\begin{table}%t2
  %%\centering

\par
  \caption{\label{lifetime_table}Overview of the measured lifetimes of MBPs.}
  \begin{tabular}{l l l}
    \hline\hline
    Temporal cadence & Fit parameter & Fit parameter   \\
     $\Delta t$ [${\rm s}$]  & $N_0$ & $\lambda$ [${\rm min^{-1}}$]  \\
    \hline
    11 &$ 990 \pm 70 $&  $-1.09 \pm 0.03$  \\
    22 &$ 770 \pm 40 $&  $-0.76 \pm 0.02$ \\
    33 &$ 660 \pm 30 $&  $-0.62 \pm 0.01$ \\
    44 &$ 640 \pm 90 $& $-0.56 \pm 0.03$ \\
    %55 & 898 & -0.61 \\
    \hline
    32 &$ 7 600 \pm 250$ &$ -0.63 \pm 0.01$\\
    64 &$ 9 300 \pm 450$ & $-0.54 \pm 0.01$ \\
    96 &$ 8 700 \pm 750$ & $-0.45 \pm 0.01$ \\
    \hline
  \end{tabular}
  \label{tablelifetimes}
  \end{table}