\begin{table}%t2
\scriptsize
\caption{\label{tab:burst}The three type-I \mbox{X-ray} bursts parameters.}
%\centerline
 {\small \begin{tabular}{@{}lccc@{}}
\hline\hline  
Burst &  A & B & C \\
\hline
$\tau_{\rm lc}$ (s)$^a$ & $11.2 \pm 0.8$ & $12.5 \pm 0.8$ & $14.3 \pm 0.9$ \\
$F_{\rm peak}$ (10$^{-8}$~erg~cm$^{-2}$~s$^{-1}$)$^b$  &  $3.0 \pm 0.6$  & $2.4 \pm 0.5$ & $3.1 \pm 0.3$\\
$f_b$  (10$^{-7}$~erg~cm$^{-2}$)$^c$ & $2.7 \pm 0.2$ &  $2.8 \pm 0.2$  & $4.8 \pm 0.3$\\
$F_{\rm pers}$ (10$^{-9}$~erg~cm$^{-2}$ s$^{-1})$$^d$ & $3.1 \pm 0.4$  & $3.5 \pm 0.3$  & $0.95 \pm 0.09$  \\
$\gamma  \equiv F_{\rm pers}/F_{\rm peak}$  (10$^{-2}$) &  $10 \pm 3$ &  $14 \pm 4$ & $3.1 \pm 0.6$\\
$\tau$ (s) $\equiv f_b / F_{\rm peak} $  &  $9 \pm 3$ &   $12 \pm 3$ &   $16 \pm 3$\\
\hline
\end{tabular}}
\medskip
$a$: burst $e$-folding decay time. The $\chi^2_{\rm red}$/d.o.f. of the fits 
are~1.4/98, 1.2/86, and 1.3/29, respectively, for the burst~A, B, and~C; $b$: net unabsorbed peak flux; $c$: net unabsorbed burst fluence; and $d$: Unabsorbed persistent flux (all given in 0.1--100~keV).
\end{table}