\begin{table}%t1
%\centering
\par
\caption{\label{table1}Basic information on the observed fields with VIMOS.
Coordinates are given for the centers of the fields.}
\small \begin{tabular}{ccccccc}
\hline\hline
VIMOS field  & Short & RA(2000.0) & Dec(2000.0) & $l$       & $b$       & Duration of observations \\
with transit & name  & [h:m:s]    & [$\degr$:$\arcmin$:$\arcsec$] & [$\degr$] & [$\degr$] & \\
\hline
OGLE-TR-86~~ & F86~~ & 10:58:37.19 & --61:31:29.4 & 289.905 & --1.540 & only first 8~h of night 1 \\
OGLE-TR-113  & F113  & 10:52:56.00 & --61:28:15.0 & 289.269 & --1.783 & all four nights \\
OGLE-TR-167  & F167  & 13:31:36.00 & --64:04:15.0 & 307.306 & --1.541 & 2~h of night 1 and all of night 2 \\
OGLE-TR-170  & F170  & 13:14:17.60 & --64:44:21.0 & 305.368 & --1.976 & only nights 3 and 4 \\
\hline
\end{tabular} 
\end{table}