\begin{table}%ta.2
\caption{\label{Tab:list}List of detected point sources in the
    NACO $H$, $K{\rm s}$, and $L'$-band observations.  We only include the
    first ten lines of the table in the printed edition of  this work. } 
    \vspace*{-1.5mm}
\par
%\centerline
 {
\begin{tabular}{lc cc cc cc cc}
  \hline \hline\noalign{\smallskip}
  ID & $R_{\rm SgrA*}$\tablefootmark{a} & RA\tablefootmark{b} & Dec\tablefootmark{c} & $H$\tablefootmark{d} &  $\Delta H$\tablefootmark{e}  & $K{\rm s}$\tablefootmark{f} & $\Delta K{\rm s}$\tablefootmark{g}  & $L'$\tablefootmark{h} &  $\Delta L'$\tablefootmark{i} \\
  & [$''$] & [$''$] & [$''$] &  &  & & & &  \\
\hline
1 & 0.028 & 0.009 & --0.027 & 17.50 & 0.05 & 15.7 & 0.04 & 0.0$^{k}$ & 0.0 \\ 
2 & 0.107 & 0.031 & --0.102 & 18.19 & 0.06 & 16.39 & 0.04 & 0 & 0 \\ 
3 & 0.163 & --0.006 & 0.163 & 16.00 & 0.02 & 14.13 & 0.01 & 12.84 & 0.03 \\ 
4 & 0.231 & 0.189 & 0.132 & 16.93 & 0.03 & 15 & 0.01 & 0 & 0 \\ 
5 & 0.245 & --0.231 & --0.081 & 18.69 & 0.07 & 16.75 & 0.05 & 0 & 0 \\ 
6 & 0.265 & 0.022 & --0.264 & 16.53 & 0.03 & 14.7 & 0.02 & 0 & 0 \\ 
7 & 0.321 & 0.296 & 0.124 & 16.47 & 0.02 & 14.61 & 0.01 & 0 & 0 \\ 
8 & 0.347 & --0.274 & 0.213 & 17.45 & 0.03 & 15.66 & 0.09 & 14.35 & 0.06 \\ 
9 & 0.354 & --0.053 & 0.35 & 17.22 & 0.03 & 15.39 & 0.02 & 0 & 0 \\ 
10 & 0.363 & 0.02 & --0.363 & 16.23 & 0.03 & 14.12 & 0.01 & 12.6 & 0.03 \\
 \hline
\end{tabular}}
\vspace*{-1.5mm}
\tablefoot{
\tablefoottext{a}{Distance from Sgr~A* projected on the sky.}
\tablefoottext{b}{Offset in right ascension from   Sgr~A*. Uncertainties in the astrometric positions can be as large   as $\sim$0.1$''$ because high precision astrometry was not at the focus
  of this work. The conversion to offsets from Sgr~A* was done by
  assuming a pixel scale of $0.027''$ per pixel (ESO NACO manual). The
  camera rotation angle was assumed $0$~deg east of north and no
  camera distortion solution was applied.}
\tablefoottext{c}{Offset in declination from   Sgr~A*. For more information see also footnote$^{b}$.}
\tablefoottext{d}{Magnitude in the NACO $H$ band filter.}
\tablefoottext{e}{Uncertainty in $H$, obtained by quadratically
  combining the formal uncertainty from PSF fitting, based on Gaussian
  read-out noise and Poisson photon noise, and the uncertainty due to
  the limited knowledge of the PSF. The 1$\sigma$ uncertainty of the
  zero point, $\Delta ZP_{H}=0.06$, is not included in this column and
  has to be taken into account when considering \emph{absolute}
  photometry.}
\tablefoottext{f}{Magnitude in the NACO $K{\rm s}$ band filter.}
\tablefoottext{g}{Uncertainty in $K{\rm s}$. For more information see
  also footnote $^{e}$. The 1$\sigma$ uncertainty of the
  zero point is $\Delta ZP_{K{\rm s}}=0.06$.}
\tablefoottext{h}{Magnitude in the NACO $L'$ band filter.}
\tablefoottext{i}{Uncertainty in $L'$. For more information see
  also footnote $^{e}$. The 1$\sigma$ uncertainty of the
  zero point is $\Delta ZP_{L'}=0.15$.}
\tablefoottext{j}{A value of $0.0$ in the table indicates that
  the corresponding measurement is not available.}}
\end{table}