\begin{table}%t2
\par
\caption{\label{tab_gaussfit_R0.6}Gaussian fitting results for the identified compact
 radio sources in the core of MS0451.} 
 \small%\centerline
{
\begin{tabular}{lcccccccc}
\hline\hline
\noalign{\smallskip}
 Name & RA ($+4^{\rm h}$ $54^{\rm m}$) & Dec ($- 3^{\circ}$)  & $S_{\rm Pk}$ & $S_{\rm Gauss}$ & Maj Axis & Min Axis & PA & SSR                \\ 
      & J2000 (sec) & J2000 ($\arcmin$, $\arcsec$)& ($\rm \mu Jy~beam^{-1}$) & ($\mu$Jy) & (arcsec) & (arcsec) & (deg) & ($\rm \times 10^{-9}~Jy^{2}~beam^{-2}$)\\
\noalign{\smallskip}
\hline 
\noalign{\smallskip}
E1         & $12.782\pm 0.007$  & 00:$43.7\pm0.1$ & $66.1\pm10.3$ & $53.0  \pm15.5$ & $0.00  \pm1.14$   & --               & --              & 2.2 \\
CR1        & $12.89\pm  0.01$   & 00:$53.5\pm0.3$ & $45.6\pm10.2$ & $56.2  \pm20.4$ & $1.87  \pm1.87$   & $0.00  \pm1.17$    & $31.4  \pm44.7$   & 0.6 \\
CR2        & $12.87\pm  0.01$   & 00:$59.0\pm0.3$ & $45.9\pm10.0$ & $76.3  \pm24.5$ & $2.28  \pm1.22$   & $0.73  \pm0.99$    & $37.6  \pm3.8$    & 1.8 \\
E2         & $12.67\pm  0.01$   & 01:$01.2\pm0.2$ & $51.6\pm10.3$ & $61.2  \pm20.0$ & $1.44  \pm1.44$   & $0.00  \pm1.07$    & --              & 0.9 \\
RJ bright  & $12.55\pm  0.01$   & 01:$17.2\pm0.1$ & $82.9\pm9.8$  & $164   \pm27.6$ & $3.02  \pm0.56$   & $0.51  \pm0.73$    & $128   \pm10.9$   & 12.8\\
E3         & $10.95\pm  0.01$   & 01:$24.8\pm0.2$ & $52.6\pm9.9$  & $92.5  \pm25.5$ & $1.71  \pm0.95$   & $1.58  \pm1.58$    & $70.5  \pm39.0$   & 3.4 \\            
\hline 
\end{tabular}}
\smallskip
The columns show:
 position (RA, Dec), peak flux density ($S_{\rm Pk}$), total flux
 density ($S_{\rm Gauss}$), deconvolved Gaussian sizes (major axis,
 minor axis and position angle) with their corresponding formal
 errors, and the sum of the square of the residuals reported from the
 fit (SSR). Cases where the parameters of the Gaussian fits are not
 well constrained are indicated by a dash. Note that the positions
 listed here were derived before aligning the radio map respect to the
 HST image.
 \vspace*{2mm}
\end{table}