\begin{table}%t2
\caption{Photometric results of (42355) Typhon}
\label{tab:pho}
%%\centerline

{\begin{tabular}{lcccccc}
\hline\hline            
 Ref. & $V$ & ($V-R$) & ($V-I$) & ($V-J$) & ($V-H$) & ($V-K$) \\
\hline                       
 $a$          &$20.50\pm0.08$&$0.50\pm0.10$&$ 0.80\pm0.10$ & $           $&$             $&$            $ \\
 $b$          &$            $&$0.55\pm0.05$&$ 0.99\pm0.06$ & $1.83\pm0.09$&$ 2.18\pm0.12 $&$ 2.34\pm0.13$ \\
 $c$          &$20.34\pm0.02$&$0.48\pm0.04$&$ 0.94\pm0.03$ & $1.56\pm0.04$&$ 2.01\pm0.05 $&$ 2.17\pm0.05$ \\
 $d$          &              &             &$ 0.96\pm0.02$ &              &               &               \\
\hline
\end{tabular}}
\par
\tablefoot{
$a$ -- This work.
$b$ -- Doressoundiram et~al. (\cite{dores07}).
$c$ -- DeMeo et~al. (\cite{demeo08}).
$d$ -- Benecchi et~al. (\cite{benec08}), value only for the primary body.}
\end{table}