\begin{table}%t4
  \caption{\label{tab:results}Results obtained for the eight clusters.}
  %%\centerline

{\begin{tabular}{lrrrrrr}
\hline
  \hline\noalign{\smallskip} 
  \multicolumn{1}{c}{$Cl. Name$} & \multicolumn{1}{c}{$V-M_V$} &
\multicolumn{1}{c}{$E_{(B-V)}$} & \multicolumn{1}{c}{log($t$)} &
\multicolumn{1}{c}{d [kpc]} &\multicolumn{1}{c}{$z$}\\
\hline
    % after \\: \hline or \cline{col1-col2} \cline{col3-col4} ...
    Cz 29      & 13.95      &  0.47         & 8.4-8.5  & 3.0      & 0.004\\
               & $\pm 0.20$ & $\pm 0.02$    &          &$\pm 0.30$&$\pm 0.002$\\
    Haff 10    & 14.55      & 0.55          & 9.2-9.4& 3.7      & 0.008\\
               & $\pm 0.25$ & $\pm0.03$     &          &$\pm 0.40$&$\pm 0.001$\\
    Haff 18(1) & 14.20      & 0.30          & 8.2-8.3  & 4.5      & ---  \\
               & $\pm 0.20$ & $\pm0.02$     &          &$\pm 0.40$&      \\
    Haff 18(2) & 17.0-17.4  & $0.68^{*}$    & 6.6-6.7      & 9.5-11.4 & ---  \\
               &            &               &          &          &      \\
    Haff 19    & 15.20      & 0.38          & 6.7-6.6  & 6.4      & ---  \\
               & $\pm0.25$  & $\pm0.02$     &          &$\pm0.65$ &      \\
    NGC 2383   & 13.40      & 0.30          & 8.4-8.5  & 3.1      & 0.008\\
               & $\pm 0.25$ & $\pm0.05$     &          &$\pm 0.30$&$\pm 0.001$\\
    NGC 2384   & 13.35      & 0.31          & 7.2-7.1  & 3.0      &---   \\
               & $\pm 0.20$ & $\pm0.03$     &          &$\pm 0.30$&      \\
    Rup 72     & ---        & ---           & ---      & ---      & ---  \\
               & ---        & ---           & ---      & ---      & ---  \\
    Rup 158    & ---        & ---           & ---      & ---      & ---  \\
               & ---        & ---           & ---      & ---      & ---  \\
    \hline
  \end{tabular}
}
\par
\tablefoot{Column 1: cluster name; column 2: the $V-M_V$ apparent distance
modulus and fitting error; column 3: the adopted mean $E_{(B-V}$
colour excess and the range of confidence; ($^{*}$ see text for
the range of $E_{(B-V)}$ in this region); column 4: the range of
the log($t$); column 5: cluster distance in kpc and errors; column~6: adopted metal content and confidence range.}%\vspace*{2mm}
\end{table}