\begin{table}%ta.1continued
%\caption{continued.}
% %\centerline {\small \begin{tabular}{cllrcl}
%\hline\hline\noalign{\smallskip}
%System &  JD Hel.- &  Error & Epoch & Method & Observatory   \\
%       & 2~400~000   &  [day] &       & filter & source        \\ 
%\hline 
EW~Ori 
    & 52252.3908  &  0.0012  & 1053.0  & CCD, R  & \ond \\
    & 52339.3130  &  0.0001  & 1065.5  & CCD, V  & \ond \\
    & 54763.52786 &  0.0010  & 1415.0  & CCD, VR  & \ova \\
    & 54843.5133  &  0.0010  & 1426.5  & CCD, VRI & \ova \\
    & 54857.38759 &  0.0001 & 1428.5  & CCD, VRI & \ova \\
%\noalign{\vskip 1mm}
GG~Ori 
    & 50098.4578   & 0.0002 &	 344.5 & CCD, R & \ond	\\
    & 52956.6299   & 0.0001 &  775.5 & CCD, R & \ond \\ 
    & 54001.6087** & 0.0001 &  933.0 & CCD, R & Pec \\ 
    & 54757.5993   & 0.0001 & 1047.0 & CCD, R & \ova \\
    & 55098.6022   & 0.0005 & 1098.5 & CCD, R & \ova \\ 
%\noalign{\vskip 1mm}
V1094~Tau
    & 52278.2875  &  0.0002  &   286.5 & CCD, V  & \ond  \\  
    & 52362.3148  &  0.0003  &   296.0 & CCD, R  & \ond  \\
    & 52898.49893 &  0.0001  &   355.5 & CCD, R  & \ond  \\
\hline
\end{tabular}}
\medskip
Note:  *~{\it mean value of UBV, BVRI, VR, VRI or RI~measurements}; 
**~{\it presented also in OEJV No.~74.}
\end{table}