\begin{table}%t7
\par
%\centering
\par
\caption{\label{t7}Fitted physical parameters of the inner lobes for different values of the lobe's
axial ratio $R_{\rm T}$.}
\begin{tabular}{lrrccrr}
\hline
\hline
\noalign{\smallskip}
Parameter  &\multicolumn{2}{c}{Indepen. solution} & & &\multicolumn{2}{c}{Alternat. solution} \\  
            &\multicolumn{2}{c}{$---{\rm innSE}---$} & & &\multicolumn{2}{c}{$---{\rm innNW}---$} \\
(1)          & (2)      & (3)   & & & (4)       & (5)   \\
\hline
$R_{\rm T}$                              & 11.8  & 6.5   & & &10.6  & 6.5 \\
$\alpha_{\rm inj}$                       & 0.510 & 0.605 & & &0.525 & 0.610 \\
$Q_{\rm jet,inn}(\times 10^{37}$~W)     & 1.53  & 1.21  & & &1.39  & 1.34 \\
$\rho_{0{\rm inn}}(\times 10^{-26}$~kg~m$^{-3}$)& 7.70 & 6.07  & & &7.17  & 6.13 \\
$t_{\rm inn}$(Myr)                       & 7.9   & 12.0  & & &6.3  & 8.8  \\
$p_{\rm c,inn}(\times 10^{-14}$~Pa)         & 2.91  & 3.34  & & &3.45  & 4.10 \\
$B_{\rm inn}$(nT)                        & 0.20  & 0.22  & & &0.22  & 0.24 \\
$U_{\rm inn}=u_{\rm c}\times V(\times 10^{50}$~J) & 1.50  & 5.66  & & &1.27 & 3.44 \\
$D/(t\times c)$                          & 0.072 & 0.047 & & &0.075 & 0.053 \\
$v(r=a_{0})/c$                           & 0.286 & 0.189 & & &0.267 & 0.189 \\
$v(r=D_{\rm inn})/c$                     & 0.043 & 0.028 & & &0.045 & 0.032 \\
\hline
\end{tabular}
\end{table}