\begin{table}%t6
\caption{\label{t6}The linelist.}
%\centering
\small
\begin{tabular}{lcrrrrrrrrrrrrr}
\hline
\hline\noalign{\smallskip}
El.& ${\rm \lambda (\AA)}$&1512& 1672 & 1827 & 1886 & 2184 &  236 &  238 & 2846 &  299 &  3574 &  3763 &  3836 &   591\\
\hline                      
FeI  & 6494.98 & 154.5 & 225.3 &    --  & 188.8 & 203.3 & 180.1 & 224.5 &   --   & 243.9 & 180.9 & 191.7 & 186.0 & 185.3\\
FeI  & 6498.94 &  80.1 &   --   &    --  &   --   &   --   &  91.2 & 109.3 &   --   & 122.7 &  92.6 &   --   &   --   &   --  \\
FeI  & 6533.93 &   --   &  56.9 &  60.3 &  53.8 &  54.2 &   --   &  61.5 &  46.2 &  75.5 &  55.0 &  49.3 &  54.9 &  46.3\\
FeI  & 6569.22 &  88.1 &   --   &  93.2 &   --   &   --   &  92.8 &  92.9 &   --   & 103.4 &  94.8 & 104.3 &  86.8 &  88.9\\
FeI  & 6593.87 &   --   & 122.3 &    --  & 106.0 &   --   & 104.4 & 129.7 &   --   & 127.3 &  95.3 &   --   &   --   & 108.0\\
FeI  & 6608.03 &  26.6 &  47.4 &  51.0 &  39.1 &  41.4 &  32.3 &  54.4 &   --   &  59.3 &   --   &  41.0 &  37.2 &   --  \\
FeI  & 6627.54 &  24.5 &  40.3 &  38.6 &  32.2 &  35.1 &  26.6 &  47.9 &   --   &  44.9 &   --   &  41.7 &  35.2 &  34.0\\
FeI  & 6646.93 &  20.2 &  29.0 &  30.7 &  23.4 &   --   &   --   &  37.2 &   --   &  42.2 &   --   &  28.1 &   --   &  26.5\\
FeI  & 6677.99 & 134.6 & 171.4 & 172.3 & 151.5 & 160.4 & 158.7 & 176.2 & 140.3 & 186.0 & 148.0 & 153.7 & 153.3 & 142.9\\
FeI  & 6713.74 &  --    &  29.5 &    --  &   --   &   --   &   --   &   --   &  26.5 &   --   &   --   &   --   &   --   &   --  \\
FeI  & 6726.66 &  46.5 &  58.3 &  56.2 &  50.2 &  55.3 &  61.6 &  59.9 &  40.0 &  60.8 &  53.5 &  50.4 &  54.8 &  46.4\\
FeI  & 6733.15 &  27.6 &  35.8 &  38.0 &  30.9 &  36.7 &  30.4 &  36.8 &  27.4 &  38.2 &  32.1 &  30.5 &  29.9 &  31.7\\
FeI  & 6739.52 &  25.8 &  50.5 &  49.7 &   --   &  40.6 &   --   &  53.5 &   --   &  54.9 &   --   &  34.9 &  39.8 &  32.8\\
FeI  & 6750.15 &  88.8 & 107.2 & 111.2 & 100.5 & 105.3 & 103.1 & 116.6 &  93.4 & 118.3 &  91.6 &  98.4 &  96.0 & 100.4\\
FeI  & 6752.71 &  42.1 &   --   &  54.3 &  43.2 &  50.6 &  44.4 &   --   &   --   &  61.3 &  42.4 &  41.0 &  45.7 &  40.5\\
FeI  & 6806.84 &  30.5 &   --   &    --  &  53.9 &  60.9 &  60.9 &  67.7 &  39.6 &  77.7 &  59.6 &  52.9 &  56.8 &  59.8\\
FeII & 6456.38 &  70.3 &  63.2 &  67.5 &  73.0 &  79.2 &  64.4 &  57.0 &   --   &  71.9 &  68.5 &  66.9 &   --   &   --  \\
CaI  & 6455.60 &   --   &   --   &   --   &   --   &   --   &  80.9 &  91.9 &   --   &  89.5 &   --   &   --   &   --   &   --  \\
CaI  & 6471.66 & 101.4 & 124.4 & 128.5 &   --   & 110.7 & 112.2 & 126.4 & 110.3 & 135.1 & 117.6 & 114.9 & 109.7 & 107.4\\
CaI  & 6499.65 &  82.1 & 105.1 & 112.8 &  92.2 & 112.4 &  93.6 & 111.4 &  83.5 & 122.4 &  91.5 & 101.9 & 101.5 &  96.3\\
ScII & 6604.60 &  50.4 &  65.9 &  69.1 &  67.6 &  72.4 &  60.9 &  71.3 &  75.1 &  73.7 &  44.5 &  61.9 &  52.6 &  58.6\\
NiI  & 6767.77 & 107.0 & 114.0 & 124.0 & 110.3 & 119.3 & 105.7 &   --   & 109.5 & 127.2 & 111.1 & 106.5 & 102.5 & 109.0\\
NiI  & 6772.31 &  56.2 &  63.2 &  78.4 &  70.3 &  62.4 &  57.2 &  69.4 &  50.2 &  71.0 &  60.3 &  63.6 &  51.8 &  50.9\\
\hline     
\end{tabular}
\tablefoot{EWs are reported in m$\AA$.}
\vspace*{2mm}
\end{table}