\begin{table}%t2
\caption{\label{surface}Surface photometry  of the  low-luminosity galaxy sample.}  
\small%\centering
\par
\begin{tabular}{lcccccccccc}
\hline\hline\noalign{\smallskip}
\multicolumn {1}{c}{Galaxy}  & $n_{i^{\prime}}$ &  $n_{r^{\prime}}$ &  $n_{g^{\prime}}$ & $\mu_{0}\hspace{-1pt}_{_{B}}$  &  $r_{e_{i^{\prime}}}$ & $r_{e_{r^{\prime}}}$ & $r_{e_{g^{\prime}}}$ & $\chi_{\nu,i^{\prime}}^{2}$ & $\chi_{\nu,r^{\prime}}^{2}$ & $\chi_{\nu,g^{\prime}}^{2}$  \\
\noalign{\smallskip}\hline 
N5846\_01 & 1.84(4) & 1.82(3)  &  1.64(3)  & 17.1(2)  & 1.6(4)  & 1.7(3) & 1.6(3) & 0.00043 & 0.00025 &  0.00055  \\
N5846\_02 & 1.12(3) & 1.06(2)  &  1.10(2)  & 22.6(1)  & 6.9(8)  & 6.9(6) & 7.0(5) & 0.00528 & 0.00317 &  0.00229  \\
N5846\_03 & 1.08(1) & 1.14(2)  &  1.11(2)  & 21.8(1)  & 5.1(2)  & 5.7(4) & 5.9(5) & 0.0018  & 0.00325 &  0.00221  \\
N5846\_04 & 1.43(2) & 1.53(2)  &  1.30(2)  & 21.63(9) & 8.4(9)  & 9.5(9) & 7.6(5) & 0.00159 & 0.00064 &  0.00099  \\
N5846\_05 & 1.31(2) & 1.27(1)  &  1.14(2)  & 21.79(9) & 6.1(5)  & 6.3(3) & 5.7(3) & 0.00288 & 0.00109 &  0.00217  \\
N5846\_09 & 0.91(9) & 1.09(9)  &  1.3(1) & 22.3(6)  &  9(3)  & 10(4) & 12(7)  & 0.00681 & 0.00957 &  0.0078 \\
N5846\_10 & 1.4(3)  &  2.0(7)  &  1.9(8) &  23(4)  & -- &  --  &  -- & 0.00468 & 0.00335 &  0.00513  \\
N5846\_11 & 1.01(3) & 1.15(3)  &  1.34(5)  & 20.7(2)  & 9.0(9)  & 10(1) & 10(2)  & 0.00824 & 0.00925 &  0.01286  \\
N5846\_13 & 1.22(2) & 1.33(1)  &  1.21(1)  & 21.52(6) & 11.3(8) & 12.3(5) & 10.9(7) & 0.00286 & 0.00065 &  0.00066  \\
N5846\_15 & 1.8(6)  & 1.20(8)  &  1.5(1) & 22.2(6)  & -- & 10(3) & 13(7)  & 0.0038  & 0.00293 &  0.00142  \\
N5846\_16 & 1.42(2) & 1.45(2)  &  1.43(2)  & 21.8(1)  & 10.0(9) & 10.1(8) & 10(1)  &  0.001  & 0.00069 &  0.00106  \\
N5846\_17 & 0.97(6) & 1.11(6)  &  0.95(3)  & 21.9(2)  &  6(1)  & 7(2)  & 5.6(7) & 0.00375 & 0.00238 &  0.00143  \\
N5846\_21 & 1.37(2) & 1.21(1)  &  1.35(1)  & 20.79(6) &  11(1)  & 9.7(5) & 10.8(6) & 0.00332 & 0.00085 &  0.0015 \\
N5846\_22 & 1.23(2) & 1.23(2)  &  1.18(2)  & 21.8(1)  & 5.2(4)  & 5.3(3) & 5.3(4) & 0.00354 & 0.00212 &  0.00356  \\
N5846\_23 & 1.41(3) & 1.31(3)  &  1.22(2)  & 21.9(1)  &  9(1)  & 8(1)  & 8.7(7) & 0.00163 & 0.00327 &  0.00156  \\
N5846\_24 & 0.98(2) & 0.93(1)  &  0.90(2)  & 21.72(9) & 8.0(5)  & 7.7(4) & 7.7(5) & 0.00107 & 0.00118 &  0.0026 \\
N5846\_25 & 1.09(1) & 1.02(1)  &  0.97(1)  & 21.18(5) & 6.5(3)  & 6.3(3) & 6.4(2) & 0.00508 & 0.00374 &  0.0028 \\
N5846\_27 & 0.91(3) & 0.81(2)  &  0.84(4)  & 22.4(2)  & 6.9(7)  & 6.0(5) & 6.3(9) & 0.00099 & 0.00075 &  0.0024 \\
N5846\_28 & 0.80(1) & 0.81(1)  &  0.89(2)  & 21.05(9) & 6.5(4)  & 6.0(3) & 5.8(4) & 0.00345 & 0.00289 &  0.00406  \\
N5846\_31 & 1.02(6) & 1.10(5)  &  1.07(8)  & 22.2(4)  &  8(2)  & 9(2)  &  8(2)  & 0.00173 & 0.0018  &  0.00227  \\
N5846\_32 & 0.99(2) & 0.99(1)  &  1.05(2)  & 21.83(9) & 10.9(9) & 11.3(7) & 11.9(9) & 0.0016  & 0.00131 &  0.00168  \\
N5846\_33 & 0.78(2) & 0.79(2)  &  0.83(2)  & 23.3(1)  &  11(1)  & 12(1) & 13(1)  & 0.00362 & 0.00173 &  0.00329  \\
N5846\_34 & 1.20(2) & 1.23(3)  &  1.13(2)  & 22.5(1)  & 9.5(8)  & 10(1) & 9.4(9) & 0.00161 & 0.00255 &  0.00225  \\
N5846\_35 & 1.28(4) & 1.26(3)  &  1.20(2)  & 22.2(1)  &  7(1)  & 7.1(9) & 7.3(7) & 0.00541 & 0.00358 &  0.00206  \\
N5846\_37 & 1.3(1)  &  1.1(1)  &  1.2(1) & 22.9(6)  &  11(6)  & 7(2)  & 10(6)  & 0.00111 & 0.00376 &  0.00245  \\
N5846\_38 & 1.08(5) & 1.02(4)  &  1.21(5)  & 21.8(2)  & 4.0(6)  & 3.8(5) & 4.4(7) & 0.00575 & 0.00515 &  0.00399  \\
N5846\_39 & 0.74(6) & 0.99(3)  &  1.19(9)  & 22.1(4)  &  6(1)  & 6.1(6) &  7(2)  & 0.0024  & 0.0019  &  0.00173  \\
N5846\_40 & 1.15(7) & 1.38(5)  &  1.18(6)  & 22.5(3)  &  10(3)  & 13(3) &  9(2)  & 0.00661 & 0.0016  &  0.00416  \\
N5846\_43 & 1.3(2)  &  1.8(4)  &  1.2(2) &  23(1)  &  6(5)  &  --  &  4(3)  & 0.00621 & 0.00222 &  0.00715  \\
N5846\_46 & 1.36(4) & 1.36(5)  &  1.45(5)  & 19.6(2)  & 3.4(6)  & 3.3(7) & 3.3(8) & 0.0148  & 0.0148  &  0.00764  \\
N5846\_47 & 0.87(2) & 0.82(2)  &  0.85(2)  & 22.3(1)  &  11(1)  & 10.6(9) & 11(1)  & 0.00337 & 0.00217 &  0.00371  \\
N5846\_50 & 1.17(4) & 1.27(3)  &  1.35(4)  & 21.6(2)  & 5.5(8)  & 5.8(8) &  6(1)  & 0.00782 & 0.00516 &  0.00784  \\
N5846\_51 & 1.05(2) & 1.21(2)  &  1.19(2)  & 20.9(1)  & 4.9(3)  & 5.5(5) & 5.4(4) & 0.00177 & 0.0034  &  0.00283  \\
N5846\_52 & 1.14(4) & 1.78(9)  &  1.41(5)  & 21.7(3)  &  8(1)  & 14(8) & 10(3)  & 0.00397 & 0.00245 &  0.00322  \\
N5846\_56 & 1.10(2) & 1.09(2)  &  1.10(2)  & 22.12(9) &  15(1)  & 15(1) & 15(1)  & 0.00268 & 0.00264 &  0.00186  \\
\hline
\end{tabular}
\smallskip
\tablefoot{Surface  brightnesses are  shown in magnitudes
arcsec$^{-2}$, effective radii in arcseconds. Numbers in parantheses indicate errors of the  last significant digit. The quality of the fits is
shown in the last three columns. }
\end{table}