\begin{table}%t4
\caption{\label{unblended}Fitted fluxes for the unblended lines in the spectrum of \object{VY CMa} and \object{IK Tau}.}
%\centering
 \small \begin{tabular}{cccccc}
\hline \hline\noalign{\smallskip}
Transition & Wavelength & No weight& Weighted  & Manual & \object{IK Tau} weighted\\
&  ($\mu$m)  & fit flux &  fit flux&  fit flux\tablefootmark{a}&  fit flux\\
& & (10$^{-19}$~W~cm$^{-2}$) & (10$^{-19}$~W~cm$^{-2}$) & (10$^{-19}$~W~cm$^{-2}$) & (10$^{-19}$~W~cm$^{-2}$)\\
\hline
$4_{32}$--$3_{21}$ & 58.699  & 15.5 &  15.1  &   $27.8 \pm 5.4$  &     3.3   \\
$6_{16}$--$5_{05}$ & 82.031  & 10.9 &  11.0  &   $14.0 \pm 2$    &     2.5  \\
$2_{21}$--$1_{10}$ & 108.073 & 7.2  &  7.1   &   $9.2 \pm 1.1$   &     1.9  \\
$4_{32}$--$4_{23}$ & 121.722 & 3.1  &  3.0   &   $3.8 \pm 1.0$   &     0.73  \\
$4_{23}$--$4_{14}$ & 132.408 & 3.1  &  3.0   &   $3.6 \pm 0.8$   &     0.49  \\
$8_{36}$--$7_{43}$ & 133.549 & 2.2  &  2.1   &   $2.7 \pm 0.8$   &     0.54  \\
$5_{14}$--$5_{05}$ & 134.935 & 3.1  &  3.0   &   $3.8 \pm 0.8$   &     0.58  \\
$3_{30}$--$3_{21}$ & 136.496 & 2.9  &  2.8   &   $3.3 \pm 0.9$   &     0.73  \\
$4_{31}$--$4_{22}$ & 146.923 & 2.0  &  2.0   &   $2.5 \pm 0.7$   &     0.29  \\
$5_{32}$--$5_{23}$ & 160.510 & 2.0  &  1.9   &   $2.5 \pm 0.4$   &     0.55  \\
$2_{12}$--$1_{01}$ & 179.527 & 5.3  &  5.3   &   $6.3 \pm 0.7$   &     1.1  \\
$2_{21}$--$2_{12}$ & 180.488 & 2.6  &  2.6   &   $3.4 \pm 0.4$   &     0.85  \\
$6_{33}$--$5_{42}$ & 194.422 & 1.5  &  1.5   &   $1.8 \pm 0.3$   &     0.44  \\
\hline
\end{tabular}
\tablefoot{\tablefoottext{a}{Errors do not include systematic uncertainty in the baseline subtraction ($\sim$30\%).}}
\vspace*{-2mm}
\end{table}