\begin{table}%t3
\caption{\label{tab3}Stars in the region of N88A observed with the S54~camera (Field~1).}
%\centering
\small
\begin{tabular}{llllllrrr}
\hline\hline\noalign{\smallskip}
Id.  &  $\alpha$(2000) & $\delta$(2000)& mag-$J$ & mag-$H$ & mag-$K$ & $J-K$ & $J-H$ & $H-K$\\
\hline
              1    & 1  24  11.42  & 73   9  26.15&   18.24&  17.65&  17.50&   0.74&   0.59&   0.15\\
              2    & 1  24  11.86  & 73   9  25.85&  17.63&  17.71&  17.65&  --0.02&  --0.08&   0.06\\
              3    & 1  24   8.67  & 73   9  23.08&  19.08&  18.88&  18.84&   0.24&   0.20&   0.04\\
              4   & 1  24  13.84  & 73   9  22.77&  18.46&  18.48&  18.45&   0.01&  --0.02&   0.03\\
              5   & 1  24   7.69  & 73   9  20.63&  17.89&  17.61&  17.34&   0.55&   0.28&   0.27\\
              6   & 1  24  11.02  & 73   9  20.11&  15.76&  15.85&  15.82&  --0.06&  --0.09&   0.03\\
              7   & 1  24   6.85  & 73   9  19.56&  19.16&  18.71&  18.51&   0.66&   0.45&   0.21\\
              8   & 1  24  13.75  & 73   9  18.85&  15.17&  15.37&  15.38&  --0.21&  --0.20&  --0.01\\
              9   & 1  24   8.72  & 73   9  18.79&  18.22&  18.18&  18.02&   0.20&   0.04&   0.16\\
              10   & 1  24   7.03  & 73   9  18.05&  18.80&  18.79&  18.71&  0.09&    0.01&  0.08\\
              11   & 1  24  12.53  & 73   9  15.61&   16.27&  16.45&  16.47&  --0.20&  --0.18&  --0.02\\
              12   & 1  24   7.30  & 73   9  15.25&  16.72&  16.87&  16.87&  --0.16&  --0.15&  --0.00\\
              13   & 1  24  10.75  & 73   9  14.84&  18.67&  18.53&  18.06&   0.61&   0.14&   0.47\\
              14   & 1  24   5.18  & 73   9  14.70&  16.27&  16.44&  16.31&  --0.04&  --0.17&   0.13\\
              15   & 1  24   7.45  & 73   9  14.32&  17.31&  17.48&  17.47&  --0.15&  --0.17&   0.01\\
              16   & 1  24   5.16  & 73   9  14.07&  16.19&  16.40&  16.26&  --0.07&  --0.21&   0.14\\
              17   & 1  24  12.57  & 73   9  13.33&  17.44&  17.59&  17.40&   0.04&  --0.15&   0.19\\
              18   & 1  24   8.97  & 73   9  11.82&  19.78&  19.65&  19.52&   0.26&   0.12&   0.14\\
              19   & 1  24   9.30  & 73   9  10.17&  18.44&  18.21&  17.87&   0.57&   0.23&   0.34\\
              20   & 1  24   9.13  & 73   9  10.09&  18.30&  18.23&  18.19&   0.11&   0.08&   0.03\\
              21   & 1  24   9.58  & 73   9   9.84&  19.11&  18.51&  17.66&   1.45&   0.60&   0.84\\
              22   & 1  24   5.76  & 73   9   9.34&  18.89&  18.59&  17.93&   0.96&   0.30&   0.66\\
              23   & 1  24   8.58  & 73   9   9.01&  19.65&  19.34&  18.95&   0.70&   0.31&   0.39\\
              24   & 1  24   9.93  & 73   9   8.68&  18.66&  18.36&  17.80&   0.86&   0.31&   0.55\\
              25   & 1  24  11.52  & 73   9   8.03&  18.89&  18.73&  18.51&   0.38&   0.15&   0.22\\
              26   & 1  24  10.13  & 73   9   7.70&  19.48&  19.46&  19.30&   0.17&   0.02&   0.15\\
              27   & 1  24   9.45  & 73   9   7.50&  18.37&  18.18&  17.97&   0.40&   0.19&   0.20\\
              28   & 1  24   4.96  & 73   9   7.42&  16.32&  16.48&  16.42&  --0.10&  --0.16&   0.06\\
              29   & 1  24   9.25  & 73   9   7.17&  18.21&  18.11&  17.88&   0.33&   0.10&   0.24\\
              30   & 1  24   6.14  & 73   9   6.35&  17.85&  17.51&  17.33&   0.52&   0.34&   0.18\\
              31   & 1  24   9.09  & 73   9   5.99&  15.74&  15.73&  15.51&   0.23&   0.01&   0.16\\
              32   & 1  24   7.57  & 73   9   5.80&  19.04&  19.09&  18.91&   0.13&   --0.05&  0.18\\
              33   & 1  24   9.98  & 73   9   5.77&  19.46&  18.76&  17.83&   1.63&   0.70&   0.93\\
              36   & 1  24   5.82  & 73    9   5.09&  17.36&  17.43&  17.26&  0.10&   --0.07&  0.17\\
             37\tablefootmark{n}   & 1  24   7.84  & 73   9   4.24&  15.01&  15.10&  14.28&   0.73&  --0.09&   0.81\\    
             41\tablefootmark{n}   & 1  24   7.96  & 73   9   3.74&  14.68&  14.56&  13.82&   0.86&   0.12&   0.74\\     
             42\tablefootmark{n}   & 1  24   7.85  & 73   9   3.60&  15.05&  15.05&  14.44&   0.61&   0.00&   0.61\\     
             47\tablefootmark{n}    & 1  24   7.96  & 73   9   3.00&  15.55&  15.36&  14.88&   0.67&   0.19&   0.48\\     
             46   & 1  24  10.08  & 73   9   3.05&  19.65&  18.93&  18.18&   1.47&   0.72&   0.75\\
             48   & 1  24  11.02  & 73   9   2.86&  18.93&  18.90&  18.82&   0.12&   0.03&   0.09\\
       50\tablefootmark{n}   & 1  24   7.53  & 73   9   2.09&  17.61&  17.62&  17.16&   0.45&  --0.01&   0.46\\               52   & 1  24   7.01  & 73   9   1.79&  18.80&  18.98&  18.57&   0.23&  --0.18&   0.41\\
             53   & 1  24  10.35  & 73   9   0.80&  19.91&  19.51&  18.95&   0.96&   0.40&   0.56\\
             54   & 1  24  12.17  & 73   8  59.81&  17.75&  17.59&  17.29&   0.46&   0.16&   0.30\\
             55   & 1  24   8.53  & 73   8  57.45&  20.05&  20.01&  19.65&   0.40&   0.04&   0.36\\
             56   & 1  24   9.27  & 73   8  56.87&  17.57&  17.42&  17.29&   0.28&   0.15&   0.13\\
             57   & 1  24   9.07  & 73   8  56.24&  15.36&  14.88&  14.59&   0.77&   0.48&   0.29\\
             58   & 1  24  10.81  & 73   8  55.78&  18.45&  18.43&  18.26&   0.19&   0.02&   0.17\\
             59   & 1  24   9.86  & 73   8  54.07&  16.51&  16.67&  16.64&  --0.13&  --0.16&   0.03\\
             60   & 1  24   3.68  & 73   8  53.33&  18.51&  18.03&  17.59&   0.92&   0.48&   0.44\\
             61   & 1  24   8.36  & 73   8  53.17&  19.27&  18.65&  18.44&   0.83&   0.62&   0.21\\
             62   & 1  24   3.59  & 73   8  50.89&  18.06&  17.65&  17.43&   0.63&   0.41&   0.22\\
\hline
\end{tabular}
\tablefoot {\tablefoottext{n}{Stars in N88A analyzed using the  NSTAR routine.}}
\end{table}