\begin{table}%t1
\caption{\label{tab1}NaI and CaII absorption measurements.}
\vspace*{-2.5mm}
%\centering
\small
\begin{tabular}{lccccclcccl}
\hline
\hline\noalign{\smallskip}
Star$_{\rm HD}$ & $l$ & $b$ & distance & $W_{\lambda}$ (D2) & $W_{\lambda}$ (D1)& log $N$(NaI)$_{\rm TOT}$ &Reference&  $W_{\lambda}$ (K) & log $N$(CaII)$_{\rm TOT}$& Reference \\
&&&(pc)&m(\AA)&m(\AA)&cm$^{-2}$&(NaI)&m(\AA)&cm$^{-2}$&(CaII)\\
\hline
179029	&0.1	&--20	&318	&124.3	&105.4	&12.37	&ESO-2007	&53	&12.01	&ESO-2007\\
157056	&0.5	&6.6	&173	&87.0&		&11.98	& (1) 	&38.0	&11.67	&(2) \\
172016	&0.8	&--12.5	&225	&136.6	&76.20	&11.97	&ESO-2007	&25.7	&11.33	&ESO-2007\\
195599	&0.9	&--36.1	&186	&$<$2.5&		&$<$10.15&	ESO-2007	&3	&10.65	&ESO-2007\\	
203006	&1.2	&--45.0	&57		&&&&&$<$5&	$<$10.4&(3)\\
171034	&1.3	&-11.0	&685	&240.0	&175.0	&12.39&	MJO-2007&	83.4&	12.06&	MJO-2007\\
152909	&1.6	&14.4	&209	&235.0	&198.5	&12.83&	ESO-2006&	104.9&	12.24&	ESO-2006\\
154204	&1.9	&12.4	&122	&179	&142	&12.66	&(4)&&&\\			
164019	&1.9	&--2.6	&556	&&&&&	498&	12.99&	(5)\\	
161756	&2.0	&0.5		&348	&284.8	&236.6&	12.87&	ESO-2006&	99.9&	12.30&	ESO-2006\\
145570	&2.5	&28.8	&51		&6.7		&6.1&	10.67&	ESO-2008&	21.9&	11.52&	ESO-2008\\
158643	&2.5	&5.3		&131	&&	&11.05&	(6)&					20.3&	11.26&	(7)\\
165365	&2.8	&--3.7	&418	&186.4	&121.8	&12.15	&ESO-2008	&58.3	&11.91&	ESO-2008\\
180885	&2.8	&--20.7	&565	&109.8	&86.7	&12.16	&MJO-2006&&&\\			
197630	&2.9	&--38.3	&98		&12.9	&3.3		&10.71	&MJO20-06&	10.3&	11.06&	MJO-2007\\
151884	&3.2	&17.4	&268	&372.8	&348.9	&12.89	&ESO-2008&	131.8&	12.38&	ESO-2008\\
45607	&3.9	&29.7	&77		&30.0	&15.0	&11.28	&(8)		&17.6	&11.36	&LICK-2007\\
141378	&4.1	&37.3	&49	&$<$3&		&$<$10.3&	(9)&&&\\			
141569	&4.2	&36.9	&99	&&		&12.66	&(10)	&	&11.65& (10)	\\
188113	&4.2	&--27.8	&446	&199.5&152.6&12.50&ESO-2008&66.9&	12.0&	ESO-2008\\
\hline
\end{tabular}
\vspace*{-1.9mm}
\tablefoot{The full table is only available in electronic form at the CDS.}
\vspace*{-2.99mm}
\end{table}