\begin{table}%t4
%\centering
\par
\caption{\label{tab : contrast_sccfqpm}Comparison between the contrasts and angular separations measured in the~SCC image and the simulated values.}
\small
\begin{tabular}{cccc}
\hline \hline\noalign{\smallskip}
\multicolumn{2}{c}{Contrast~($\times 10^{10}$)}&\multicolumn{2}{c}{Angular separation in~$\lambda_0/D$}\\
\hline
Simulated value & Measured value & Simulated value & Measured value\\
 %  \hline     
\multirow{6}{*}{$2$} & $1,7$& $3,0$& $3,0$\\
%\cline{2-4}
 & $1,5$& $6,0$& $5,9$\\
%\cline{2-4}
 & $1,8$& $9,0$& $8,9$\\
%\cline{2-4}
 & $2,1$& $12,0$& $11,8$\\
%\cline{2-4}
 & $1,6$& $15,0$& $14,7$\\
%\cline{2-4}
 & $1,6$& $18,0$& $18,0$\\
%     \hline     
$8$ & $7,7$& $20,0$& $19,9$\\
 %    \hline
$10$ & $9,1$& $36,5$& $36,3$\\
     \hline
    \end{tabular}
\vspace{-2mm}\end{table}