\begin{table}
\caption{\label{tab:Cstars_light}Abundances of light elements in carbon-enhanced metal-poor stars from literature. Columns (4), (6), (8), (10), (12), (15) list random errors (when available). Column (3) lists metallicities preferentially from Fe I. Column (5) list C abundances from preferencially CH determinations. (7) N abundances preferentially from CN. (9) For oxygen abundances  (2) stands for measurements from O~I triplet and (3) from OH lines. By default, the oxygen measurement comes from the [OI] line at 6300~\AA. (11) Non-LTE corrections of O~I triplet measurement according to \citet{Takeda2003} (when applicable).}
\begin{tabular}{l c c c c c c c c c c c c c c }
\hline\hline
Object       & $T\rm_{eff}$ $\log g$   & [Fe/H] & $\sigma$ & [C/Fe] &  $\sigma$ & $\rm^{12}C/^{13}C$ &  $\sigma$ & [N/Fe] & $\sigma$ & [O/Fe]  & $\sigma$ & Non-LTE & [Mg/Fe] &  $\sigma$     \\           
   (1)       &   (2)             & (3)    & (4)      & (5)    &  (6)      & (7)             &  (8)      & (9)    &  (10)    & (11)    & (12)     &  (13)   &   (14)  &  (15)       \\        
\hline
HE 0007-1832      &   6515 3.8 &   --2.72 &   0.19 &     2.45 &   ...  &      ... &  ...   &     1.67 &   ...    &      ...  &   ...  &   ...  &      0.79 &   0.35\\
  HE 0012-1441      &  5730 3.50 &   --2.59 &   0.16 &     1.70 &   ...  &      ... &  ...   &     0.59 &   ...    &      ...  &   ...  &   ...  &      0.94 &   0.16\\
  HE 0024-2523      &   6625 4.3 &   --2.70 &   0.12 &     2.62 &   0.10 &        6 &   1    &     2.12 &   0.10   & (2)  0.65 &   ...  &   NaN  &      0.60 &   0.06\\
  HE 0107-5240      &   5100 2.2 &   --5.39 &   ...  &     3.85 &   0.15 &   $>$30 &  ...   &     2.39 &   0.15   &      ...  &   ...  &   ...  &      0.24 &   ... \\
  HE 0131-3953      &  5928 3.83 &   --2.71 &   0.17 &     2.32 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.30 &   0.24\\
  HE 0143-0441      &   6240 3.7 &   --2.38 &   0.18 &     2.08 &   ...  &      ... &  ...   &     1.68 &   ...    &      ...  &   ...  &   ...  &      0.66 &   0.08\\
                    &   6370 4.4 &   --2.23 &   0.21 &     1.56 &   ...  &      ... &  ...   &    --0.22 &   ...    &      ...  &   ...  &   ...  &      0.50 &   0.17\\
  HE 0202-2204      &  5280 1.65 &   --1.98 &   0.19 &     1.03 &   0.28 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &     --0.01 &   0.23\\
  HE 0206-1916      &  5200 2.70 &   --2.09 &   0.20 &     2.10 &   0.19 &       15 &   5    &     1.61 &   0.33   &      ...  &   ...  &   ...  &      0.52 &   0.15\\
  HE 0212-0557      &  5075 2.15 &   --2.34 &   0.26 &     1.84 &   ...  &        4 &   1    &     1.04 &   ...    &      ...  &   ...  &   ...  &      0.07 &   ... \\
  HE 0231-4016      &  5972 3.59 &   --2.08 &   0.18 &     1.23 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.22 &   0.24\\
  HE 0336+0113      &   5947 3.7 &   --2.39 &   0.09 &     2.72 &   0.10 &   $>$60 &  ...   &     1.72 &   0.20   &      ...  &   ...  &   ...  &      0.32 &   0.20\\
                    &  5700 3.50 &   --2.75 &   0.22 &     2.35 &   ...  &   $>$7 &   1    &     1.55 &   ...    &      ...  &   ...  &   ...  &      1.07 &   0.18\\
  HE 0338-3945      &  6162 4.09 &   --2.42 &   0.10 &     2.13 &   0.15 &      ... &  ...   &     1.55 &   0.20   & (2)  1.40 &   0.11 &   ...  &      0.30 &   0.09\\
  HE 0400-2030      &  5600 3.50 &   --1.73 &   0.17 &     1.14 &   0.16 &      ... &  ...   &     2.75 &   0.31   &      ...  &   ...  &   ...  &      0.62 &   0.14\\
  HE 0430-4404      &  6214 4.27 &   --2.07 &   0.17 &     1.31 &   0.26 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.29 &   0.23\\
  HE 0441-0652      &  4900 1.40 &   --2.47 &   0.20 &     1.38 &   0.19 &      ... &s  ...   &     0.89 &   0.24   &      ...  &   ...  &   ...  &      0.35 &   0.15\\
  HE 0507-1653      &  5000 2.40 &   --1.38 &   0.19 &     1.29 &   0.19 &       40 &  15    &     0.80 &   0.32   &      ...  &   ...  &   ...  &      0.19 &   0.12\\
  HE 0557-4840      &   4900 2.2 &   --4.75 &   0.17 &     1.65 &   0.10 &      ... &  ...   &     ...  &   ...    & $<$3.09 &   ...  &   ...  &      0.25 &   0.07\\
 HE 1001-0243            & 5000 2.00 &  --2.88 &   0.26 &   1.59 &   0.10 &      30 &     5 &   1.20 &   0.10 &  $<$1.92 &   ...  &...    &       0.37 &   0.12 \\
  HE 1005-1439      &  5000 1.90 &   --3.17 &   0.32 &     2.48 &   0.20 &      ... &  ...   &     1.79 &   0.27   &      ...  &   ...  &   ...  &      0.60 &   0.21\\
  HE 1012-1540      &   5620 3.4 &   --3.50 &   0.17 &     2.32 &   ...  &      ... &  ...   &     1.20 &   ...    & (3)  2.22 &   0.25 &   ...  &      1.91 &   0.44\\
  HE 1031-0020      &  5080 2.20 &   --2.93 &   0.30 &     1.73 &   ...  &      ... &  ...   &     2.43 &   ...    &      ...  &   ...  &   ...  &      0.53 &   0.18\\
  HE 1105+0027      &  6132 3.45 &   --2.42 &   0.19 &     1.87 &   0.28 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.47 &   0.24\\
  HE 1135+0139      &  5487 1.80 &   --2.33 &   0.18 &     1.06 &   0.29 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.33 &   0.24\\
  HE 1135-0344      &  6154 4.03 &   --2.63 &   0.18 &     0.90 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
  HE 1150-0428      &  5200 2.55 &   --3.37 &   0.26 &     2.47 &   ...  &      ... &  ...   &     2.47 &   ...    &      ...  &   ...  &   ...  &      0.37 &   0.06\\
  HE 1152-0355      &   4000 1.0 &   --1.27 &   0.27 &     0.58 &   ...  &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &     --0.01 &   ... \\
  HE 1157-0518      &  4900 2.00 &   --2.34 &   0.31 &     2.15 &   0.29 &       15 &   5    &     1.56 &   0.56   &      ...  &   ...  &   ...  &      0.50 &   0.16\\
  HE 1221-1948      &  6083 3.81 &   --3.36 &   0.18 &     1.29 &   0.31 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.80 &   0.24\\
  HE 1249-3121      &  5373 3.40 &   --3.23 &   0.19 &     1.73 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.26 &   0.29\\
  HE 1300+0157      &   5450 3.2 &   --3.73 &   0.16 &     1.38 &   0.27 &      ... &  ...   &     ...  &   ...    & (3)  1.76 &   0.39 &   ...  &      0.45 &   0.14\\
                    &  5411 3.38 &   --3.76 &   0.19 &     1.04 &   0.29 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.40 &   0.27\\
                    &  5632 3.37 &   --3.46 &   0.19 &     1.33 &   ...  &      ... &  ...   &     ...  &   ...    & (3)  1.66 &   0.18 &   ...  &      0.35 &   0.10\\
  HE 1300-0641      &  5308 2.96 &   --3.14 &   0.18 &     1.16 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.04 &   0.26\\
  HE 1300-2201      &  6332 4.64 &   --2.61 &   0.17 &     0.88 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.29 &   0.24\\
  HE 1305+0007      &   4750 2.0 &   --2.03 &   0.18 &     1.84 &   ...  &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.25 &   ... \\
  HE 1305-0331      &  6081 4.22 &   --3.26 &   0.18 &     1.00 &   0.29 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
  HE 1319-1935      &  4600 1.10 &   --1.74 &   0.33 &     1.45 &   0.29 &        8 &   3    &     0.46 &   0.56   &      ...  &   ...  &   ...  &      0.47 &   0.20\\
  HE 1327-2326      &   6180 4.0 &   --5.55 &   0.10 &     4.08 &   0.18 &      ... &  ...   &     4.34 &   0.24   & (3)  3.70 &   ...  &   ...  &      1.71 &   0.05\\
  HE 1327-2326      &   6180 4.0 &   --5.55 &   0.10 &     4.08 &   0.18 &      ... &  ...   &     4.34 &   0.24   & (3)  3.70 &   ...  &   ...  &      1.71 &   0.05\\
  HE 1330-0354      &  6257 4.13 &   --2.29 &   0.18 &     0.92 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.32 &   0.23\\
  HE 1351-1049      &  5204 2.85 &   --3.46 &   0.18 &     1.42 &   0.28 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.30 &   0.27\\
  HE 1410-0004      &  4985 2.00 &   --3.09 &   0.17 &     2.09 &   ...  &      ... &  ...   &     ...  &   ...    & (2)  1.26 &   ...  &   NaN  &      0.61 &   0.29\\
 HE 1410+0213       & 4800 2.00  &  --2.52  &   0.21 &     2.33 &   0.10 &       3 &     0.5   &     2.94 &   0.10 &      2.56 &   0.20 &...     &   0.33 &   0.18 \\
                    &  5605 3.50 &   --2.23 &   0.31 &     1.83 &   ...  &        3 &   1    &     1.73 &   ...    &      ...  &   ...  &   ...  &      0.21 &   0.03\\
  HE 1413-1954      &  6533 4.59 &   --3.22 &   0.17 &     1.32 &   0.32 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
 HE 1419-1324       & 4900 1.80  &  --3.05  &   0.29 &     1.76 &   0.10 &       12 &     2  &   1.47   &   0.10   &   $<$1.19 &  ... &...    &        0.53 &   0.13 \\
  HE 1429-0551      &  4700 1.50 &   --2.47 &   0.20 &     2.28 &   0.19 &       30 &  15    &     1.39 &   0.52   &      ...  &   ...  &   ...  &      0.52 &   0.15\\
  HE 1430-1123      &  5915 3.75 &   --2.71 &   0.18 &     1.71 &   0.28 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.35 &   0.24\\
  HE 1434-1442      &  5420 3.15 &   --2.46 &   0.18 &     2.05 &   ...  &      ... &  ...   &     1.35 &   ...    &      ...  &   ...  &   ...  &      0.33 &   0.05\\
  HE 1443+0113      &  4945 1.85 &   --2.14 &   0.21 &     1.94 &   ...  &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.40 &   0.09\\
  HE 1447+0102      &  5100 1.70 &   --2.47 &   0.27 &     2.48 &   0.20 &       25 &  10    &     1.39 &   0.44   &      ...  &   ...  &   ...  &      1.43 &   0.13\\
  HE 1509-0806      &  5185 2.50 &   --2.98 &   0.16 &     2.08 &   ...  &      ... &  ...   &     2.18 &   ...    &      ...  &   ...  &   ...  &      0.67 &   0.11\\
  HE 1523-1155      &  4800 1.60 &   --2.15 &   0.19 &     1.86 &   0.19 &      ... &  ...   &     1.67 &   0.52   &      ...  &   ...  &   ...  &      0.62 &   0.15\\
  HE 1528-0409      &  5000 1.80 &   --2.61 &   0.19 &     2.42 &   0.19 &       12 &   5    &     2.03 &   0.52   &      ...  &   ...  &   ...  &      0.83 &   0.13\\
  HE 2148-1247      &   6380 3.9 &   --2.37 &   0.20 &     1.93 &   ...  &       10 &   3    &     1.70 &   0.30   &      ...  &   ...  &   ...  &      0.51 &   0.25\\
  HE 2150-0825      &  5960 3.67 &   --1.98 &   0.18 &     1.22 &   0.27 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.36 &   0.24\\
  HE 2158-0348      &   5792 3.6 &   --2.07 &   0.06 &     2.57 &   0.10 &       20 &  10    &     1.82 &   0.20   &      ...  &   ...  &   ...  &      0.18 &   0.05\\
                    &  5215 2.50 &   --2.77 &   0.26 &     1.97 &   ...  &        4 &   1    &     1.47 &   ...    &      ...  &   ...  &   ...  &      0.71 &   0.18\\
  HE 2221-0453      &  4400 0.40 &   --2.22 &   0.31 &     1.83 &   0.31 &       10 &   4    &     0.84 &   0.48   &      ...  &   ...  &   ...  &      0.80 &   0.17\\
  HE 2227-4044      &  5811 3.85 &   --2.32 &   0.17 &     1.54 &   0.26 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.30 &   0.23\\
  HE 2228-0706      &  5100 2.60 &   --2.41 &   0.20 &     2.32 &   0.19 &       15 &   4    &     1.13 &   0.33   &      ...  &   ...  &   ...  &      0.67 &   0.15\\
  HE 2232-0603      &   6400 4.1 &   --1.00 &   0.11 &     1.62 &   0.10 &       30 &   2    &     0.42 &   0.20   &      ...  &   ...  &   ...  &      0.30 &   0.12\\
                    &  5750 3.50 &   --1.92 &   0.23 &     1.32 &   ...  &   $>$30 &  ...   &     0.42 &   ...    &      ...  &   ...  &   ...  &      0.88 &   0.32\\
  HE 2240-0412      &  5852 4.33 &   --2.20 &   0.18 &     1.22 &   0.26 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.28 &   0.24\\
  HE 2330-0555      &  4900 1.70 &   --2.78 &   0.19 &     2.09 &   0.19 &      ... &  ...   &     1.00 &   0.42   &      ...  &   ...  &   ...  &      0.67 &   0.17\\
  CS 22183-015      &   5200 2.5 &   --3.12 &   0.19 &     2.20 &   ...  &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
 or HE  0058-0244   &  5470 2.85 &   --2.85 &   0.02 &     2.34 &   0.33 &      ... &  ...   &     1.79 &   0.23   &      ...  &   ...  &   ...  &      ...  &   ... \\
                    &   5620 3.4 &   --2.75 &   0.21 &     1.95 &   ...  &        9 &   1    &     1.78 &   0.20   &      ...  &   ...  &   ...  &      0.87 &   0.19\\
                    &   5733 3.6 &   --2.37 &   0.10 &     2.42 &   0.10 &        8 &   2    &     1.92 &   0.20   &      ...  &   ...  &   ...  &      0.37 &   0.20\\
  CS 22877-001      &   5100 2.2 &   --2.72 &   0.19 &     1.00 &   0.18 &   $>$10 &  ...   &     ...  &   0.24   &      ...  &   ...  &   ...  &      0.29 &   0.08\\
  CS 22880-074      &   5850 3.8 &   --1.93 &   0.11 &     1.30 &   0.38 &   $>$40 &  ...   &    --0.10 &   ...    &      ...  &   ...  &   ...  &      0.46 &   0.19\\
                    &   6050 4.0 &   --1.80 &   ...  &     1.51 &   ...  &   $>$40 &  ...   &     0.20 &   ...    &      ...  &   ...  &   ...  &      0.06 &   ... \\
  CS 22881-036      &   6200 4.0 &   --2.10 &   ...  &     1.96 &   ...  &       40 &  ...   &     1.00 &   ...    &      ...  &   ...  &   ...  &      0.40 &   ... \\
  CS 22887-048      &  6500 3.35 &   --1.70 &   0.04 &     1.84 &   0.23 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
 CS 22891-171            & 5100 1.60 &  --2.25 &   0.17 &   1.56 &   0.10 &       6 &     2 &   1.67 &   0.10 &     $<$0.79 &   0.00 &... &   0.70 &   0.37 \\
  CS 22892-052      &   4710 1.5 &   --3.10 &   0.13 &     1.05 &   0.10 &       15 &   2    &     1.00 &   0.20   &      0.72 &   0.15 &   ...  &      0.30 &   0.08\\
                    &   4850 1.6 &   --3.03 &   0.14 &     0.92 &   0.06 &       16 &   7    &     0.51 &   0.13   &      0.41 &   0.12 &   ...  &      0.22 &   0.13\\
                    &  4884 1.81 &   --2.95 &   0.19 &     0.87 &   0.28 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.12 &   0.24\\
  CS 22898-027      &   6250 3.7 &   --2.26 &   0.11 &     2.20 &   0.38 &       15 &   5    &     0.90 &   0.43   &      ...  &   ...  &   ...  &      0.41 &   0.19\\
                    &  6240 3.72 &   --2.30 &   0.02 &     2.34 &   0.04 &      ... &  ...   &     1.24 &   0.07   &      ...  &   ...  &   ...  &      ...  &   ... \\
                    &   6300 4.0 &   --2.00 &   ...  &     1.95 &   ...  &   $>$20 &  ...   &     1.20 &   ...    &      ...  &   ...  &   ...  &      0.13 &   ... \\
CS 22942-019            & 5100 2.50 &  --2.43 &   0.15 &   2.14 &   0.10 &        12 &     1 &   1.15 &   0.10 &       0.97 &   0.20 &... &   0.60 &   0.21 \\
                    &   5000 2.4 &   --2.64 &   0.14 &     2.00 &   0.24 &        8 &   2    &     0.80 &   0.37   &      ...  &   ...  &   ...  &      0.58 &   0.22\\
                    &   4900 1.8 &   --2.67 &   ...  &     2.20 &   ...  &       30 &  ...   &     0.70 &   ...    &      ...  &   ...  &   ...  &      0.77 &   ... \\
 CS 22945-017            & 6400 3.80 &  --2.52 &   0.12 &   2.28 &   0.10 &         6 &     3 &   2.24 &   0.10 &   $<$2.36 &  ...  &...    &   0.61 &   0.10 \\
  CS 22948-027      &   4800 1.8 &   --2.47 &   ...  &     2.43 &   ...  &      ... &  ...   &     1.75 &   ...    &      ...  &   ...  &   ...  &      0.31 &   0.28\\
                    &   4600 0.8 &   --2.60 &   ...  &     2.10 &   ...  &       20 &  ...   &     1.10 &   ...    &      ...  &   ...  &   ...  &      0.35 &   ... \\
                    &   4600 1.0 &   --2.57 &   0.23 &     2.00 &   0.18 &       10 &  ...   &     1.80 &   0.24   &      ...  &   ...  &   ...  &      0.68 &   0.20\\
                    &  5000 1.90 &   --2.21 &   0.28 &     2.12 &   0.20 &       10 &   3    &     2.43 &   0.35   &      ...  &   ...  &   ...  &      0.55 &   0.14\\
  CS 22949-037      &   4900 1.5 &   --3.97 &   0.11 &     1.17 &   0.10 &        3 &   1    &     2.57 &   0.20   & $<$1.98 &   0.10 &   1.00 &      1.58 &   0.19\\
 or HE  2323-0256   &   4915 1.7 &   --3.86 &   0.16 &     1.07 &   ...  &      ... &  ...   &     2.11 &   ...    & (3)  1.93 &   ...  &   ...  &      1.50 &   0.25\\
 CS 22956-028            & 6700 3.50 &  --2.33 &   0.09 &   1.84 &   0.10 &        5 &     2 &   1.85 &   0.10 &    $<$2.47 &   ... &...    &   0.58 &   0.09 \\
                    &   7038 4.3 &   --1.89 &   0.06 &     1.82 &   0.10 &        5 &   2    &     1.52 &   0.20   & (2)  0.63 &   0.11 &   NaN  &      0.31 &   0.05\\
                    &   6900 3.9 &   --2.08 &   ...  &     1.60 &   0.20 &      ... &  ...   &     ...  &   ...    & (2)  0.50 &   0.12 &  --0.14 &      ...  &   ... \\
  CS 22957-027      &   4850 1.9 &   --3.36 &   0.13 &     2.22 &   0.30 &       10 &   5    &     2.02 &   0.50   &      ...  &   ...  &   ...  &      0.67 &   0.06\\
 or HE  2356-0410   &  4839 2.25 &   --3.43 &   0.12 &     2.00 &   0.20 &       10 &  ...   &     1.10 &   0.20   &      ...  &   ...  &   ...  &      ...  &   ... \\
                    &   5050 2.0 &   --2.96 &   ...  &     2.20 &   ...  &       25 &  ...   &     1.60 &   ...    &      ...  &   ...  &   ...  &      0.21 &   ... \\
                    &   5100 1.9 &   --3.12 &   0.15 &     2.37 &   0.24 &        8 &   2    &     1.62 &   0.35   &      ...  &   ...  &   ...  &      0.69 &   1.60\\
                    &   5205 2.5 &   --3.14 &   0.21 &     2.24 &   ...  &        4 &   1    &     1.84 &   ...    &      ...  &   ...  &   ...  &      0.39 &   0.50\\
                    &   5364 3.1 &   --2.69 &   0.06 &     2.17 &   0.05 &       15 &  10    &     1.72 &   0.20   &      ...  &   ...  &   ...  &     --0.03 &   0.20\\
  CS 22958-042      &   6250 3.5 &   --2.85 &   0.10 &     3.17 &   0.12 &        9 &   2    &     2.17 &   0.12   & (2)  1.35 &   0.11 &  --0.12 &      0.37 &   0.15\\
  CS 22960-053      &  5200 2.10 &   --3.14 &   0.15 &     2.05 &   0.16 &      ... &  ...   &     3.06 &   0.21   &      ...  &   ...  &   ...  &      0.65 &   0.12\\
  CS 22967-007      &   6479 4.2 &   --1.79 &   0.06 &     1.82 &   0.10 &   $>$60 &  ...   &     0.92 &   0.20   & (2)  0.90 &   0.10 &   NaN  &      0.61 &   0.06\\
  CS 29495-042      &   5544 3.4 &   --1.86 &   0.06 &     1.32 &   0.10 &        7 &   2    &     1.32 &   0.10   & (2)  0.59 &   ...  &   NaN  &      0.67 &   0.12\\
  CS 29497-030      &   6650 3.5 &   --2.70 &   0.14 &     2.38 &   ...  &   $>$10 &  ...   &     1.88 &   ...    & (2)  1.68 &   0.10 &  --0.16 &      0.54 &   0.21\\
                    &  7000 4.10 &   --2.57 &   ...  &     2.47 &   0.10 &      ... &  ...   &     2.12 &   0.35   & (2)  1.48 &   0.11 &   NaN  &      0.44 &   0.14\\
  CS 29497-034      &   4800 1.8 &   --2.90 &   ...  &     2.63 &   ...  &      ... &  ...   &     2.38 &   ...    &      ...  &   ...  &   ...  &      0.72 &   0.34\\
           &   4983 2.1 &   --2.55 &   0.14 &     2.42 &   0.20 &       20 &   5    &     2.32 &   0.30   & $<$0.92 &   0.20 &   ...  &      0.27 &   0.20\\
or HE 0039-2635     &  4900 1.50 &   --2.91 &   0.27 &     2.72 &   0.20 &      ... &  ...   &     2.63 &   0.53   &      ...  &   ...  &   ...  &      1.31 &   0.12\\
  CS 29498-043      &   4600 1.2 &   --3.54 &   0.28 &     2.09 &   0.29 &        6 &   2    &     2.27 &   0.40   &      2.43 &   0.11 &   NaN  &      1.75 &   0.25\\
                    &   4400 0.6 &   --3.75 &   0.26 &     1.90 &   0.29 &        6 &   2    &     2.30 &   0.40   &      ...  &   ...  &   ...  &      1.81 &   0.24\\
  CS 29502-092      &   5000 2.1 &   --2.76 &   0.18 &     1.00 &   0.18 &       20 &  ...   &     0.70 &   0.24   &      ...  &   ...  &   ...  &      0.37 &   0.07\\
                    &  4970 1.70 &   --3.05 &   0.02 &     1.18 &   0.23 &      ... &  ...   &     1.28 &   0.17   &      ...  &   ...  &   ...  &      ...  &   ... \\
  CS 29503-010      &  6500 4.50 &   --1.06 &   0.19 &     1.07 &   0.19 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.36 &   0.18\\
  CS 29509-027      &   7050 4.2 &   --2.02 &   ...  &     1.24 &   0.20 &      ... &  ...   &     ...  &   ...    & (2)  0.55 &   0.17 &   NaN  &      ...  &   ... \\
  CS 29526-110      &   6500 3.2 &   --2.38 &   0.16 &     2.20 &   0.38 &      ... &  ...   &     1.40 &   ...    &      ...  &   ...  &   ...  &      0.30 &   0.19\\
  CS 29528-028      &  6800 4.00 &   --2.86 &   0.22 &     2.77 &   0.21 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      1.69 &   0.21\\
  CS 29528-041      &   6150 4.0 &   --3.30 &   0.10 &     1.61 &   0.15 &      ... &  ...   &     3.09 &   0.13   & $<$1.40 &   0.10 &   ...  &      0.45 &   0.11\\
  CS 30301-015      &   4750 0.8 &   --2.64 &   0.18 &     1.60 &   0.28 &        6 &   2    &     1.70 &   0.43   &      ...  &   ...  &   ...  &      0.86 &   0.22\\
  CS 30314-067      &   4400 0.7 &   --2.85 &   0.18 &     0.50 &   0.18 &        5 &  ...   &     1.20 &   0.24   &      ...  &   ...  &   ...  &      0.42 &   0.10\\
  CS 30315-091      &   5536 3.4 &   --1.66 &   0.06 &     1.32 &   0.10 &   $>$60 &  ...   &     0.42 &   0.20   & (2)  0.86 &   0.11 &   NaN  &      0.64 &   0.07\\
 CS 30322-023       & 4100 --0.30 &  --3.39 &   0.18 &   0.80 &   0.10 &         4 &     1 &   2.91 &   0.10 &     0.63 &   0.20 &... &   0.80 &   0.09 \\
                    &  4300 1.00 &   --3.25 &   0.23 &     0.56 &   0.12 &      ... &  ...   &     2.47 &   0.33   &      ...  &   ...  &   ...  &      0.54 &   0.26\\
  CS 30323-107      &   6126 4.4 &   --1.73 &   0.06 &     1.12 &   0.10 &        9 &   2    &     0.82 &   0.20   & (2)  0.79 &   0.10 &   NaN  &      0.52 &   0.12\\
  CS 30338-089      &  5000 2.10 &   --2.45 &   0.20 &     2.06 &   0.19 &       12 &   4    &     1.27 &   0.33   &      ...  &   ...  &   ...  &      0.48 &   0.14\\
  CS 30338-089      &   5202 2.6 &   --1.73 &   0.14 &     1.52 &   0.10 &        8 &   5    &     0.82 &   0.30   &      0.75 &   0.10 &   ...  &      0.22 &   ... \\
  CS 31062-050      &   5600 3.0 &   --2.31 &   0.14 &     2.00 &   0.24 &        8 &   2    &     1.20 &   0.37   &      ...  &   ...  &   ...  &      0.60 &   0.21\\
                    &  5500 2.70 &   --2.41 &   0.11 &     1.82 &   0.00 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.84 &   0.20\\
  CS 31080-095      &   6050 4.5 &   --2.85 &   0.10 &     2.71 &   0.14 &   $>$40 &  ...   &     0.72 &   0.11   & (2)  2.35 &   0.12 &   NaN  &      0.70 &   0.12\\
  BS 16080-175      &  6240 3.70 &   --1.86 &   0.04 &     1.75 &   0.23 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
  BS 16929-005      &  5250 2.80 &   --3.17 &   0.14 &     1.08 &   0.16 &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.49 &   0.10\\
  BS 17436-058      &  5690 2.68 &   --1.78 &   0.04 &     1.50 &   0.24 &      ... &  ...   &     1.25 &   0.23   &      ...  &   ...  &   ...  &      ...  &   ... \\
HD 26                   & 4900 1.50 &  --1.02 &   0.22 &   0.68 &   0.10 &         9 &     2 &   0.94 &   0.10 &       0.36 &   0.20 &... &   0.93 &   0.27 \\
   HD 5223           &   4500 1.0 &   --2.06 &   0.13 &     1.57 &   ...  &      ... &  ...   &     ...  &   ...    &      ...  &   ...  &   ...  &      0.58 &   ... \\
 HD 187861               & 4600 1.70 &  --2.36 &   0.21 &   2.02 &   0.10 &        10 &     2 &   2.18 &   0.10 &       1.40 &   0.20 &... &   0.37 &   0.07 \\
 HD 196944               & 5250 1.70 &  --2.19 &   0.13 &   1.30 &   0.10 &         5 &     1 &   1.41 &   0.10 &       0.63 &   0.20 &... &   0.56 &   0.09 \\
                    &   5250 1.8 &   --2.25 &   0.19 &     1.20 &   0.24 &        5 &   1    &     1.30 &   0.37   &      ...  &   ...  &   ...  &      0.42 &   0.21\\
                    &   5250 1.7 &   --2.46 &   0.10 &     1.42 &   ...  &      ... &  ...   &     ...  &   ...    & (2)  1.11 &   0.05 &   NaN  &      0.40 &   0.07\\
 HD 206983               & 4200 0.60 &  --0.99 &   0.14 &   0.50 &   0.10 &         5 &     3 &   1.21 &   0.10 &    $<$0.23 &   ...  &... &   0.26 &   0.31 \\
 HD 224959               & 4900 2.00 &  --2.06 &   0.20 &   1.77 &   0.10 &         4 &     2 &   1.88 &   0.10 &       1.10 &   0.20 &... &   0.76 &   0.24 \\
HKII17435-00532    &  5200,2.15 &   --2.23 &   0.23 &     0.68 &   0.30 &     ...  &  ...   &     ...  &   ...    & (2)  1.16 &   0.27 &   NaN  &      0.42 &   0.25 \\
  LP 625-44         &   5500 2.8 &   --2.71 &   0.13 &     2.10 &   ...  &       20 &  ...   &     1.00 &   ...    &      ...  &   ...  &   ...  &      ...  &   ... \\
                    &  5500 2.50 &   --2.72 &   0.20 &     2.25 &   0.23 &      ... &  ...   &     0.95 &   0.35   & (2)  1.85 &   0.20 &  --0.15 &      1.12 &   0.24\\
  LP 706-7          &   6000 3.8 &   --2.74 &   0.16 &     2.15 &   0.23 &      ... &  ...   &     1.80 &   0.35   &      ...  &   ...  &   ...  &      ...  &   ... \\
or  CS 31062-012      &   6250 4.5 &   --2.55 &   0.11 &     2.10 &   0.38 &       15 &   5    &     1.20 &   0.43   &      ...  &   ...  &   ...  &      0.45 &   0.20\\
   G 77-61          &   4000 5.0 &   --4.03 &   0.15 &     2.49 &   0.10 &        5 &   1    &     2.48 &   0.10   &      2.11 &   0.20 &   ...  &      0.49 &   0.20\\
   V 543Oph         &   6250 1.5 &   --2.15 &   0.12 &    --0.29 &   ...  &      ... &  ...   &     ...  &   ...    & (2)  0.94 &   0.07 &  --0.27 &      0.13 &   0.08\\
\hline	
\end{tabular}
\end{table}