\begin{table}%t2
\caption{\label{tab2}Comparison of the measured planet-to-star flux ratio and the values predicted by our three models. See text for details.}
\small
%\centering
\par
\begin{tabular}{lccccccl}
\hline\hline\noalign {\smallskip}
  & CoRoT white & CoRoT red & IRAC 4.5~$\mu$m &  IRAC 8~$\mu$m  & $\chi^2$\\ 
\hline \noalign {\smallskip}
Measured & $0.0060 \pm 0.0020$\tablefootmark{\ast} & $0.0102 \pm 0.0020$\tablefootmark{\ast\ast} & $0.510 \pm 0.041$ & $0.41 \pm 0.11$&  \\
Model 1 & 0.0021&  0.0022 &  0.270  & 0.418  & 55.1 \\  
Model 2 & 0.0062 &  0.0075 &  0.449  & 0.587  & 6.6 \\ 
Model 3 & 0.0068 & 0.0053 & 0.528 & 0.740 & 15.2 \\  
\hline  
\end{tabular}
\tablefoot{\tablefoottext{\ast}{From Alonso et~al. (\cite{Alonso2009b}).} \tablefoottext{\ast\ast}{From Snellen et~al. (\cite{Snellen2009b}).} }
\end{table}