\begin{table}%t1
\caption{\label{MC-runs}Overview of performed Monte-Carlo runs for comparison.}
%\centering
 \small \begin{tabular}{lccc}
\hline\hline
Run & MC0.1-full    & MC100-A  & MC100-full\\
\hline 
Optical depth $\tau_{550~{\rm nm}}$   & 0.1 & 100 & 100            \\
RADMC - Configuration & ``full'' & ``one-photon-limit'' & ``full''           \\
frequency dependence & yes & yes & yes \\
\hline
Comparison Sect. & \ref{sect:irradiation_thin} & \ref{sect:irradiation_thick}   &
\ref{sect:full_thick} \& \ref{sect:radiativeforce} \\
\hline
\end{tabular}
\tablefoot{The overview table of the comparison runs performed with the Monte-Carlo based code RADMC contains the corresponding optical depth of the test case  and  the used configuration of the Monte-Carlo code, see referred comparison Sects.~for details on the ``one-photon-limit'' and ``full run''. 
All Monte-Carlo runs include frequency dependence.} 
\end{table}