\begin{table}%t3
\caption{\label{tab:Iband_mags}The $I$-band magnitudes adopted for the combined \epsba, Bb~system by different studies.}
\small%\centerline
 {
\begin{tabular}{ccc}
  \hline
  \hline\noalign{\smallskip}
  Date & $\varepsilon$ Indi Ba, Bb  &  Reference\\
  \hline
  \hline	
  1997.771  &   16.59 $\pm$ 0.10  & SSS-UK \\
  1999.666  &   16.77 $\pm$ 0.10  & SSS-UK \\
  2000.781  &   16.90 $\pm$ 0.12  & DENIS  \\
  2004.462  &   16.70 $\pm$ 0.04  & \citet{Koen:2005a} \\
  2004.546  &   16.95 $\pm$ 0.03  & This work \\
  \hline
\end{tabular}}
\medskip
We have used the FORS2 Bessell $I$-band filter which is similar to the DENIS $I$-band, while \citet{Koen:2005a} used the Cousins $I$-band.
\end{table}