\begin{table}%tA.1
\caption{\label{tab:candD2}Candidate clusters detected in the D2 CFHTLS field. The first column is the cluster Id, the second and third columns are the J2000 coordinates given in decimal degrees, the fourth column is the mean redshift, and the fifth column is the SExtractor detection level.}
%\centering
\small
\begin{tabular}{rrrrrrrrrrrrrrr}
\hline\hline\noalign{\smallskip}
  Id & $\alpha$ & $\delta$ & $z$ & $\sigma_{\rm S}$ \\
\hline
D2-1 & 149.6931 &   1.9613 & 1.20 & 3. \\
D2-2 & 149.6971 &   2.2002 & 0.60 & 2. \\
D2-3 & 149.7092 &   1.8994 & 0.35 & 2. \\
D2-4 & 149.7174 &   1.8370 & 0.63 & 2. \\
D2-5 & 149.7198 &   2.2413 & 1.00 & 4. \\
D2-6 & 149.7242 &   1.8689 & 1.42 & 2. \\
D2-7 & 149.8395 &   2.2761 & 0.40 & 4. \\
D2-8 & 149.8398 &   1.8005 & 0.15 & 3. \\
D2-9 & 149.8532 &   2.2603 & 1.23 & 2. \\
D2-10 & 149.8573 &   1.7931 & 0.57 & 2. \\
D2-11 & 149.8596 &   2.1089 & 1.35 & 2. \\
D2-12 & 149.8669 &   2.1456 & 0.15 & 2. \\
D2-13 & 149.8957 &   2.4630 & 0.47 & 2. \\
D2-14 & 149.9035 &   2.2253 & 0.80 & 2. \\
D2-15 & 149.9085 &   2.6340 & 1.20 & 2. \\
D2-16 & 149.9136 &   2.5222 & 0.70 & 6. \\
D2-17 & 149.9180 &   2.0965 & 0.68 & 2. \\
D2-18 & 149.9246 &   2.6301 & 0.90 & 3. \\
D2-19 & 149.9438 &   2.5923 & 0.28 & 2. \\
D2-20 & 149.9464 &   2.3455 & 0.95 & 5. \\
D2-21 & 149.9482 &   2.6171 & 1.35 & 2. \\
D2-22 & 149.9797 &   1.8096 & 0.35 & 2. \\
D2-23 & 149.9884 &   2.2502 & 0.45 & 2. \\
D2-24 & 150.0040 &   2.2709 & 0.65 & 2. \\
D2-25 & 150.0230 &   1.8711 & 1.35 & 2. \\
D2-26 & 150.0417 &   2.6028 & 0.68 & 6. \\
D2-27 & 150.0759 &   2.6058 & 1.42 & 2. \\
D2-28 & 150.0807 &   2.5452 & 0.88 & 2. \\
D2-29 & 150.1032 &   2.2406 & 0.75 & 4. \\
D2-30 & 150.1046 &   2.0085 & 0.35 & 3. \\
D2-31 & 150.1078 &   2.3459 & 0.30 & 3. \\
D2-32 & 150.1434 &   2.0456 & 0.75 & 2. \\
D2-33 & 150.1894 &   2.1784 & 0.70 & 3. \\
D2-34 & 150.2051 &   1.7889 & 0.30 & 3. \\
D2-35 & 150.2275 &   1.8023 & 0.45 & 4. \\
D2-36 & 150.2280 &   2.0504 & 1.20 & 3. \\
D2-37 & 150.2768 &   2.0619 & 1.00 & 3. \\
D2-38 & 150.2985 &   2.2650 & 1.10 & 3. \\
D2-39 & 150.3005 &   1.8659 & 0.95 & 2. \\
D2-40 & 150.3350 &   2.2070 & 0.40 & 2. \\
D2-41 & 150.3383 &   2.3676 & 0.70 & 2. \\
D2-42 & 150.3550 &   1.9385 & 1.15 & 3. \\
D2-43 & 150.3580 &   1.9077 & 1.39 & 2. \\
D2-44 & 150.3807 &   2.1539 & 1.10 & 2. \\
D2-45 & 150.3925 &   2.4827 & 0.45 & 4. \\
D2-46 & 150.4007 &   2.5031 & 1.35 & 2. \\
D2-47 & 150.4010 &   1.8290 & 0.90 & 3. \\
D2-48 & 150.4040 &   2.5237 & 1.10 & 2. \\
D2-49 & 150.4137 &   2.4257 & 0.15 & 4. \\
D2-50 & 150.4237 &   1.8279 & 1.00 & 2. \\
D2-51 & 150.4576 &   1.9729 & 0.88 & 2. \\
D2-52 & 150.4586 &   2.5387 & 0.90 & 3. \\
D2-53 & 150.4826 &   2.1448 & 1.42 & 2. \\
D2-54 & 150.4861 &   2.1086 & 1.30 & 2. \\
D2-55 & 150.4923 &   2.0589 & 0.40 & 5. \\
D2-56 & 150.5093 &   2.1885 & 0.80 & 4. \\
D2-57 & 150.5099 &   2.4570 & 0.65 & 4. \\
D2-58 & 150.5220 &   2.5784 & 1.25 & 2. \\
D2-59 & 150.5306 &   2.4614 & 1.15 & 2. \\
D2-60 & 150.5440 &   2.6161 & 0.65 & 2. \\
\hline
\end{tabular}
\end{table}