\begin{table}%t6
\caption{\label{tab6}Relative integrated  HeI, HI and   H$_2$~emission-line fluxes  in N88A for  14~positions extracted across~S1$-$S3  (Fig.~\ref{fig:S1S2S3}abc).}
%\centering
\small
\begin{tabular}{l l l l l l l c }
\hline\hline\noalign{\smallskip}
Id     &  HeI    &  HeI     & H$_{2}$ 1$-$0 S(1) &Br$\gamma$ &H$_{2}$ 1$-$0 S(0) &H$_{2}$ 2$-$1 S(1) &  $I$(He 2.113~$\mu$m)/$I$(Br$\gamma$)\\
       &2.058 $\mu$m&2.113 $\mu$m &2.121 $\mu$m  &2.166 $\mu$m  &2.223 $\mu$m &2.247 $\mu$m & \\
\hline
S1-41  & 3.18        & 0.375         &  0.121    &  6.07        &  0.099   &  0.031   &0.062\\
S1-42  & 3.36        & 0.337         &  0.075    &  5.94        &  0.092   &  0.044   &0.057\\
S2-41  & 2.38        & 0.257         &  0.094    &  4.76        &  0.068   &  0.038   &0.054\\
S3-37  & 0.76        & 0.065         &  0.028    &  1.21        &  0.018   &  0.009   &0.054\\
S3-47  & 0.60        & 0.055         &  0.066    &  1.01        &  0.033   &  0.006   &0.054\\
S1-1   & 2.43        & 0.24          &  0.199    &  4.30        &  0.126   &  0.069   &0.054\\
S1-2   & 0.17        & 0.017         &  0.094    &  0.31        &  0.054   &  0.035   &0.057\\
S2-1   & 1.49        & 0.16          &  0.150    &  3.24        &  0.093   &  0.048   &0.049\\
S3-1   & 0.67        & 0.065         &  0.049    &  1.11        &  0.033   &  0.009   &0.059\\
S3-2   & 0.58        & 0.057         &  0.026    &  0.95        &  0.018   &  0.009   &0.060\\
S3-3   & 0.02        & 0.002         &  0.017    &  0.04        &  0.010   &  0.008   &0.056\\
S3-4   & 0.02        &               &  0.019    &  0.02        &  0.009   &  0.009   &\\
S3-p1  & 0.74        & 0.092         &  0.020    &  1.42        &  0.014   &  0.009   &0.065\\
S3-p2  & 0.89        & 0.090         &  0.036    &  1.55        &  0.034   &  0.008   &0.058\\
\hline
\end{tabular}
\end{table}