\begin{table}%t1
\caption{ \label{tab:profiles}Parameter settings for the different DM halo profiles
             considered in this analysis. }
%\centerline
 {    
    \begin{tabular}{cccccc}
    \hline\hline
      Profile & $\alpha$ & $\beta$ & $\gamma$ & $a$ [kpc] & Reference \\\hline
      NFW & 1.0 & 3.0 & 1.0 & 20.0 & \citet{Navarro:1996gj}\\
      BE & 1.0 & 3.0 & 0.3 & 10.2 & \citet{Binney:2001wu}\\
      Moore & 1.5 & 3.0 & 1.5 & 30.0 & \citet{Moore:1999nt}\\
      PISO & 2.0 & 2.0 & 0.0 & 5.0 & \citet{deBoer:2005tm}\\
      240 & 2.0 & 4.0 & 0.0 & 4.0 & \\\hline
    \end{tabular}}
   \medskip
\par
   The parameters of the NFW profile   are adapted from the publication by \citet{Navarro:1996gj} but in this  analysis a larger scale radius a is used.
\end{table}