\begin{table}%t1
      \caption{\label{tab:photometry}$JHK^{\prime}$ infrared photometry for the sources included in our survey.}
        \small%\centering
\par
         \begin{tabular}{lccclccc}
            \hline  \hline
            \noalign{\smallskip}
            Source      &  2MASS    &  RA &  Dec & Ref.  & $J$ ($1.27~\mu$m)  &  $H$ ($1.63~\mu$m) &  $K^{\prime}$ ($2.12~\mu$m) \\
                       \hline
                   IGR~J18027$-$2016 & 2MASS~J18024194$-$2017172 & 18 02 41.94  & $-$20 17 17.3 & C &$12.79\pm 0.06$ & $11.96\pm 0.08$ & $11.48\pm 0.05$\\
        SAX~J18186$-$1703 & 2MASS~J18183790$-$1702479 & 18 18 37.90  & $-$17 02 47.9 & Z1 & $10.08\pm 0.06$ & $8.94\pm 0.08$  & $7.79\pm 0.05$   \\
        IGR~J18483$-$0311\tablefootmark{a} & 2MASS~J18481720$-$0310168 & 18 48 17.20  & $-$03 10 16.8 & C & $10.84\pm 0.03$ & $9.38\pm 0.02$  & $8.47\pm 0.02$\\
        IGR~J19140$+$0951 & 2MASS~J19140422$+$0952577 & 19 14 04.23  & +09 52 57.7 & Z2 & $11.33\pm 0.06$ & $9.71\pm 0.08$  & $8.83\pm 0.05$ \\
                       \hline
         \end{tabular}
\tablefoot{\tablefoottext{a}{Photometry from \citet{rahoui08}. For this source, the filters are centered on
  1.25, 1.65 and $2.20~\mu$m respectively. }}\vspace{-2.5mm}\tablebib{C: \citet{chaty08};
Z1: \citet{intzand06a};
Z2: \citet{intzand06b}.}
%\vspace{0.5mm}
    \end{table}