\begin{table}%t2
%\centering
\par
\caption{\label{t2}Flux densities of the total structure (Total) and the outer (outNW and outSE)
and inner (innNW and innSE) lobes of J1548$-$3216.}
  \begin{tabular}{rcccccc}
\hline
\hline
\noalign{\smallskip}
\multicolumn{1}{c}{Freq.} &\multicolumn{1}{c}{Total} &\multicolumn{1}{c}{outNW} &\multicolumn{1}{c}{outSE}
&\multicolumn{1}{c}{innNW} &\multicolumn{1}{c}{innSE}  & Ref. \\
\multicolumn{1}{c}{[MHz]} &\multicolumn{1}{c}{[mJy]} &\multicolumn{1}{c}{[mJy]}&\multicolumn{1}{c}{[mJy]}
&\multicolumn{1}{c}{[mJy]} &\multicolumn{1}{c}{[mJy]}&  \\
\multicolumn{1}{c}{(1)} &\multicolumn{1}{c}{(2)} &\multicolumn{1}{c}{(3)}&\multicolumn{1}{c}{(4)}
&\multicolumn{1}{c}{(5)} &\multicolumn{1}{c}{(6)}& (7) \\
\hline
 160 & 8700 $\pm$  870& ~(3900 $\pm$ 360)\tablefootmark{*}&(4500 $\pm$ 480)\tablefootmark{*} & & &(1) \\
 334 & 4926 $\pm$  740&  2095 $\pm$ 314 & 2642 $\pm$ 396 & 58.0 $\pm$ 9.2 & 130.0 $\pm$ 19.7 & (5)\\
 619 & 3274  $\pm$   265&  1383 $\pm$ 111 & 1758 $\pm$ 141 & 43.4 $\pm$ 4.6 &  87.6 $\pm$ 7.6  & (5)\\
 843 & 2519  $\pm$  200& &&& &(2)\\
1384 & 1815  $\pm$  90\phantom{0} &   820 $\pm$ 41  &  913 $\pm$ 46  & 26.5 $\pm$ 3.3 &  53.3 $\pm$ 4.0  & (4)\\
1400 & 1842  $\pm$  764  &&&& & (3)\\
2495 & 1019  $\pm$  31\phantom{0}&    479 $\pm$ 15  &  484 $\pm$ 15  & 17.5 $\pm$ 3.0 &  35.5 $\pm$ 3.2  & (4)\\
4860 &  449  $\pm$  25&    198 $\pm$ 20  &  217 $\pm$ 22  & 11.8 $\pm$ 1.6 &  19.7 $\pm$ 2.2  & (5)\\
4910 &      &      &  &    11.9 $\pm$ 0.9 &  23.1 $\pm$ 1.5  & (4)\\
\hline
\end{tabular}
\tablefoot{\tablefoottext{*}{Estimated division of the total 160~MHz flux density between the outer lobes, cf. the text.}\vspace*{-2mm}}
\tablebib{(1) Slee (\cite{Slee95}); (2) Jones \& McAdam (\cite{Jones92}); (3) NVSS (Condon et~al. \cite{Condon98});
(4) Flux densities measured on the archival ATCA and VLA images (Saripalli et al.
2003; Safouris et~al. \cite{Safouris08}); (5) this paper;}
\end{table}