\begin{table}%tB.1
\caption{\label{magstar}Star position and magnitudes.}
%\centering
\par
\begin{tabular}{cccc}
\hline\hline \noalign{\smallskip}
Position & RA & Dec\\
 (J2000)&15$^{\rm h}$54$^{\rm m}$20.45$^{\rm s}$ &$-$02$^\circ$54$'$07.30$''$\\
\hline
Band&Brightness&Error&Ref.\\
 ($\mu$m)&mag&mag&\\
\hline
$R$&(19.7)\tablefootmark{a} &&1\\
$I$&16.3&0.1&2\\
$J$&10.986&0.021&3\\
$H$&8.915&0.044&3\\
$K$&7.910&0.016&3\\
3.6&7.361&0.002&4\\
4.5&7.340&0.002&4\\
5.8&7.222&0.003&4\\
8&7.177&0.003&4\\
24&7.4&0.1&4\\
\hline
\end{tabular}
\tablefoot {\tablefoottext{a}{USNO-B calibrations are done in the original $E$~band plate, which differs somewhat from the standard $R$~band \citep{2003AJ....125..984M}.}}
\tablebib {(1) USNO-B \citep{2003AJ....125..984M}; (2) unpublished data from Paper~I; (3) 2MASS \citep{CutriR.M.2000}; (4)~this~work.}
\end{table}