\begin{table}%tA.1
\caption{\label{t1}New times of minimum light.}
%\centerline
 {
\tiny \begin{tabular}{cllrcl}
\hline\hline 
System &  JD Hel.- &  Error & Epoch & Method & Observatory   \\
       & 2~400~000   &  [day] &       & filter & source \\ 
\hline 
IT~Cas
   & 51339.6061  &  0.0007 & 1584.0 & CCD      & NSVS \\
   & 52448.4004  &  0.0003 & 1868.5 & CCD, V   & \ond \\
   & 52508.60136 &  0.0001 & 1884.0 & CCD, R   & \ond \\
   & 52982.24148 &  0.0001 & 2005.5 & CCD, R   & \ond \\
   & 53699.22485 &  0.0001 & 2189.5 & CCD, R   & \ond \\
   & 53913.5406  &  0.0003 & 2244.5 & CCD, R   & \ond \\
   & 53942.56688 &  0.0001 & 2252.0 & CCD, R   & \ond \\
   & 54026.5438  &  0.0003 & 2273.5 & CCD, R   & \ova \\
   & 54480.3049* &  0.0003 & 2390.0 & CCD, RI  & \valmez  \\
   & 54776.45024 &  0.0001 & 2466.0 & CCD, R   & \ova \\
   & 54782.49403 &  0.0001 & 2467.5 & CCD, R   & \ova \\ 
%\noalign{\vskip 1mm}
V459~Cas
   & 50201.5104  & 0.002    & --279.5 & CCD, R & \ond \\
   & 50421.4360  & 0.0005   & --253.5 & CCD, R & \ond \\
   & 51381.5143  & 0.0005   &	--140.0 & CCD, V & \ond	\\
   & 52451.41985 & 0.0001   &  --13.5 & CCD, R & \ond \\
   & 52506.4639  & 0.0002   &   --7.0 & CCD, R & \ond \\
   & 52950.45712 & 0.0001   &  45.5 & CCD, R & \ond \\
   & 53614.49798** & 0.0004 & 124.0 & CCD, R & Pec \\
   & 53944.3684   & 0.0002  & 163.0 & CCD, R & \ond \\
   & 54020.4937*  & 0.0002  & 172.0 & CCD, RI  & \ova \\
   & 54760.52605* & 0.0003  & 259.5 & CCD, VRI & \ova \\
   & 54815.56982  & 0.0004  & 266.0 & CCD, R & \ova \\
   & 55052.40025  & 0.0001  & 294.0 & CCD, VRI & \ova \\
   & 55073.48127  & 0.0005 & 296.5 & CCD, R & \ova \\
%\noalign{\vskip 1mm}
V541~Cyg 
    & 52926.28338  &  0.0001 &   524.5 & CCD, R &  \ond \\
    & 53524.46196  &  0.0001 &   563.5 & CCD, R &  \ond \\
    & 53846.5549** &  0.0007 &   584.5 & CCD, R &  Pec \\
    & 54659.46809* &  0.0001 &   637.5 & CCD, RI & \valmez \\
    & 54782.1712   &  0.0003 &   645.5 & CCD, R  & \ova \\
%\noalign{\vskip 1mm}
V1143~Cyg
    & 48692.123   &  0.002  &   848.0 & pe, H  &  \hip \\
    & 53618.42104 &  0.0001 &  1492.5 & CCD, R  &  Pec \\
    & 53620.40992 &  0.0001 &  1493.0 & CCD, R  &  Pec \\
    & 54751.24088* & 0.0002 &  1641.0 & pe, UBV & Hvar \\
%\noalign{\vskip 1mm}
V1147~Cyg
    & 52497.3742  &  0.002  &  114.0 & CCD, R & \ond \\
    & 52857.4777  &  0.0007 &  137.5 & CCD, R & \ond \\
    & 52863.4058  &  0.0006 &  138.0 & CCD, R & \ond \\
    & 53833.5584  &  0.0003 &  201.5 & CCD, R & Pec \\
    & 54001.3235  &  0.0005 &  212.5 & CCD, R & Pec \\
%\noalign{\vskip 1mm}
BF~Dra 
    & 47920.847   &  0.008   &   57.5 & pe, H  & \hip \\
    & 52416.46183 &  0.0001  &  458.5 & CCD, R & \ond \\
    & 52534.3595  &  0.0003  &  469.0 & CCD, V & \ond \\
    & 52618.2608  &  0.0002  &  476.5 & CCD, R & Lelekovice \\
    & 52657.6784  &  0.0004  &  480.0	& CCD, --  & \ova \\
    & 52657.6811  &  0.0005  &  480.0	& CCD, R  & Lelekovice	\\
    & 52859.4784  &  0.0004  &  498.0 & CCD, R & \ond \\
    & 52898.5355  &  0.0004  &  501.5 & CCD, R & \ond \\
    & 53638.4575** & 0.0002  &  567.5 & CCD, BVIR & Brno \\
    & 53868.46854 &  0.0001  &  588.0 & CCD, R & Brno \\
    & 54664.4498  &  0.0001  &  659.0 & CCD, R & \ova \\
    & 54793.192   &  0.001   &  670.5 & CCD, R & \ova \\
    & 54804.3994  &  0.0008  &  671.5 & CCD, R & \ova \\
    & 54810.1931* &  0.0007  &  672.0 & CCD, VRI & \ova \\
    & 54933.51406 & 0.0005   &  683.0 & CCD, R & \ova \\
    & 54978.3574* & 0.0008   &  687.0 & CCD, R & \ova \\
    & 55073.46141 & 0.0005   &  695.5 & CCD, R & \ova \\
V345~Lac
   & 53530.5190 & 0.0010 & 2961.5  & CCD, R & \ova \\
   & 53942.5686 & 0.0014 & 3016.5  & CCD, R & \ova \\
   & 54976.4555 & 0.0005 & 3154.5  & CCD, R & \ova \\
   & 55126.2929 & 0.0008 & 3174.5  & CCD, RI & \valmez \\
%\hline
%\end{tabular}
%\end{table}