\begin{table}%t4
%\centering
\par
\caption{\label{tab:broad}Synthetic broadband polarimetry of NGC~300~OT2008-1.}
\small 
\begin{tabular}{lcccccccc}
\hline \hline \noalign{\smallskip}
Epoch&\multicolumn{2}{c}{$B$}&\multicolumn{2}{c}{$V$}&\multicolumn{2}{c}{$R$}&\multicolumn{2}{c}{$I$}\\ 
& $P$(\%) & $\theta$& $P$ (\%) & $\theta$& $P$ (\%) & $\theta$ & $P$ (\%)& $\theta$  \\
\hline
\#1  & 1.21 & 79.0 & 1.04 & 77.5 & 0.55 & 84.6 & 0.67 & 141.7 \\
\#2  & 1.36 & 76.4 & 1.18 & 74.1 & 0.71 & 78.2 & 0.53 & 133.8 \\
     &      &      &      &      &      &      &      &       \\
\#2\tablefootmark{*}& 1.21 & 78.4 & 1.02 & 76.1 & 0.55 & 82.3 & 0.67 & 139.4 \\
\hline
\end{tabular}
\tablefoot{{The rms errors on polarization levels and position angles are 0.02\% and 0.3~degrees, respectively.} \tablefoottext{*}{Recomputed after applying $\langle \Delta Q\rangle$ = $-$0.11, $\langle \Delta U\rangle$ = +0.14.}}
\end{table}