\begin{table}%t5
\caption[]{\label{tab:feros}Log of the FEROS observations of V1130~Tau.
}
 {
\begin{tabular}{ccrr}
\hline
\hline\noalign{\smallskip}
HJD$-$2\,400\,000\tablefootmark{a}  & Phase &$t_{\rm exp}$\tablefootmark{b}
 & 
$S/N$\tablefootmark{c}\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 51188.6379 &  0.1675 &    600 &   223 \\ %   Cpf283610027.fits   200   900   701     1.00     0.00 6036.0 6057.0
 51207.5446 &  0.8344 &    600 &   171 \\ %   Cpf355210027.fits   200   900   701     0.99     0.01 6036.0 6057.0
 51207.5662 &  0.8615 &    600 &   170 \\ %   Cpf355410027.fits   200   900   701     0.99     0.01 6036.0 6057.0
 51208.5852 &  0.1370 &    600 &   162 \\ %   Cpf359310027.fits   200   900   701     0.99     0.01 6036.0 6057.0
 51209.5918 &  0.3971 &    600 &   200 \\ %   Cpf363010027.fits   200   900   701     0.99     0.00 6036.0 6057.0
 51211.5630 &  0.8645 &    600 &    84 \\ %   Cpf371310027.fits   200   900   701     1.00     0.01 6036.0 6057.0
 51212.6064 &  0.1706 &    600 &   176 \\ %   Cpf375910027.fits   200   900   701     1.00     0.01 6036.0 6057.0
 51385.9274 &  0.1288 &    600 &   142 \\ %   Cpf852110027.fits   200   900   701     1.00     0.01 6036.0 6057.0
 51386.9327 &  0.3872 &    600 &   170 \\ %   Cpf857810027.fits   200   900   701     1.00     0.01 6036.0 6057.0
 51390.8696 &  0.3154 &    600 &   241 \\ %   Cpf872210027.fits   200   900   701     1.00     0.00 6036.0 6057.0
 51391.9171 &  0.6266 &    600 &   225 \\ %   Cpf877810027.fits   200   900   701     1.00     0.00 6036.0 6057.0
 51392.8746 &  0.8252 &    720 &   237 \\ %   Cpf889410027.fits   200   900   701     0.99     0.00 6036.0 6057.0
 51562.5335 &  0.1992 &    600 &   243 \\ %   Cpf343110027.fits   200   900   701     1.00     0.00 6036.0 6057.0
 51562.5962 &  0.2777 &    600 &   281 \\ %   Cpf343310027.fits   200   900   701     1.00     0.00 6036.0 6057.0
 51562.6289 &  0.3187 &    600 &   244 \\ %   Cpf343610027.fits   200   900   701     1.00     0.00 6036.0 6057.0
 51977.4958 &  0.6371 &    630 &   181 \\ %   Cpf579910027.fits   200   900   701     1.00     0.01 6036.0 6057.0
 51978.4897 &  0.8812 &    600 &   179 \\ %   Cpf585710027.fits   200   900   701     0.99     0.01 6036.0 6057.0
 51981.4927 &  0.6402 &    600 &   166 \\ %   Cpf611610027.fits   200   900   701     1.00     0.01 6036.0 6057.0
\hline
\end{tabular} }
\tablefoot{\tablefoottext{a}{Refers to mid-exposure.}
\tablefoottext{b}{Exposure time in seconds.}
\tablefoottext{c}{Signal-to-noise ratio measured around 6070 {\AA}. At the shorter wavelengths used for the radial velocity measurements it is somewhat lower.}}
\end{table}