\begin{table}%t3
\caption{\label{tab:vanillaparameters}Standard deviations on parameter estimates from a single Jupiter observation.} 
%\centerline
 {\small \begin{tabular}{ccccccccc}
\hline\hline
Band  & $\sigma_{\rm cross}$ & $\sigma_{\rm co}$ & $\sigma_{FWHM}/{FWHM}$  &$\sigma_\psi$  & $\sigma_{\gamma_+}$  & $\sigma_{\gamma_\times}$ & $\sigma_A/A$ & $\sigma_\tau/\tau$\\
(GHz)  &  \multicolumn{2}{c}{($10^{-4}$ arcmin)} & ($10^{-6}$) & ($10^{-2}$ deg) & ($10^{-5}$) &  ($10^{-5}$) &  ($10^{-5}$) & ($10^{-5}$) \\ 
\hline
\multicolumn{9}{c}{\textit{Low-Frequency Instrument}}\\
30  & 218  & 344    & 937 & 267    & 548  & 1270  & 164&\dots \\
44  &  125   &  152 &  572  &  53.1 &  143 & 118 & 92.1 &\dots \\
70  & 26.6 & 35.6& 418 & 34.3 & 38.9  & 141   & 51.6  & \dots \\\hline 
\multicolumn{9}{c}{\textit{High-Frequency Instrument} (known $\tau$)}\\
100 &  7.24   &  25.3   &  157  &  13.0    &  19.2   &  36.1   &  10.1   &  0.00    \\
143 &  3.74   &  6.76   &  69.7  &  4.30   &  4.68   &  6.17   &  4.77   &  0.00   \\
217 &  0.473  &  2.26   &  23.4  &  3.86   &  9.96   &  3.86   &  2.26   &  0.00  \\
353 &  8.96   &  9.81   &  13.3  &  4.72   &  22.9   &  2.86   &  1.83   &  0.00   \\
545 &  0.295  &  0.167  &  5.15  &  0.167  &  0.763  &  0.521  &  0.866  &  0.00  \\
857 &  0.351  &  0.153  &  1.87  &  0.287  &  0.454  &  0.239  &  0.398  &  0.00   \\\hline 
\multicolumn{9}{c}{\textit{High-Frequency Instrument} (fitting $\tau$) } \\
100 &  7.13   &  37.3   &  144  &  13.8    &  18.7   &  37.7   &  33.0   &  96.3  \\
143 &  4.41   &  15.6   &  80.8  &  5.36   &  6.91   &  7.10   &  18.3   &  88.8  \\
217 &  0.494  &  4.11   &  30.0  &  5.03   &  12.3   &  4.75   &  6.18   &  26.7  \\
353 &  49.3   &  52.0   &  72.2  &  25.8   &  126    &  20.7   &  13.7   &  34.1  \\
545 &  0.300  &  0.341  &  5.49  &  0.172  &  0.828  &  0.521  &  0.970  &  6.25  \\
857 &  0.351  &  0.164  &  1.87  &  0.287  &  0.454  &  0.238  &  0.412  &  1.38  \\
\hline 
\end{tabular}}
\medskip
The beam offset error in the cross-scan direction is $\sigma_{\rm cross}$, and similarly for $\sigma_{\rm co}$.  The beam angle~$\psi$, shears $\gamma_+$ and $\gamma_\times$, and amplitude~$A$ are defined in Sect.~\ref{sec:parmodel}.  The fractional $FWHM$ error is derived from the error on the scale parameter~$s$, also defined there.  The time constant $\tau$ is defined in Sect.~\ref{sec:detprop}.
\end{table}