\begin{table}%t2
\par
%\centering
\par
 \caption{\label{13c18o32} Observed positions of \coisoiso~(3$-$2) and line opacities, $\tau_{^{13}{\rm C}^{18}{\rm O}}$.}
\par
\begin{tabular}{ccccccc}
\hline \hline
\noalign{\smallskip}
Offset 			& \vlsr  	& $FWHM$ 	& $T_{\rm peak}(^{12}{\rm C}^{18}{\rm O}),$ 	&  $\tau_{^{13}{\rm C}^{18}{\rm O}}$ & Note \\   
(arcsec)                       &  (\kms)   &    (\kms) & $T_{\rm peak}(^{13}{\rm C}^{18}{\rm O})$ (K)	&                                  &           \\ 
\noalign{\smallskip}
\hline
  \noalign{\smallskip}
 $-60$, +80		& $2.86 \pm 0.05$	& $0.78 \pm 0.12$	& 10.5, 0.25			& 0.02	& $\ldots$			\\
   0, +60			& $3.13 \pm 0.06$	& $0.92 \pm 0.14$	&  \phantom{1}8.1, 0.22	& 0.03	& $\ldots$			\\
  +30, +80			& $3.09 \pm 0.05$	& $1.11 \pm 0.09$	& 13.0, 0.38			& 0.03	& P~1			\\
  +30, 0			& $3.62 \pm 0.02$	& $1.02 \pm 0.05$	& 16.5, 0.71			& 0.04	& P~3 			\\
  +60, $-100$		& $2.95 \pm 0.06$	& $1.17 \pm 0.15$	&  \phantom{1}6.1, 0.23	& 0.04	& 2 lines?			\\
 \noalign{\smallskip}
  \hline
  \end{tabular}
\tablefoot{Error on line ratios is estimated at 15$-$20\%.}\vspace*{3mm}
\end{table}