\begin{table}%t3
\caption{\label{tab:lines}Line list used for abundance analysis based on equivalent width measurements in the co-added spectrum of \hd.}
%\centering
\small
\begin{tabular}{lrrrlrrr}
\hline \hline\noalign{\smallskip}
Species & $\lambda$ [\AA] & $E_{\rm low}$ [eV]& log~$gf$& Species & $\lambda$ [\AA] & $E_{\rm low}$ [eV]& log~$gf$\\
\hline
C I&  6001.1179 &  8.6430 & --2.061	&	Fe I&5445.0424 &  4.3860 & --0.020\\
&&&&						Fe I&5446.9168 &  0.9900 & --1.914\\
Mg I&5183.6040  &  2.7170 & --0.180&		Fe I&5487.7450 &  4.3200 & --0.317\\
Mg I&5528.4050  &  4.3460 & --0.620&		Fe I&5554.8951 &  4.5480 & --0.440\\
&&&&						Fe I&5565.7040 &  4.6080 & --0.213\\
Si I&5645.6130  & 4.9300  &--1.524&		Fe I&5569.6181 &  3.4170 & --0.486\\
Si I&5772.1460  & 5.0820  &--1.358&		Fe I&5572.8424 &  3.3960 & --0.275\\
Si I&5948.5410  & 5.0820  &--0.780&		Fe I&5615.6439 &  3.3320 &  0.050\\
Si II&5055.9840 & 10.0740 &  0.593&		Fe I&5624.5422 &  3.4170 & --0.755\\
Si II&5978.9300 & 10.0740 &  0.004&		Fe I&5633.9465 &  4.9910 & --0.270\\
&&&&						Fe I&5686.5302 &  4.5480 & --0.446\\
Ca I&5581.9650  & 2.5230 & --0.555&		Fe I&5705.9922 &  4.6070 & --0.530\\
Ca I&5588.7490  & 2.5260 &  0.358&		Fe I&5762.9922 &  4.2090 & --0.450\\
Ca I&5594.4620  & 2.5230 &  0.097&		Fe I&5816.3735 &  4.5480 & --0.601\\
Ca I&5857.4510  & 2.9330 &  0.240&		Fe I&5848.1270 &  4.6080 & --1.056\\
&&&&						Fe I&5859.5860 &  4.5490 & --0.419\\
Sc II&5667.1490 &  1.5000 & --1.309&		Fe I&5862.3570 &  4.5490 & --0.127\\
&&&&						Fe I&5914.2010 &  4.6080 & --0.131\\
Ti II&5185.9018  & 1.8930 & --1.490&		Fe I&5930.1799 &  4.6520 & --0.230\\
Ti II&5418.7675  & 1.5820 & --2.000&		Fe I&5934.6549 &  3.9280 & --1.170\\
&&&&						Fe I&6003.0123 &  3.8810 & --1.120\\
V II&5819.9350 &  2.5220 & --1.703&		Fe I&6020.1692 &  4.6070 & --0.270\\
&&&&						Fe I&6024.0580 &  4.5480 & --0.120\\
Cr I&5206.0370 &  0.9410 &  0.019&		Fe I&6027.0509 &  4.0760 & --1.089\\
Cr I&5208.4250 &  0.9410 &  0.158&		Fe I&6056.0047 &  4.7330 & --0.460\\
Cr II&5237.3290 &  4.0730 & --1.350&		Fe II&5004.1950 & 10.2730 &  0.504\\ 
Cr II&5310.6870 &  4.0720 & --2.280&		Fe II&5061.7180 & 10.3080 &  0.284 \\
Cr II&5334.8690 &  4.0720 & --1.826&		Fe II&5169.0330 &  2.8910 & --1.303 \\
Cr II&5407.6040 &  3.8270 & --2.151&		Fe II&5234.6250 &  3.2210 & --2.230 \\
Cr II&5420.9220 &  3.7580 & --2.458&		Fe II&5254.9290 &  3.2300 & --3.336 \\
Cr II&5508.6060 &  4.1560 & --2.252&		Fe II&5316.6150 &  3.1530 & --1.850 \\
Cr II&5620.6310 &  6.4870 & --1.395&		Fe II&5362.8690 &  3.1990 & --2.616 \\
&&&&						Fe II&5427.8260 &  6.7240 & --1.581 \\
Mn I&6021.8190  & 3.0750  & 0.034&		Fe II&5432.9670 &  3.2670 & --3.527 \\
&&&&						Fe II&5439.7070 &  6.7290 & --2.382 \\
Fe I&5065.0180 &  4.2560 &  0.005&		Fe II&5534.8470 &  3.2450 & --2.730 \\
Fe I&5078.9750 &  4.3010 & --0.292&		Fe II&5835.4920 &  5.9110 & --2.702 \\
Fe I&5090.7740 &  4.2560 & --0.400&		Fe II&5952.5100 &  5.9560 & --2.388 \\
Fe I&5133.6885 &  4.1780 &  0.140&		Fe II&5961.7050 & 10.6780 &  0.675 \\
Fe I&5139.4628 &  2.9400 & --0.509&		Fe II&5991.3760 &  3.1530 & --3.540 \\
Fe I&5162.2729 &  4.1780 &  0.020&		&&&\\
Fe I&5202.3360 &  2.1760 & --1.838&		Ni I&5715.0660 &  4.0880 & --0.352\\
Fe I&5232.9403 &  2.9400 & --0.058&		&&&\\
Fe I&5281.7904 &  3.0380 & --0.834&		Y II&5087.4160  & 1.0840 & --0.170\\
Fe I&5353.3736 &  4.1030 & --0.840&		&&&\\
Fe I&5367.4668 &  4.4150 &  0.443&		Pr III&	6053.0044 &  0.0000 & --1.983\\
Fe I&5383.3692 &  4.3120 &  0.645&		&&&\\
Fe I&5393.1676 &  3.2410 & --0.715&		Nd III&5845.0201 &  0.6310 & --1.180\\
Fe I&5434.5238 &  1.0110 & --2.122&		&&&\\
\hline
\end{tabular}
\tablefoot{Atomic parameters are taken from the VALD database. For each line wavelength, excitation potential, and~log~$gf$ are listed.}
\end{table}