\begin{table}%t4
%\centering
\par
\caption {\label{tab_Lickdata}Format example of the measured Lick indices as a function of distance from the center (positive: east, negative: 
west) for the different position 
angles. The full table is available electronically at the CDS.} 
\begin{tabular}{llllllllll}
\hline\hline
$R$ & PA & H$\beta$ & Mgb & Fe5015 & Fe5270 & Fe5335 & Fe5406 & Fe5709 & Fe5782 \\
(\arcsec) & (deg) & \AA & \AA & \AA &\AA &\AA &\AA &\AA &\AA  \\
\hline
--288.6 & 48 & $1.65\pm 0.21$ & $4.04\pm 0.17$ & $5.07\pm 0.40$ & $2.94\pm 0.14$ & $2.50\pm 0.32$ & $1.53\pm 0.12$ & $0.77\pm 0.11$ & $0.76\pm 0.08$\\
\hline
\end{tabular}
\end{table}