\pm$ 0.61&   --100.0 $\pm$ 0.8       & 15.98 $\pm$ 3.20&\\
\hline 
             &      &      &{2.3 GHz}&           &      &\\
1996.42&{r} &1.642 $\pm$ 0.246&   0.00      &     0.0     &   0.00 $\pm$ 0.01 & 86.988178\\
1996.42&{Ca} &0.481 $\pm$ 0.072&   1.43 $\pm$ 0.07&   --92.2 $\pm$ 0.5&   0.01 $\pm$ 0.01 & \\
1996.42&{C4} &0.041 $\pm$ 0.006&   3.91 $\pm$ 0.39&   --85.3 $\pm$ 1.0&   0.44 $\pm$ 0.02&  \\
1996.42&{C8} &0.124 $\pm$ 0.025&   6.71 $\pm$ 0.80&   --89.4 $\pm$ 1.8&   3.19 $\pm$ 0.32&  \\
1996.42&{C12} &0.028 $\pm$ 0.010&  11.92 $\pm$ 2.38&  --102.7 $\pm$ 1.9&   1.47 $\pm$ 0.15&  \\
1996.42&{C30}&0.204 $\pm$ 0.069&  26.67 $\pm$ 3.00&  --102.2 $\pm$ 3.9&  13.47 $\pm$ 2.70&  \\
\hline  
&&&{5.0 GHz} &&&\\
1996.46&{r}&1.673 $\pm$ 0.251&   0.00&     0.0&   0.36 $\pm$ 0.02&52.027293  \\
1996.46&{Ca} &0.422 $\pm$ 0.063&   1.35 $\pm$ 0.07&   --96.8 $\pm$ 1.1&   0.86 $\pm$ 0.04& \\
1996.46&{} &0.090 $\pm$ 0.014&   5.58 $\pm$ 0.60&   --89.9 $\pm$ 1.54&   4.44 $\pm$ 0.44& \\
\hline
1997.15&{r} &1.302 $\pm$ 0.195  &0.00   & 0.0  &0.01 $\pm$ 0.01 &27.458208\\
1997.15&{C1} &0.274 $\pm$ 0.041 & 0.87 $\pm$ 0.04  &--94.2 $\pm$ 0.9 & 0.33 $\pm$ 0.07& \\
1996.15&{Ca} &0.218 $\pm$ 0.033 & 1.73 $\pm$ 0.09  &--97.3 $\pm$ 0.7 & 0.53 $\pm$ 0.08& \\
1997.15&{C4} &0.017 $\pm$ 0.002 & 3.95 $\pm$ 0.40 & --85.0 $\pm$ 1.4 & 0.47 $\pm$ 0.10& \\
1997.15&{C8} &0.081 $\pm$ 0.016 & 6.36 $\pm$ 0.66 & --99.7 $\pm$ 1.9 & 4.42 $\pm$ 0.44& \\
1997.15&{C30} &0.067 $\pm$ 0.013 &27.87 $\pm$ 2.81 &--107.6 $\pm$ 3.9 & 6.48 $\pm$ 0.84&\\
\hline
1999.35&{r}&  1.774 $\pm$ 0.266 & 0.00  &  0.00&  0.30 $\pm$ 0.02&15.738181 \\
1999.35&{C1}&0.033 $\pm$ 0.005 & 0.77 $\pm$ 0.04 & --69.4 $\pm$ 0.5 & 0.00 $\pm$ & \\
1999.35&{Ca} &0.507 $\pm$ 0.189 & 1.31 $\pm$ 0.07 & --93.0 $\pm$ 1.5 & 0.81 $\pm$ 0.12& \\
1999.35&{C4} &0.031 $\pm$ 0.025 & 3.46 $\pm$ 0.35 & --98.1 $\pm$ 1.1 & 0.81 $\pm$ 0.41& \\
\hline
1999.44&{r} &1.423 $\pm$ 0.213   &0.00     &0.0   &0.21 $\pm$ 0.01  &\\
1999.44&{C1} &0.450 $\pm$ 0.067  &0.53 $\pm$ 0.03   &--75.7 $\pm$ 1.0   &0.22 $\pm$ 0.01  & \\
1999.44&{Ca} &0.274 $\pm$ 0.041   &1.34 $\pm$ 0.07   &--89.2 $\pm$ 0.7   &0.49 $\pm$ 0.03  & \\
1999.44&{C2} &0.101 $\pm$ 0.015   &1.86 $\pm$ 0.09  &--100.6 $\pm$ 0.8   &0.78 $\pm$ 0.08  & \\
1999.44&{C4}   &0.071 $\pm$ 0.011   &4.81 $\pm$ 0.48   &--94.8 $\pm$ 1.1   &2.94 $\pm$ 0.30  &\\
1999.44&{C12}   &0.033 $\pm$ 0.006  &10.00 $\pm$ 1.00   &--93.9 $\pm$ 1.6   &1.99 $\pm$ 0.20  &\\
1999.44&{C30}   &0.099 $\pm$ 0.020  &28.27 $\pm$ 2.83  &--104.2 $\pm$ 2.7  &14.06 $\pm$ 2.58  &\\
\hline
2001.29& {r} &   1.602 $\pm$ 0.246 &  0.00 $\pm$ 0.01 &   0.0 $\pm$ 0.5& 0.21 $\pm$ 0.05& 0.0477   \\
2001.29& {C1}   &   0.511 $\pm$ 0.071 &  0.85 $\pm$ 0.08 &   --81.1 $\pm$ 2.1& 0.43 $\pm$ 0.11&   \\
2001.29& {Ca}   &   0.228 $\pm$ 0.069 &  1.62 $\pm$ 0.38 &   --91.7 $\pm$ 3.5& 0.72 $\pm$ 0.22&  \\
2001.29& {C4}   &   0.045 $\pm$ 0.023 &  3.89 $\pm$ 0.18 &   --84.7 $\pm$ 4.9& 1.38 $\pm$ 0.61&    \\
2001.29& {C8}   &   0.052 $\pm$ 0.022 &  6.07 $\pm$ 0.24 &   --98.3 $\pm$ 0.8& 2.05 $\pm$ 0.85&    \\
2001.29& {C12}   &   0.039 $\pm$ 0.018 &  9.23 $\pm$ 0.35 &   --95.1 $\pm$ 1.7& 3.22 $\pm$ 0.68&    \\
2001.29& {C30}  &   0.112 $\pm$ 0.018 &  29.12 $\pm$ 0.59 &   --103.3 $\pm$ 1.2& 11.83 $\pm$ 0.19&   \\
\hline 
&&&{8.4 GHz} &&&\\
1993.88&{r}&  1.390 $\pm$ 0.208&  0.00 &   0.00&  0.01 $\pm$  &2.8677791\\
1993.88&{C0}& 0.014 $\pm$ 0.002&  0.25 $\pm$ 0.01 & --69.3 $\pm$ 0.7&  0.00 $\pm$ 0.01 & \\
1993.88&{Cx}& 0.262 $\pm$ 0.039&  0.33 $\pm$ 0.02 & --99.5 $\pm$ 0.4&  0.00 $\pm$ 0.01 & \\
1993.88&{Ca}& 0.263 $\pm$ 0.039&1.45 $\pm$ 0.07   & --91.8 $\pm$ 0.8&  0.36 $\pm$ 0.02 & \\
1993.88&{C4}& 0.043 $\pm$ 0.016&3.07 $\pm$ 0.11 & --87.5 $\pm$ 1.2&  1.03 $\pm$ 0.17 &\\
\hline
1997.90&{r}&  2.467 $\pm$ 0.370&  0.00 &   0.00&  0.45 $\pm$ 0.02 &6.8563583\\
1997.90&{Ca}& 0.719 $\pm$ 0.108&  1.39 $\pm$ 0.07 & --97.4 $\pm$ 1.3&  0.68 $\pm$ 0.03 & \\
1997.90&{C4}& 0.127 $\pm$ 0.019&  4.00 $\pm$ 0.45 & --89.5 $\pm$ 1.3&  1.31 $\pm$ 0.13 & \\
\hline
1997.93&{r}&  1.353 $\pm$ 0.203&  0.00 &   0.00&  0.12 $\pm$ 0.01 &1.7453468\\
1997.93&{C0}& 0.270 $\pm$ 0.041&  0.28 $\pm$ 0.01 & --83.5 $\pm$ 1.9&  0.36 $\pm$ 0.02 & \\
1997.93&{C1}& 0.176 $\pm$ 0.026&  1.01 $\pm$ 0.05 & --86.6 $\pm$ 0.6&  0.44 $\pm$ 0.02 & \\
1997.93&{Ca}& 0.212 $\pm$ 0.032&  1.54 $\pm$ 0.08 & --98.0 $\pm$ 0.5&  0.45 $\pm$ 0.02 & \\
1997.93&{C2}& 0.035 $\pm$ 0.005&  2.23 $\pm$ 0.11 & --97.0 $\pm$ 1.0&  0.76 $\pm$ 0.04 &\\
1997.93&{C4}& 0.004 $\pm$ 0.001&  3.16 $\pm$ 0.32 &--109.5 $\pm$ 1.0&  0.28 $\pm$ 0.03 &\\
1997.93&{C4}& 0.028 $\pm$ 0.004&  3.89 $\pm$ 0.39 & --89.5 $\pm$ 1.0&  1.38 $\pm$ 0.14 &\\
1997.93&{C8}& 0.039 $\pm$ 0.008&  7.71 $\pm$ 0.90 & --96.6 $\pm$ 3.0&  3.00 $\pm$ 0.80 &\\
\hline
1999.41&{r}&1.257 $\pm$ 0.188&   0.00  &  0.0 & 0.12 $\pm$ &1.5628510  \\
1999.41&{C0}&0.496 $\pm$ 0.074&   0.33 $\pm$ 0.02&   --79.7 $\pm$ 1.1&   0.28 $\pm$ 0.01&  \\
1999.41&{C1}&0.171 $\pm$ 0.026&   0.92 $\pm$ 0.05&   --78.9 $\pm$ 0.5&   0.43 $\pm$ 0.02&  \\
1999.41&{Ca}&0.140 $\pm$ 0.021&   1.50 $\pm$ 0.08&   --92.5 $\pm$ 0.5&   0.32 $\pm$ 0.02&  \\
1999.41&{C2}&0.086 $\pm$ 0.013&   1.84  $\pm$  0.09&   --96.9 $\pm$ 0.5&   0.71 $\pm$ 0.04&  \\
1999.41&{C4}&0.046 $\pm$ 0.007&   3.43 $\pm$ 0.34&   --93.9 $\pm$ 1.0&   1.74 $\pm$ 0.09&  \\
1999.41&{C8}&0.025 $\pm$ 0.004&   6.47 $\pm$ 0.65&   --95.7 $\pm$ 0.9&   2.43 $\pm$ 0.24&  \\
1999.41&{C12}&0.020 $\pm$ 0.003&   9.40 $\pm$ 0.90&   --95.6 $\pm$ 1.0&   2.96 $\pm$ 0.30&  \\
1999.41&{C30}&0.036 $\pm$ 0.006&  27.91 $\pm$ 2.40&  --103.1 $\pm$ 3.2&   7.51 $\pm$ 0.75& \\
\hline
2001.09&{r}&   1.317 $\pm$ 0.146 &  0.00 $\pm$ 0.01 &0.0 $\pm$ 0.5  & 0.13 $\pm$ 0.09 & 1.1756 \\
2001.09&{C0}  &   0.437 $\pm$ 0.068 &  0.37 $\pm$ 0.07 &--81.0 $\pm$ 1.1 & 0.30 $\pm$ 0.03  & \\
2001.09&{C1}  &   0.259 $\pm$ 0.094 &  0.93 $\pm$ 0.12 &--79.4 $\pm$ 1.7 & 0.42 $\pm$ 0.19   & \\
2001.09&{Ca}  &   0.179 $\pm$ 0.032 &  1.47 $\pm$ 0.04 & --91.6 $\pm$ 0.8& 0.45 $\pm$ 0.11  &  \\
2001.09&{C2}  &   0.059 $\pm$ 0.008 & 1.95 $\pm$ 0.04& --93.7 $\pm$ 0.6& 0.72 $\pm$ 0.04   & \\
2001.09&{C4}  &   0.055 $\pm$ 0.010 &  4.11 $\pm$ 0.33 & --91.0 $\pm$ 0.9 & 2.44 $\pm$ 0.64 &  \\
2001.09&{C8}  &   0.027 $\pm$ 0.003 & 6.12 $\pm$ 0.15& --96.5 $\pm$ 0.3& 2.29 $\pm$ 0.13   & \\
2001.09&{C12}  &   0.024 $\pm$ 0.008 & 8.95 $\pm$ 0.73& --94.1 $\pm$ 0.5& 2.90 $\pm$ 0.37  &  \\
2001.09&{C30} &   0.018 $\pm$ 0.003 &27.61 $\pm$ 0.12& --103.8 $\pm$ 0.3& 7.18 $\pm$ 0.19&    \\
\hline 
&&&{15 GHz} &&&\\
1994.67&{r}&1.115 $\pm$ 0.167 & 0.00  &  0.00 & 0.13 $\pm$ 0.01 &0.43219569\\
1994.67&{C0}&0.176 $\pm$ 0.030 & 0.39 $\pm$ 0.03  &--92.8 $\pm$ 3.9 & 0.40 $\pm$ 0.05 & \\
1994.67&{Ca}&0.097 $\pm$ 0.015 & 1.46 $\pm$ 0.04  &--93.9 $\pm$ 1.5 & 0.61 $\pm$ 0.05 & \\
1994.67&{C4}&0.030 $\pm$ 0.010 & 3.43 $\pm$ 0.10  &--90.6 $\pm$ 1.7 & 1.57 $\pm$ 0.12 &\\
\hline
1996.38& {r} & 1.559 $\pm$ 0.234 &  0.00&     0.00 &  0.12 $\pm$ 0.01&0.43219569  \\
1996.38& {C0} & 0.572 $\pm$ 0.086 &  0.25 $\pm$ 0.01&   --93.7 $\pm$ 2.1 &  0.23 $\pm$ 0.01&  \\
1996.38& {C1} & 0.094 $\pm$ 0.014 &  0.67 $\pm$ 0.03&   --98.0 $\pm$ 1.1 &  0.35 $\pm$ 0.02&  \\
1996.38& {Ca} & 0.191 $\pm$ 0.029 &  1.44 $\pm$ 0.07&   --92.9 $\pm$ 0.6 &  0.45$\pm0.02$&  \\
1996.38& {C2} & 0.124 $\pm$ 0.019 &  1.74 $\pm$ 0.09&   --96.1 $\pm$ 0.5 &  0.45 $\pm$ 0.02&  \\
1996.38& {C4} & 0.022 $\pm$ 0.003 &  3.38 $\pm$ 0.34&   --86.6 $\pm$ 1.0 &  1.43 $\pm$ 0.14&  \\
\hline
1997.20& {r}  & 1.362 $\pm$ 0.204&  0.00         &     0.00     &  0.11 $\pm$ 0.01&1.4601196 \\
1997.20& {C0} & 0.295 $\pm$ 0.044&  0.30 $\pm$ 0.02&--89.0 $\pm$ 1.6 &  0.31 $\pm$ 0.02&  \\
1997.20& {C1} & 0.135 $\pm$ 0.020 &  0.84 $\pm$ 0.04&--90.3 $\pm$ 0.9 &  0.55 $\pm$ 0.03&  \\
1997.20& {Ca} & 0.111 $\pm$ 0.017 &  1.47 $\pm$ 0.07&--96.5 $\pm$ 0.5 &  0.39 $\pm$ 0.02&  \\
1997.20& {C2} & 0.101 $\pm$ 0.015 &  1.78 $\pm$ 0.09&--96.3 $\pm$ 0.5 &  0.59 $\pm$ 0.03&  \\
1997.20& {C4} & 0.030 $\pm$ 0.005 &  3.13 $\pm$ 0.31&   --90.9 $\pm$ 1.0 &  1.64 $\pm$ 0.16&  \\
1997.20& {C8} & 0.034 $\pm$ 0.005 &  6.81 $\pm$ 0.68&   --97.5 $\pm$ 1.0 &  3.40 $\pm$ 0.34&  \\
\hline
1998.22& {r} & 1.089 $\pm$ 0.163 &  0.00&     0.00 &  0.25 $\pm$ 0.01&0.44147467   \\
1998.22& {C0}&0.916 $\pm$ 0.137&  0.23 $\pm$ 0.01    &   --77.2 $\pm$ 5.3 &  0.30 $\pm$ 0.02&  \\
1998.22& {C1} & 0.119 $\pm$ 0.018 &  0.93 $\pm$ 0.05 &   --83.7 $\pm$ 1.2 &  0.47 $\pm$ 0.02&  \\
1998.22& {Ca} & 0.247 $\pm$ 0.037 &  1.49 $\pm$ 0.07 &   --95.0 $\pm$ 0.7 &  0.46 $\pm$ 0.02&  \\
1998.22& {C2} & 0.049 $\pm$ 0.007 &  2.04 $\pm$ 0.20      &   --96.8 $\pm$ 1.0 &  0.62 $\pm$ 0.06&  \\
1998.22& {C4} & 0.038 $\pm$ 0.008 &  3.40 $\pm$ 0.34      &   --89.6 $\pm$ 1.4 &  2.07 $\pm$ 0.21&  \\
\hline
1998.84&{r}& 1.113 $\pm$ 0.167 &  0.00 &    0.00 &  0.08 $\pm$ 0.01&1.4787256  \\
1998.84& {C0}& 0.650 $\pm$ 0.098 &  0.18 $\pm$ 0.02 &  --86.2 $\pm$ 9.4 &  0.35 $\pm$ 0.02&  \\
1998.84& {C1}& 0.102 $\pm$ 0.015 &  0.92 $\pm$ 0.05 &  --75.6 $\pm$ 2.8 &  0.60 $\pm$ 0.03& \\
1998.84& {Ca}& 0.141 $\pm$ 0.021 &  1.42 $\pm$ 0.07 &  --92.4 $\pm$ 0.6 &  0.22 $\pm$ 0.01& \\
1998.84& {C2}& 0.147 $\pm$ 0.022 &  1.67 $\pm$ 0.08 &  --99.0 $\pm$ 1.3 &  0.53 $\pm$ 0.03& \\
\hline
1999.57& {r} &2.015 $\pm$ 0.302&   0.00      &     0.0     &   0.12 $\pm$ 0.01&1.1925775 \\
1999.57& {C0} &0.430 $\pm$ 0.064&   0.33 $\pm$ 0.02&   --77.0 $\pm$ 2.1&   0.26 $\pm$ 0.01& \\
1999.57& {C1} &0.178 $\pm$ 0.027&   0.84 $\pm$ 0.04&   --77.1 $\pm$ 0.9&   0.31 $\pm$ 0.02& \\
1999.57& {Ca} &0.048 $\pm$ 0.007&   1.32 $\pm$ 0.07&   --83.5 $\pm$ 0.6&   0.01 $\pm$ &  \\
1999.57& {C2} &0.131 $\pm$ 0.020&   1.57 $\pm$ 0.08&   --92.5 $\pm$ 0.6&   0.42 $\pm$ 0.07&  \\
1999.57& {  } &0.040 $\pm$ 0.006&   1.98 $\pm$ 0.10&   --93.4 $\pm$ 1.0&   0.68 $\pm$ 0.11&  \\
1999.57& {C4} &0.032 $\pm$ 0.005&   3.28 $\pm$ 0.33&   --92.8 $\pm$ 1.1&   1.57 $\pm$ 0.14&  \\
1999.57& {  } &0.007 $\pm$ 0.002&   5.14 $\pm$ 0.51&   --88.7 $\pm$ 2.0&   1.01 $\pm$ 0.18&  \\
1999.57& {C8} &0.020 $\pm$ 0.004&   7.38 $\pm$ 0.74&   --96.2 $\pm$ 2.0&   2.47 $\pm$ 0.34&  \\
1999.57& {C12} &0.006 $\pm$ 0.001&  10.26 $\pm$ 1.16&   --91.7 $\pm$ 2.0&   3.04 $\pm$ 0.71&  \\
\hline
1999.85& {r} &1.603 $\pm$ 0.241 & 0.00  &  0.0 & 0.090 $\pm$ 0.01 &1.1036355\\
1999.85& {C0} &0.449 $\pm$ 0.067 & 0.28 $\pm$ 0.05 & --79.6 $\pm$ 2.9&  0.24 $\pm$ 0.01& \\
1999.85& {C1} &0.168 $\pm$ 0.024 & 0.94 $\pm$ 0.06 & --76.2 $\pm$ 1.8&  0.39 $\pm$ 0.02& \\
1999.85& {Ca} &0.093 $\pm$ 0.015 & 1.38 $\pm$ 0.17 & --86.8 $\pm$ 0.6&  0.17 $\pm$ 0.01& \\
1999.85& {C2} &0.098 $\pm$ 0.015 & 1.64 $\pm$ 0.10 & --94.5 $\pm$ 0.5&  0.42 $\pm$ 0.02& \\
1999.85& {C4} &0.039 $\pm$ 0.007 & 2.44 $\pm$ 0.13 & --97.5 $\pm$ 2.8&  1.27 $\pm$ 0.13& \\
1999.85& {} &0.021 $\pm$ 0.004 & 4.55 $\pm$ 0.12 & --88.1 $\pm$ 1.0  &1.61 $\pm$ 0.16& \\
1999.85& {C8} &0.013 $\pm$ 0.003 & 7.86 $\pm$ 0.18 & --97.6 $\pm$ 2.0  &2.05 $\pm$ 0.21& \\
\hline
2000.46& {r} & 1.606 $\pm$ 0.241&  0.00&     0.00 &  0.13 $\pm$ 0.01&0.46644555  \\
2000.46& {C0} & 0.364 $\pm$ 0.055&  0.35 $\pm$ 0.02 & --79.2 $\pm$ 1.8&0.27 $\pm$ 0.01& \\
2000.46& {C1} & 0.144 $\pm$ 0.022 &  0.96 $\pm$ 0.05& --79.3 $\pm$ 0.7&0.36 $\pm$ 0.02& \\
2000.46& {Ca} & 0.134 $\pm$ 0.020 &  1.44 $\pm$ 0.07& --88.8 $\pm$ 0.5&0.29 $\pm$ 0.02&\\
2000.46& {C2} & 0.105 $\pm$ 0.016 &  1.70 $\pm$ 0.03& --92.1 $\pm$ 0.7&0.62 $\pm$ 0.03&\\
2000.46& {C4} & 0.055 $\pm$ 0.008 &  3.61 $\pm$ 0.72& --91.9 $\pm$ 1.1&1.95 $\pm$ 0.20&\\
\hline
2002.13&{r}&   1.702 $\pm$   0.251&0.00   $\pm$    0.01&     0.0 $\pm$   0.3& 0.11 $\pm$ 0.02&1.3686\\
2002.13&{C0}&  0.151 $\pm$   0.023&0.37 $\pm$  0.01&  --94.6 $\pm$   1.2& 0.29 $\pm$ 0.01& \\
2002.13&{B3}&  0.008 $\pm$   0.001&0.76 $\pm$  0.02&   --89.8 $\pm$   1.2& 0.14 $\pm$ 0.03& \\
2002.13&{C1}&  0.072 $\pm$   0.012&1.02 $\pm$  0.02&   --75.2 $\pm$   0.5& 0.35 $\pm$ 0.02&\\
2002.13&{Ca}&  0.318 $\pm$   0.043&1.43 $\pm$  0.02&   --88.1 $\pm$   0.5& 0.48 $\pm$ 0.05&\\
2002.13&{C2}&  0.029 $\pm$   0.004&2.02 $\pm$  0.02&   --94.0 $\pm$   0.5& 0.68 $\pm$ 0.01&\\
2002.13&{C4}&  0.031 $\pm$   0.005&3.61 $\pm$  0.05&   --89.0 $\pm$   0.8& 1.94 $\pm$ 0.02&\\
2002.13&{C8}&  0.044 $\pm$   0.007&6.37 $\pm$  0.09&   --95.1 $\pm$   0.8& 3.40 $\pm$ 0.02&\\
2002.13&{C12}&  0.009 $\pm$   0.001&11.36 $\pm$     0.37&   --94.6 $\pm$   1.9& 3.37 $\pm$ 0.67&\\
\hline
2003.10 &{r}&   1.245 $\pm$   0.179&0.00 $\pm$  0.02&    0.0 $\pm$     0.2& 0.10 $\pm$ 0.03&1.5375\\
2003.10&{C0}&  0.310 $\pm$   0.048&0.31 $\pm$  0.03&   --76.9 $\pm$   1.7& 0.27 $\pm$ 0.01& \\
2003.10&{C1}&  0.039 $\pm$   0.008&0.66 $\pm$  0.03&   --84.2 $\pm$   1.3& 0.09 $\pm$ 0.04& \\
2003.10&{Ca}&  0.287 $\pm$   0.058&1.42 $\pm$  0.01&   --88.4 $\pm$   0.3& 0.35 $\pm$ 0.09&\\
2003.10&{C2}&  0.113 $\pm$   0.045&1.78 $\pm$  0.24&   --89.1 $\pm$   0.8& 1.00 $\pm$ 0.26&\\
2003.10&{B3}&  0.035 $\pm$   0.016&2.64 $\pm$  0.38&   --88.9 $\pm$   1.2& 1.17 $\pm$ 0.19&\\
2003.10&{C4}&  0.039 $\pm$   0.006&4.67 $\pm$  0.32&   --90.0 $\pm$   0.8& 2.01 $\pm$ 0.35&\\
2003.10&{C8}&  0.031 $\pm$   0.004&7.44 $\pm$  0.49&   --97.1 $\pm$   0.7& 3.00 $\pm$ 0.16&\\
2003.10&{C12}&  0.015 $\pm$   0.004&12.37 $\pm$     0.78&   --93.2 $\pm$   0.6& 4.31 $\pm$ 0.64&\\
\hline
2004.27&{r}&   1.264 $\pm$   0.185&0.00 $\pm$  0.01&   0.0 $\pm$     0.1& 0.09 $\pm$ 0.03&1.4844\\
2004.27&{C0}&  0.117 $\pm$   0.017&0.33 $\pm$  0.01&   --89.1 $\pm$   1.3& 0.25 $\pm$ 0.01& \\
2004.27&{C1}&  0.124 $\pm$   0.018&1.00 $\pm$  0.05&   --78.0 $\pm$   0.6& 0.38 $\pm$ 0.05& \\
2004.27&{Ca}&  0.185 $\pm$   0.028&1.47 $\pm$  0.02&   --90.6 $\pm$   0.4& 0.31 $\pm$ 0.06&\\
2004.27&{C2}&  0.046 $\pm$   0.009&1.76 $\pm$  0.06&   --95.6 $\pm$   0.5& 0.49 $\pm$ 0.04&\\
2004.27&{C4}&  0.044 $\pm$   0.007&3.64 $\pm$  0.09&   --86.9 $\pm$   0.9& 1.83 $\pm$ 0.05&\\
2004.27&{C8}&  0.046 $\pm$   0.007&6.42 $\pm$  0.24&   --96.3 $\pm$   0.8& 2.71 $\pm$ 0.08&\\
2004.27&{C12}&  0.014 $\pm$   0.003&9.81 $\pm$  0.30&   --96.3 $\pm$   0.6& 3.09 $\pm$ 0.55&\\
\hline
2005.30&{r}&   0.819 $\pm$   0.119&0.00 $\pm$  0.01&   0.0 $\pm$     0.2& 0.12 $\pm$ 0.04&0.9761\\
2005.30&{C0}&  0.160 $\pm$   0.028&0.22 $\pm$  0.02&   --61.6 $\pm$   0.3 & 0.05 $\pm$ 0.03& \\
2005.30&{C1}&  0.091 $\pm$   0.014&0.61 $\pm$  0.02&   --75.8 $\pm$   1.3 & 0.35 $\pm$ 0.02& \\
2005.30&{Ca}&  0.297 $\pm$   0.045&1.47 $\pm$  0.01&   --87.4 $\pm$   0.6 & 0.42 $\pm$ 0.03&\\
2005.30&{C2}&  0.040 $\pm$   0.011&1.98 $\pm$  0.06&   --84.1 $\pm$   0.5 & 0.51 $\pm$ 0.07&\\
2005.30&{C4}&  0.018 $\pm$   0.005&3.98 $\pm$  0.09&   --84.9 $\pm$   0.8& 1.12 $\pm$ 0.34&\\
2005.30&{C8}&  0.064 $\pm$   0.009&6.08 $\pm$  0.30&   --94.7 $\pm$   1.0& 3.04 $\pm$ 0.23&\\
2005.30&{C12}&  0.010 $\pm$   0.005&9.80 $\pm$  0.97&   --91.9 $\pm$   2.5& 2.90 $\pm$ 0.70&\\
\hline
2005.68&{r}&   1.381 $\pm$   0.203&0.00 $\pm$  0.01&   0.0 $\pm$     0.3& 0.09 $\pm$ 0.02&0.8685\\
2005.68&{C0}&  0.146 $\pm$   0.022&0.25 $\pm$  0.03&   --74.2 $\pm$   1.5 & 0.21 $\pm$ 0.02& \\
2005.68&{C1}&  0.048 $\pm$   0.008&0.75 $\pm$  0.02&   --78.0 $\pm$   0.8 & 0.32 $\pm$ 0.03& \\
2005.68&{Ca}&  0.244 $\pm$   0.064&1.44 $\pm$  0.02&   --89.0 $\pm$   0.3 & 0.31 $\pm$ 0.09&\\
2005.68&{C2}&  0.120 $\pm$   0.019&1.71 $\pm$  0.04&   --88.8 $\pm$   0.5 & 0.55 $\pm$ 0.02&\\
2005.68&{C4}&  0.021 $\pm$   0.007&3.44 $\pm$  0.29&   --87.0 $\pm$   1.3 & 1.50 $\pm$ 0.20&\\
2005.68&{B3}&  0.013 $\pm$   0.001&4.72 $\pm$  0.06&   --83.7 $\pm$   0.4 & 1.16 $\pm$ 0.03&\\
2005.68&{C8}&  0.058 $\pm$   0.006&6.37 $\pm$  0.11&   --97.4 $\pm$   0.6 & 2.49 $\pm$ 0.18&\\
2005.68&{C12}&  0.022 $\pm$   0.001&8.98 $\pm$  0.20&   --93.7 $\pm$   0.7& 3.68 $\pm$ 0.22&\\
\hline
\end{tabular}
\end{table}