\begin{table}%t3
\caption{\label{tab3}Individual values of duration, inclination, $\chi^{2}$ values and limb darkening coefficients from five light curve fits. }
\par
%\centering
\par
\begin{tabular}{llllllll}
\hline\hline\noalign{\smallskip}
{$T_{\rm c}$} time [HJD] &  Duration & Errors & Inclin. & Errors & $\chi^{2}$value & LDL \\
\hline
3989.7529 $\pm$ 0.00069  & 110.308 & 0.432 &  83.59  &  0.019 &  432.1   \\
3994.6939 $\pm$ 0.00066  & 109.230 & 0.448 &  83.56  &  0.019 &  296.8 \\
4041.6358 $\pm$ 0.00070  & 109.025 & 0.430 &  83.55  &  0.019 &  290.6 \\ 
4607.4036 $\pm$ 0.00072  & 106.620 & 0.883 &  83.44  &  0.036 &  179.1 \\
4728.4640 $\pm$ 0.00071  & 106.112 & 0.870 &  83.43  &  0.036 &  190.1 \\ 
\hline
4933.5274 $\pm$ 0.00076 & 105.077 & 0.964 &  83.38  &  0.039 &  296.1 &$ S1$ \\
4980.4675 $\pm$ 0.00068 & 105.056 & 0.848 &  83.38  &  0.034 &  181.7 & $S1$\\
4980.4679 $\pm$ 0.00090 & 104.748 & 1.076 &  83.37  &  0.043 &  202.2 & $S2$\\
4980.4667 $\pm$ 0.00082 & 103.832 & 1.021 &  83.33  &  0.041 &  186.0 & $S3$\\
4980.4678 $\pm$ 0.00100 & 104.363 & 1.194 &  83.35  &  0.048 &  195.0 & $S4$\\
\hline
4980.4675 $\pm$ 0.00060 & 104.522 &       &  83.36   &  0.030     \\
\hline
\end{tabular}
\tablefoot{Units for duration and errors are minutes and for inclination  
errors are degrees. The OLT light curve has 268 points, the $I$-filter light curve has 198, the $y$-filter light curve has 208, the $b$-filter light curve 198 and the $v$-filter light curve 162 points respectively.}
\end{table}